FHJIG OPERA

TION REPOR

T Ver.1.5

93 N 7 O 16 M Y+ 145�146 KSC KP: QRDEL C ST

East of F ornax NGC1399/EX Hya

P ASS 1 P

ASS 2 P

ASS 3 P

ASS 4 P

ASS 5

Pass No. 930715{1546 930716{0101 930716{0205 930716{0308 930716{0412

Operation X-REP

OP-OG-WR T

TCU-MODE

HAM-ERR-RST

OP-STR T

X-REP

RNG

SCT-WR T

OBS-MODE

X-REP

HAM-ERR-RST

BDR-STOP

X-REP

D0-ADRS-ON

BDR-STOP

X-REP

RNG

D0-ADRS-ON

X-REP

T arget

East of F ornax

NGC1399

East of F ornax

NGC1399

East of F ornax

NGC1399

East of F ornax

NGC1399

East of F ornax

NGC1399

AOS(UT) 22:48:54 00:30:26 02:11:28 03:53:27 05:34:58

LOS(UT) 23:00:02 00:42:26 02:24:04 04:05:58 05:46:58

Max-El 14.580 47.353 Zenith 71.805 28.552

Time 22:54:26 00:35:39 | 03:58:55 05:40:23

Rep-band(stat.) X ( Completed ) X ( Completed ) X ( Interrupted ) X ( Completed ) X ( Completed )

Rep-start 22:51:02 00:30:57 02:12:26/02:17:48 03:54:07 05:35:47

DP-mode OBS OBS/ACS/OBS OBS OBS OBS

ACS-mode Normal{Poin ting Normal{Poin ting Normal-Pointing Normal{Pointing Normal{Pointing

ACS-spn/�

s 11.19

�

11.12

�

11.05

�

11.00

�

10.91

�

Attitude

2

4

54.561

125.721

28.031

3

5

2

4

54.561

125.721

28.030

3

5

2

4

54.561

125.721

28.031

3

5

2

4

54.561

125.721

28.030

3

5

2

4

54.561

125.721

28.030

3

5

OP-start(CE) 22:56:32 ( 00h ) Cont ( 09h ) Cont ( 11h ) Cont ( 1Ah ) Cont ( 24h )

SIS-mode

F aint/F aint

4CCD

F aint/F ain t

4CCD

F aint/F aint

4CCD

F aint/F aint

4CCD

F aint/F aint

4CCD

S0/1-TECT �39:24/�38:94 �40:17/�39:87 �40:70/�40:40 �40:65/�41:08 �40:26/�39:96

S0/1-CCDT �61:71/�61:81 �61:71/�61:81 �61:71/�61:81 �61:71/�61:81 �61:71/�61:81

GIS-mode

PH PH PH PH PH

GIS LD Hit 23cps/21cps 24cps/25cps 27cps/29cps 28cps/31cps 31cps/31cps

P X Y R S Pos MErr HV HL Gain RT-L RT-U T emp RBMT CalPk RT Pk CalCnt/time

10 8 8 5 0 FLF

| 3/4 48 159 218 11.5 10.9 412.34 183.55 896

Pass: S9307151546 3/4

40 159 218 5.5 433.50 181.86 780

GIS Mo de Changes: no change

Condition Condition (min/max)

BA T V{A BA

T V{B BA

T I{A BA

T I{B BA

T T{A BA

T T{B Charge/Discharge

20.20/23.40 20.20/23.40 �4:12/4.73 �4:25/4.86 4.82/8.74 4.82/8.46 no go o d time

Manoeuvre Op eration

Start Time T arget Name # (�, � ) (�, � , )

7/16 10:30 EX Hya 1 ( 193.1017 , �29:2489 ) ( 193.304 , 119.270 , 155.398 )

( , ) ( , , )

( , ) ( , , )

Comment: UY 7 A W: Z Y 6@ * \ * F ornax Cluster X 7 cD ^B NGC1399 ? c [- 9 - /!’ 4 5 =7

NGC1404 : 4 +6 SIS 3 81 *= ‘&9 -/! GIS Count rates of NGC1399 is �0.14 cts/s/sensor. GIS

Count rates of NGC1404 is �0.06 cts/s/sensor. SIS Count rates in a whole SIS �eld, which covers NGC1399

and NGC1404 and a part of surrounding intracluster gas, is �5 cts/s/sensor ( particle events have not b een

excluded ). g]_ ijh6*/< f-% giphs ?kolm"n-2+0,%!’d%-9.!#e7$ a);

(9-+2V>5%#bp$!