ACEDB OPERA

TION REPOR

T Ver.1.5

93 H 5 I 8 G Y+ 77 KSC FJ: LO@NP @ MK

NGC3227 ! NGC3079 ! Mkn421

P ASS 1 P

ASS 2 P

ASS 3 P

ASS 4 P

ASS 5

Pass No. 930508{0619 930508{0723 930508{0826 930508{0929 930508{1033

Operation X-Rep

RANG

OPOG-WR T

01-F

AINT

OP-ST AR T

X-Rep S-Rep

BDR-STOP

S-REP

BDR-STOP

X-Rep

RANG

ST-CTLG-WR T

OBS-MODE

X-Rep

T arget NGC3227 NGC3227 NGC3227 NGC3227 NGC3227

AOS(UT) 9:23:06 11:04:45 12:46:42 14:28:25 16:10:42

LOS(UT) 9:35:32 11:16:59 12:58:45 14:40:18 16:20:30

Max-El 32.007 77.310 Zenith 41.065 12.309

Time 9:29:05 11:10:35 | 14:33:49 16:15:03

Rep-band X X S X X

Rep-start 9:24:41 11: 6:10 12:47:27/12:52:49 14:29:09 16:11:33

Rep-status Completed Completed Interrupted Completed Completed

DP-mode OBS OBS OBS OBS/ACS/OBS OBS

ACS-mode Normal{Poin ting Normal{Poin ting Normal{Pointing Normal{Pointing Normal{Pointing

ACS-spn/�

s 12:5

�

12:4

�

12:4

�

night night

Attitude

2

4

156.163

70.109

156.266

3

5

2

4

156.160

70.108

156.268 Pass-3

3

5

2

4

156.161

70.108

156.267

3

5

2

4

156.163

70.109

156.266

3

5

2

4

156.163

70.109

156.266

3

5

OP-start 9:32:31 contin ue continue Cont. Cont.

start CE 5Ah 06h 0Ch 14h 1Ah

SIS-mode

Brt-Fnt/Brt-Fn t

4CCD

F ant/F an t

4CCD

F ant/F ant

4CCD

F ant/F ant

4CCD

F ant/F ant

4CCD

S0/1-TECT �40:31= � 39:87 �39:92= � 39:48 �39:63= � 39:24 �39:49= � 39:14 �39:44= � 39:14

S0/1-CCDT �61:71= � 61:81 �61:71= � 61:81 �61:71= � 61:81 �61:71= � 61:81 �61:71= � 61:81

GIS-mode PH MES PH MES PH MES PH MES PH MES

GIS LD Hit 23cps/24cps 24cps/29cps 31cps/28cps 26cps/28cps 30cps/25cps

P X Y R S Pos MErr HV HL Gain RT-L RT-U T emp RBMT CalPk RT Pk CalCnt/time

10 8 8 5 0 FLF

| 3/4 48 159 218 15.8 16.3 403.84 184.11

2419cts(K

�

)

Pass: s9305080619 3/4 40 159 218 10.4 421.24 181.23

2333cts(K

�

)

GIS Mo de Changes: no

Battery Condition (min/max)

BA T V{A BA

T V{B BA

T I{A BA

T I{B BA

T T{A BA

T T{B Charge/Discharge

20.40/23.40 20.40/23.50 �4.21/4.73 �4.34/4.76 4.82/8.74 4.82/8.46 1.04/1.05

Comment: QS6?R"

NGC3227 has b een visible in the center of GIS FOV with an intensity larger than 1 mCrab (ab out 0.6

counts/sec/sensor) and a photon index of ab out 1.8. No signi�cant F e-line is seen b oth in the GIS sp ectrum

and in the SIS sp ectrum.

TS7 NGC3227 =Y1&8-.! GIS 6[]Z\^7 photo index 1.8(err 10% ):&) =_-aW‘4 AGN 6

(0*’=-1&8-.!

QS2 KSC =U<*354;8-.!$cb% X/9>+Vd,>2-.! (F.N.)

cb,#> Come back!(Y.Ik eb e)