ACEDB OPERA

TION REPOR

T Ver.1.5

93 I 6 J 8�9 H Y+ 108�109 KSC FK: LG@ ? MN

M87,3C273

P ASS 1 P

ASS 2 P

ASS 3 P

ASS 4 P

ASS 5

Pass No. 930608{1236 930608{1340 930608{1443 930608{1546 930609{0102

Operation X-REP

OPOG-WR T

STC02-WR

T(#6)

OP-STR T

RNG

X-REP

X-REP

BDR-STOP

X-REP

BDR-STOP

X-REP X-REP

T arget

M87 3C273 3C273 3C273 3C273

AOS(UT) 17:51:59 19:33.34 21:15:08 22:56:57 00:38:46

LOS(UT) 18:04:09 19:45:59 21:27:46 23:09:24 00:49:59

Max-El 27.49 72.415 Zenith 47.884 15.749

Time 17:57:41 19:39:06 | 23:02:24 00:43:44

Rep-band X X X X X

Rep-start 17:53:30 19:34:42 21:16:06/21:21:43 22:57:50 00:39:56

Rep-status Completed Completed Interrupted Completed Completed

DP-mode TCU/ACS/OBS OBS OBS OBS OBS

ACS-mode Normal{Poin ting Normal{Poin ting Normal{Pointing Normal{Pointing Normal{Pointing

ACS-spn/�

s |

�

17:81

�

17:76

�

17.68

�

17.60

�

Attitude

2

4

187.391

77.353

152.252

3

5

2

4

187.451

87.972

155.140

3

5

2

4

187.460

87.974

155.141

3

5

2

4

187.456

87.973

155.136

3

5

2

4

187.456

87.973

155.137

3

5

OP-start 17:01:31 Conti. Conti. Conti. Conti.

start CE 00h 0Ch 15h 1Ch 23h

SIS-mode

F aint/F aint

4CCD

F aint/F ain t

1CCD (C1/C3)

F aint/F aint

1CCD (C1/C3)

F aint/F aint

1CCD (C1/C3)

F aint/F aint

1CCD (C1/C3)

S0/1-TECT �38:76/�38:31 �39:19/�38:75 �39:78/�39:38 �40:50/�40:06 �40:84/�40:74

S0/1-CCDT �61:71/�61:81 �61:67/�61:81 �61:67/�61:77 �61:67/�61:81 �61:67/�61:81

GIS-mode

PH MES PH MES PH MES PH MES PH MES

GIS LD Hit 27cps/25cps 27cps/28cps 32cps/26cps 27cps/25cps 25cps/21cps

P X Y R S Pos MErr HV HL Gain RT-L RT-U T emp RBMT CalPk RT Pk CalCnt/time

10 8 8 5 0 FLF

| 3/4 48 159 218 15.8 16.3 401.52 184.05 6643cts

Pass: s9306081236 3/4

40 159 218 10.9 415.71 181.22 6236cts

GIS Mo de Changes: no

Battery Condition (min/max)

BA T V{A BA

T V{B BA

T I{A BA

T I{B BA

T T{A BA

T T{B Charge/Discharge

20.20/23.50 20.20/23.50 �4:25/4.75 �4:38/4.75 4.82/8.74 4.82/8.46 1.042757/1.053685

Manoeuvre Op eration

Start Time T arget Name (�, � ) (�, � , )

06/08 19:00:42 3C273 ( 187.28 , 2.05 ) ( 187.45 , 87.97 , 155.14 )

( , ) ( , , )

( , ) ( , , )

Comment: OR5=Q" 3C273 is in the F.O.V. Counting rates are ab out 6 cts/s/SIS and ab out 3 cts/s/GIS.

Correction : Count rate of M87 was ab out 14 cts/sec/SIS0, not 0.25 cts/sec.

9.7:V C UWV6P;’1+4 )0Z\[]6&:92*9# $8%

S (_!bY<eT!^‘-) 5>/(3cd*, (aX)