"$&%# OPERA TION REPOR T Rev.5 V er 3.1 1999 ) 09 * 30 ( Y+ 2413 KSC ’+ : S.Kitamoto and N.Isob e GC Reg6 N3 ! GC Reg6 N4 ! PKS1830-211 N5 ! GC Reg6 N5 P ASS 1 P ASS 2 P ASS 3 P ASS 4 P ASS 5 P ass No. 990930{0928 990930{1238 Op eration X-REP SBR-A-RNG OP/OG-07 WR T TCU-MEM OP-ST AR T RNG-OFF (YOHKOH) (YOHKOH) X-REP SBR-A-RNG ST AR-05 WR T S-CTLG-CHK OBSER VE CPU2/3-STOP CPU2/3-RST GIS-MEM RNG-OFF (YOHKOH) T a rget GC Reg6 N3 GC Reg6 N3 A OS(UT) 13:33:56 18:36:21 LOS(UT) 13:46:48 18:48:37 Max-El 32.49 � 43.44 � Time 13:39:58 18:41:54 Rep- band(stat.) X ( Complete ) ( ) ( ) X ( Complete ) ( ) Rep-sta rt 13:34:35 18:37:08 DP-mo de OBS OBS/ACS/GIS/OBS A CS-mode Normal{ Poin ting Normal{ Poin ting SUN-p os � s / � s | 10.38 � / 41.77 � A ttitude 2 6 4 269 : 51184 � 118 : 51125 � 185 : 92939 � 3 7 5 2 6 4 3 7 5 2 6 4 3 7 5 2 6 4 269 : 51224 � 118 : 51055 � 185 : 93010 � 3 7 5 2 6 4 3 7 5 OP-sta rt(CE) 13:43:41 ( 00h ) ( ) ( ) Cont ( 1Bh ) ( ) GIS HAM ERR | ERR ! Reset A CS ERR (SH)MOMCHG ! Reset (SH)MOMCHG SIS-mo de Fn t/Fn t 0101/0101 Fnt/Fn t 0101/0101 S0/1-TECT � 36 : 33 = � 36 : 08 � C � 37 : 50 = � 37 : 15 � C S0/1-CCDT � 61 : 62 = � 61 : 72 � C � 61 : 62 = � 61 : 72 � C GIS-mo de PH(10{8{5{5{ 0) PH(10{8{8{5{ 0) GIS LD Hit 25.1/25.2 c s � 1 25.9/24.1 c s � 1 P X Y R S P os MErr HV HL Gain RT- L RT- U T emp RBMT CalPk CalCnt CalTim RT Pk 10 8 8 5 0 FLF 1 3/4 48 159 218 13.6 14.1 375.26 541 14638 184.21 Pass: 990930{0928 3/4 40 159 218 7.6 404.26 521 14638 180.32 SIS Mo de Changes: GC Reg6 N3 2CCD(0101/0101) F/F, LD OFF/ON(1.1keV), AD OFF GC Reg6 N4 2CCD(0101/0101) F/F, LD OFF/ON(1.1keV), AD OFF PKS1830-211 N5 2CCD(1111/3333) F/F, LD (0.48k eV), AD OFF GC Reg6 N5 2CCD(0101/0101) F/F, LD OFF/ON(1.1keV), AD OFF GIS Mo de Changes: GC Reg6 N3 PH(10{8{8{5{0) GC Reg6 N4 PH(10{8{8{5{0) PKS1830-211 N5 PH(10{8{8{5{0) GC Reg6 N5 PH(10{8{8{5{0) Battery Condition (min/max) BA T V{A BA T V{B BA T I{A BA T I{B BA T T{A BA T T{B 18 : 50 = 23 : 20 18 : 60 = 23 : 30 � 5 : 16 = 4 : 73 � 5 : 55 = 4 : 76 4 : 55 = 8 : 74 4 : 55 = 7 : 61

Maneuv er Op eration Sta rt Time T a rget Name # ( � , � ) ( � , � , ) 09/30 22:10 GC Reg6 N4 6 (269 : 5256, � 28 : 2360) (269 : 7940, 118 : 0772, 186 : 0866) 10/01 03:30 PKS1830-211 N5 1 (278 : 4163, � 21 : 0610) (278 : 6261, 111 : 0037, 177 : 3051) 10/01 09:20 GC Reg6 N5 2 (268 : 0255, � 29 : 4946) (268 : 3024, 119 : 3421, 185 : 2347) Commen t: -/0,. : ASCA observed GC Reg6 N3 and GC Reg6 N4 (PI: S.Y amauc hi (JPN)). The GIS counting rate is � 0.03 cps for the both regions. 36INZ4\]<:AGEV_b Ve<2X[B EV ..... 8RK 3MaLKGH= PBE‘i8N^ jM!h<5K \?U 8IBS9 ;‘ ( c d ) : P@ La j g1 FJ‘ RGH UY K 8GC T_PG E>‘ fj N QGJ 88 AJ 7W L 8 K8‘ ( 8DO )