;=?>< OPERA

TION REPOR

T Ver.1.5

94 B 3 C 23 A Y+ 395/396 KSC @D: EF K : GH: G.Zylstra

A586 ! 4C41.17

P ASS 1 P

ASS 2 P

ASS 3 P

ASS 4 P

ASS 5

Pass No. 940322{1341 940322{1445 940322{1548 940323{0103 940323{0207

Operation X REP

OP/OG WT/CK

ADRS DISCR

OP ST AR T

X REP

SBR A RNG

S-CTLG WT/CK

OBS-MODE

DE-0 ADRS ON

RNG OFF

X REP

BDR STOP

X REP

BDR STOP

X REP X REP

SBR A RNG

DE-0 ADRS OFF

RNG OFF

T arget A586 A586 A586 A586 A586

AOS(UT) 20:22:17 22:02:59 23:44:20 01:26:00 03:07:32

LOS(UT) 20:32:46 22:15:11 23:57:10 01:38:55 03:20:04

Max-El 12.180 41.950 Zenith 78.246 34.710

Time 20:27:29 22:08:34 | 01:31:42 03:13:10

Rep-band(stat.) X ( Completed ) X ( Completed ) X ( Completed ) X ( Completed ) X ( Completed )

Rep-start 20:23:14 22:03:55 23:45:01/23:50:47 01:26:40 03:08:16

DP-mode OBS OBS OBS OBS OBS

ACS-mode Normal{Poin ting Normal{Poin ting Normal{Pointing Normal{Pointing Normal{Pointing

ACS-spn/�

s

�

s

17.85

�

, 170.43

�

17.80

�

, 170.49

�

17.69

�

,170.53

�

17.64

�

, 170.49

�

17.57

�

, 170.44

�

Attitude

2

4

113.3241

58.3281

170.6473

3

5

2

4

113.3237

58.3277

170.6423

3

5

2

4

113.3242

58.3277

170.6439

3

5

2

4

113.3240

58.3275

170.6442

3

5

2

4

113.3240

58.3276

170.6449

3

5

OP-start(CE) 20:23:14 ( 00h ) Cont ( 09h ) Cont ( 13h ) Cont ( 1Dh ) Cont ( 28h )

SIS-mode

Fnt/Fn t

1111/3333

Fnt/Fn t

0123/0123

Fnt/Fnt

0123/0123

Fnt/Fnt

0123/0123

Fnt/Fnt

0123/0123

S0/1-TECT �36:53/�36:47 �36:77/�36:71 �36:72/�36:66 �36:53/�36:51 �36:09/�36:17

S0/1-CCDT �61:53/�61:39 �61:57/�61:34 �61:53/�61:30 �61:38/�61:11 �61:20/�60:83

GIS-mode PH(10-8-8-5-0) PH(10-8-8-5-0) PH(10-8-8-5-0) PH(10-8-8-5-0) PH(10-8-8-5-0)

GIS LD Hit 23cps/23cps 23cps/24cps 25cps/24cps 29cps/27cps 27cps/27cps

P X Y R S Pos MErr HV HL Gain RT-L RT-U T emp RBMT CalPk RT Pk CalCnt/time

10 8 8 5 0 FLF 1 3/4 48 159 218 15.8 16.3 399.91 183.79 1825

Pass: 9403221341 3/4 40 159 218 10.4 444.69 180.89 1567

GIS Mo de Changes: NONE

Battery Condition (min/max)

BA T V{A BA

T V{B BA

T I{A BA

T I{B BA

T T{A BA

T T{B

20.00/23.50 20.10/23.50 �4:08/4.73 �4:25/4.78 4.82/8.74 4.82/8.46

Manoeuvre Op eration

Start Time T arget Name # (� , � ) (�, � , )

03/23 08:15 4C41.17 3 ( 102.7180 , 41.5086 ) ( 102.9888 , 48.4584 , 170.1433 )

Comment: IK29J:

A586, z=0.2 galactic cluster, was detected by SIS (0.2 cts/s). The MEKA sp ectral mo del (T 6 keV), even

with variable abundance, do es not account for excess at 0.63 keV (Iron L line emission?).

NXPN)8( xsp ec ver8.40 7 raimei 1MYOS"W*4*,!Z’6VRW([’ NXPN)83L]1 sp ec-

tral �tting 7 ^0- .&4 +! A586 3 MEKA mo del / kT=6keV ‘ b10 54 *,!4 , IK A80 2 UM Y

QTYO%54*,!#da K$

c_ (\e)