"$&%# OPERA TION REPOR T Rev.5 V er 3.1 95 ) 6 * 25 ( Y+ 855 KSC ’+ : A. F uruza w a and T. Asan uma NGC4579 ! NGC4552 P ASS 1 P ASS 2 P ASS 3 P ASS 4 P ASS 5 P ass No. 950625{0824 950625{0928 950625{1031 950625{1135 950625{1238 Op eration X REP OP/OG-06 WR T TCU MEM MOD CPU STP/RST ACS ERR RST OP ST AR T X REP SBR-A RNG S-CTLG WT/CK OBSER VE MODE RNG OFF X REP BDR STOP X REP ACS ERR RST BDR STOP X REP SBR-A RNG CPU STP/RST GIS MEM MODE RNG OFF X REP T a rget NGC4579 NGC4579 NGC4579 NGC4579 NGC4579 A OS(UT) 11:59:27 13:41:26 15:22:24 17:04:26 18:45:54 LOS(UT) 12:12:40 13:54:23 15:35:46 17:17:04 18:57:27 Max-El 25.897 66.995 Zenith 56.059 18.798 Time 12:05:46 13:47:04 | 17:10:09 18:51:18 Rep-band(stat.) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete ) Rep-sta rt 12:01:01 13:41:59 15:23:25/15:29:07 17:05:03 18:47:05 DP-mo de OBS OBS OBS OBS OBS A CS-mode Normal{Poin ting Normal{Poin ting Normal{Poin ting Normal{Poin ting Normal{Poin ting SUN-p os � s / � s 0.41/171.25 {/{ {/{ {/{ 0.15/186.12 A ttitude 2 4 189.64411 78.19723 155.87684 3 5 2 4 189.64395 78.19741 155.87603 3 5 2 4 189.64350 78.19741 155.87675 3 5 2 4 189.64347 78.19751 155.87737 3 5 2 4 189.64324 78.19720 155.87388 3 5 OP-sta rt(CE) 12:09:27 ( 00h ) Cont ( 08h ) Cont ( 14h ) Cont ( 1Ch ) Cont ( 24h ) GIS HAM ERR ERR ! NML Normal Normal Normal Normal A CS ERR (SH)MOMCHG Normal (SH) MOMCHG Normal Normal SIS-mo de F ain t/F ain t 0101/2323 F ain t/F ain t 0101/2323 F ain t/F ain t 0101/2323 F ain t/F ain t 0101/2323 F ain t/F ain t 0101/2323 S0/1-TECT � 45 : 11/ � 44 : 92 � 45 : 01/ � 44 : 87 � 44 : 87/ � 44 : 73 � 45 : 01/ � 44 : 92 � 45 : 40/ � 45 : 31 S0/1-CCDT � 61 : 67/ � 61 : 77 � 61 : 67/ � 61 : 77 � 61 : 67/ � 61 : 77 � 61 : 67/ � 61 : 77 � 61 : 67/ � 61 : 77 GIS-mo de PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) GIS LD Hit 22/23 cps 28/30 cps 33/31 cps 34/33 cps 29/28 cps P X Y R S P os MErr HV HL Gain RT-L RT-U T emp RBMT CalPk CalCnt/sec RT Pk 10 8 8 5 0 FLF No 3/4 48 159 218 14.2 14.1 391.24 0.0906 183.75 Pass: 950625-0824 3/4 40 159 218 7.1 415.62 0.0891 181.16 SIS Mo de Changes: F/B 0101/2323 Lvl:o�(NGC4579,NGC4552) GIS Mo de Changes: None Battery Condition (min/max) BA T V{A BA T V{B BA T I{A BA T I{B BA T T{A BA T T{B 20.20/23.20 20.20/23.10 � 4 : 42/4.73 � 4 : 21/4.76 5.10/9.03 9.90/11.07 Maneuv er Op eration Sta rt Time T a rget Name # ( � , � ) ( � , � , ) 6/26 9:50 NGC4552 2 ( 188.9125 , 12.5569 ) ( 189.1223 , 77.4599 , 156.2760 ) Commen t: ,0H!- : NGC4579 was observ ed. The counting rate is � 0.2cts/sec/sensor. SU7 2@ >X \L4 : 4] . ^ H5 / a I !- c f l o Br A A 3 >X: 4 3 4 fW 5/ a H o B\t J B x 6@>X] Iuv?Ce@>XGWn‘;QXZe@>9DqF<E6@>py[ RbKm:@>XkBI 7z{Yz{Ys@A3NHFD4<Ahq6MjE3H?O4XZpy=Hd[ x6@>x6@>X1_i@>X<6<W 10 3 counts TVH high energy tail Px8wNXg_H target ?9BE8 NGC4579 FK2@>XZn‘[