EGIHF OPERA

TION REPOR

T Ver.1.5

93 M 6 N 24 L Y+ 124 KSC JO: PK S D QR

CENX-3/VELAX-1

P ASS 1 P

ASS 2 P

ASS 3 P

ASS 4 P

ASS 5

Pass No. 930624{0619 930624{0722 930624{0826 930624{0929 930624{1032

Operation X-REP

OP-OG-WR T

OP-STR T

X-REP

RNG

STC-WR

T-CHK

HAH-ERR-RST

X-REP

BDR-STOP

X-REP

BDR-STOP

X-REP X-REP

RNG

HAM-ERR-RST

T arget

CENX-3 CENX-3 CENX-3 CENX-3

CENX-3/VELAX-

1

AOS(UT) 9:13:45 10:55:19 12:36:42 14:18:38 16:00:30

LOS(UT) 9:25:42 11:08:07 12:49:44 14:31:23 16:12:27

Max-El 15.710 47.410 Zenith 74.963 30.089

Time 9:19:46 11:01:05 | 14:24:29 16:05:58

Rep-band(stat.) X ( Completed ) X ( Completed ) X ( Interrupted ) X ( Completed ) X ( Completed )

Rep-start 9:15:49 10:55:55 12:37:29/12:43:11 14:19:26 16:01:21

DP-mode OBS/TCU/OBS OBS/ACS/OBS OBS OBS OBS

ACS-mode Normal{Poin ting Normal{Poin ting Normal-Pointing Normal{Pointing Normal{Pointing

ACS-spn/�

s 14.77

�

14.73

�

14.72

�

|

�

|

�

Attitude

2

4

170.854

150.573

161.075

3

5

2

4

170.854

150.573

161.074

3

5

2

4

170.853

150.573

161.074

3

5

2

4

170.851

150.573

161.072

3

5

2

4

170.851

150.573

161.072

3

5

OP-start(CE) 9:21:31 ( 00h ) Cont ( 07h ) Cont ( 10h ) Cont ( 18h ) Cont ( 1Fh )

SIS-mode

Bright/Brigh t

1CCD

Bright/Brigh t

1CCD

Bright/Bright

1CCD

F aint/F aint

4CCD

F aint/F aint

4CCD

S0/1-TECT �40:75/�40:74 �40:26/�41:03 �39:87/�39:92 �39:63/�39:67 �39:49/�39:58

S0/1-CCDT �61:71/�61:81 �61:71/�61:81 �61:71/�61:81 �61:71/�61:81 �61:71/�61:81

GIS-mode

PH PH PH PH PH

GIS LD Hit 25cps/26cps 24cps/26cps 32cps/30cps 29cps/31cps 30cps/29cps

P X Y R S Pos MErr HV HL Gain RT-L RT-U T emp RBMT CalPk RT Pk CalCnt/time

10 8 8 5 0 FLF

| 3/4 48 159 218 16.9 17.4 402.22 183.98 2027

Pass: s9306240619 3/4

40 159 218 11.5 415.73 180.99 1886

GIS Mo de Changes: no change

Battery Condition (min/max)

BA T V{A BA

T V{B BA

T I{A BA

T I{B BA

T T{A BA

T T{B Charge/Discharge

20.40/23.40 20.50/23.50 �4:12/4.75 �4:30/4.78 4.82/8.74 4.82/8.46 no data

Manoeuvre Op eration

Start Time T arget Name # (�, � ) (�, � , )

6/25 2:45 VELA X-1 2 ( 135.5383 , -40.5548 ) ( 135.86 , 130.65 , 129.34 )

( , ) ( , , )

( , ) ( , , )

Comment: S [8CW: CEN X-3 8] d9 3counts/s/GIS sensor B5V g>@;l %! GISPLOT 5^4;Y

.,?%8]d!

ourTaf7x634%1iz�8vwstwr(?8�\)_A $<&, OP/OG hm@j’76@0&23

1) +@+@~7$34Vcb@8CW)5*:-1!"kZ S#

1:341qp}e; |U‘8CW;n@ =3,@{?A:/!!!>(31 >(31!"yX#