QSUTR OPERA

TION REPOR

T Rev.5 Ver 3.1

94 X 10 Y 07 W Y+ 593/594 KSC VZ: Y.Ogasak a P H.Matsumoto,

H.T omida

NGC1569

P ASS 1 P

ASS 2 P

ASS 3 P

ASS 4 P

ASS 5

Pass No. 941006{1341 941006{1445 941006{1548 941007{0104 941007{0207

Operation X REP

OP/OG-02 WR T

TCU MEM MODE

CPU 2/3 STOP

CPU 2/3 RST

ERRCODE RST

OP ST AR T

X REP

RNG A

CPU 2/3 STOP

CPU 2/3 RST

ACS MODE

OBSER

VE MODE

RNG OFF

X REP

ERRCODE RST

BDR STOP

X REP

BDR STOP

X REP

RNG A

CPU 2/3 STOP

CPU 2/3 RST

GIS MEM MODE

ERRCODE RST

RNG OFF

X REP

T arget

NGC1569 NGC1569 NGC1569 NGC1569 NGC1569

AOS(UT) 20:29:10 22:11:01 23:52:30 01:34:24 03:16:25

LOS(UT) 20:41:54 22:23:25 00:04:56 01:46:15 03:26:31

Max-El 29.062 72.359 Zenith 47.024 14.350

Time 20:35:23 22:16:45 ||{ 01:39:47 03:20:56

Rep-band(stat.) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete )

Rep-start 20:30:30 22:11:41 23:53:20/23:59:12 01:35:03 03:16:58

DP-mode OBS OBS/ACS/OBS OBS OBS OBS

ACS-mode Normal{Poin ting Normal{Poin ting Normal{Pointing Normal{Pointing Normal{Pointing

ACS-spn/�

s

�

s 19.06

19.12, 182.66 19.17, 182.73 19.22, 182.88 19.27, 183.02

Attitude

2

4

67.37315

25.30530

29.39429

3

5

2

4

67.37359

25.30555

29.38960

3

5

2

4

67.37323

25.30497

29.39081

3

5

2

4

67.37205

25.30526

29.39172

3

5

2

4

67.37197

25.30533

29.39192

3

5

OP-start(CE) 20:39:04 ( 00h ) Cont ( 08h ) Cont ( 10h ) Cont ( 18h ) Cont ( 22h )

GIS HAM ERR Error/Reset Error/Reset Normal Normal Normal

ACS ERR (SH)MOMCHG ||{ (SH)MOMCHG (SH)MOMCHG ||{

SIS-mode

F aint/F aint

1111/3333

F aint/F ain t

1111/3333

F aint/F aint

1111/3333

F aint/F aint

1111/3333

F aint/F aint

1111/3333

S0/1-TECT �35:07/�35:10 �35:12/�35:15 �35:32/�35:53 �35:32/�35:44 �35:22/�35:40

S0/1-CCDT �58:84/�58:47 �59:88/�589:56 �59:98/�59:61 �60:17/�59:80 �60:31/�59:98

GIS-mode

PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0)

GIS LD Hit 24cps/24cps 28cps/26cps 31cps/32cps 27cps/24cps 23cps/23cps

P X Y R S Pos MErr HV HL Gain RT-L RT-U T emp RBMT CalPk RT Pk CalCnt/time

10 8 8 5 0 FLF NO

3/4 48 159 218 19.6 19.6 383.56 184.42 126

Pass: 941006-1341 3/4

40 159 218 14.2 402.20 179.94 118

GIS Mo de Changes: None

Battery Condition (min/max)

BA T V{A BA

T V{B BA

T I{A BA

T I{B BA

T T{A BA

T T{B

20.00/23.50 20.00/23.50 �4:16/4.75 �4:43/4.78 4.82/8.74 4.82/8.46

Maneuv er Op eration

Start Time T arget Name # (�, � ) (�, � , )

Comment: [a<L_:

W e are observing NGC1569 for 100 ksec. Counting rates are 0.02 c/sec/GIS and 0.05 c/sec/SIS (including

BGD).

NGC1569 = USJ :<8 QL dkrO=oF?2I!

\a=s< 3 wp;v ?G!~a=m. �3), &(H (9�wg0+ :)"0C*,: )+E/<?? j-7

D*+’;:E:)+9�J4$�c�%!

[a �f! ] |> B)6 3 0 N l B)6 30! �# � M; ) +: +6 3< ,5C6 9 ub $^ , 10 �{ ‘: .

7B69ub%!zBK@ny,)7e0.KA7D+63D+63$�[%

�[q,iF?03!�0x0.:F?1!8B�M,}.:63!�0h0)!$�t%