CEGFD OPERA

TION REPOR

T Ver.1.5

93 K 6 L 25 J Y+ 125 KSC HM: NI S B OP

VELAX-1

P ASS 1 P

ASS 2 P

ASS 3 P

ASS 4 P

ASS 5

Pass No. 930625{0619 930625{0722 930625{0826 930625{0929 930625{1032

Operation X-REP

OP-OG-WR T

OP-STR T

X-REP

RNG

X-REP

BDR-STOP

X-REP

BDR-STOP

X-REP

RNG

X-REP

T arget

VELAX-1 VELAX-1 VELAX-1 VELAX-1 VELAX-1

AOS(UT) 9:12:28 10:54:38 12:35:46 14:18:01 15:59:45

LOS(UT) 9:25:28 11:07:28 12:49:03 14:30:47 16:11:31

Max-El 22.269 60.527 Zenith 62.480 21.944

Time 9:18:57 11:00:25 | 14:23:50 16:05:12

Rep-band(stat.) X ( Completed ) X ( Completed ) X ( Interrupted ) X ( Completed ) X ( Completed )

Rep-start 9:14:34 10:55:09 12:36:53/12:42:38 14:18:46 16:00:52

DP-mode OBS/TCU/OBS OBS OBS OBS OBS

ACS-mode Normal{Poin ting Normal{Poin ting Normal-Pointing Normal{Pointing Normal{Pointing

ACS-spn/�

s 15.34

�

15.4

�

15.45

�

|

�

|

�

Attitude

2

4

135.863

130.654

129.336

3

5

2

4

135.863

130.654

129.341

3

5

2

4

135.863

130.654

129.337

3

5

2

4

135.863

130.654

129.337

3

5

2

4

135.863

130.653

129.337

3

5

OP-start(CE) 9:22:16 ( 00h ) Cont ( 09h ) Cont ( 11h ) Cont ( 19h ) Cont ( 21h )

SIS-mode

Bright/Brigh t

1CCD(c1/c3)

Bright/Brigh t

1CCD(c1/c3)

F aint/F aint

4CCD

F aint/F aint

4CCD

F aint/F aint

4CCD

S0/1-TECT �43:03/�43:83 �43:71/�41:61 �44:38/�44:34 �44:92/�44:97 �45:26/�45:31

S0/1-CCDT �61:71/�61:81 �61:71/�61:86 �61:71/�61:81 �61:71/�61:86 �61:71/�61:86

GIS-mode

PH PH PH PH PH

GIS LD Hit 24cps/24cps 27cps/27cps 31cps/30cps 29cps/30cps 27cps/22cps

P X Y R S Pos MErr HV HL Gain RT-L RT-U T emp RBMT CalPk RT Pk CalCnt/time

10 8 8 5 0 FLF

| 3/4 48 159 218 13.6 13.6 368.85 183.78 2353

Pass: s9306250619 3/4

40 159 218 7.8 421.91 181.42 2219

GIS Mo de Changes: no change

Battery Condition (min/max)

BA T V{A BA

T V{B BA

T I{A BA

T I{B BA

T T{A BA

T T{B Charge/Discharge

20.30/23.50 20.30/23.50 �4:51/4.75 �4:51/4.76 4.82/8.74 4.82/8.46 no data

Manoeuvre Op eration

Start Time T arget Name # (�, � ) (�, � , )

( , ) ( , , )

( , ) ( , , )

( , ) ( , , )

Comment: Q X3 @T: VELA X-1| 3 Zc 8 1-3c/s/sensor *; %#e f lj h3 -7 0 +:&$! bk dn

(4.)<^’/%5,!#img"=^/q\tuz89./6-%oW S$

�X8V?3_ [‘w>Y3@T(Rps<5+-!�2wr!#F e 6.3 keV 08 y2+1%v)a.-�U$

PS.V elaX-1 3 SIS 3]A4SX2{* ~&}x|!