ACEDB OPERA

TION REPOR

T Ver.1.5

93 I 8 J 27 H Y+ 188 KSC FK: GHL @ MNO

Rapid Burster/Oph Cl. No.2/Oph Cl. No.3

P ASS 1 P

ASS 2 P

ASS 3 P

ASS 4 P

ASS 5

Pass No. 930827{0204 930827{0308 930827{0411 930827{0514 930827{0618

Operation X-REP

OP-OG-WR T

ROG-47,48,49

OP-STR T

X-REP

RNG

SCT-WR T

OBS-MODE

HAM-ERR-RST

X-REP

BDR-STOP

X-REP

BDR-STOP

X-REP X-REP

RNG

HAM-ERR-RST

T arget Rapid Burster Rapid Burster Rapid Burster Rapid Burster Rapid Burster

AOS(UT) 01:54:33 03:35:10 05:16:52 06:58:39 08:40:15

LOS(UT) 02:04:56 03:47:16 05:29:02 07:10:46 08:51:46

Max-El 11.583 39.266 Zenith 79.003 33.504

Time 01:59:42 03:40:54 | 07:04:05 08:45:33

Rep-band(stat.) X ( Completed ) X ( Completed ) X ( Completed ) X ( Completed ) X ( Completed )

Rep-start 01:55:22 03:36:14 05:17:35/05:22:59 06:59:29 08:41:04

DP-mode OBS OBS/ACS/OBS OBS OBS OBS

ACS-mode Normal{Poin ting Normal{Poin ting Normal-Pointing Normal{Pointing Normal{Pointing

ACS-spn/�

s 20.25

�

20.18

�

20.10

�

20.03

�

19.98

�

Attitude

2

4

263.551

123.336

181.182

3

5

2

4

263.551

123.336

181.182

3

5

2

4

263.550

123.336

181.182

3

5

2

4

263.550

123.336

181.182

3

5

2

4

263.550

123.336

181.181

3

5

OP-start(CE) 02:00:31 ( 00h ) Cont ( 08h ) Cont ( 0Fh ) Cont ( 16h ) Cont ( 1Dh )

SIS-mode

Bright/Brigh t

1CCD

Bright/Brigh t

1CCD

Bright/Bright

1CCD

Bright/Bright

1CCD

Bright/Bright

1CCD

S0/1-TECT �39:39/�39:43 �39:63/�39:62 �39:29/�39:28 �38:27/�38:36 �37:06/�37:24

S0/1-CCDT �61:67/�61:77 �61:67/�61:77 �61:67/�61:77 �61:67/�61:77 �61:67/�61:81

GIS-mode

PH PH PH PH PH

GIS LD Hit 24cps/21cps 31cps/29cps 34cps/29cps 37cps/33cps 31cps/29cps

P X Y R S Pos MErr HV HL Gain RT-L RT-U T emp RBMT CalPk RT Pk CalCnt/time

8 6 6 0 0 FLF

{ 3/4 48 159 218 16.4 16.3 397.50 183.85 630

Pass: S9308270204 3/4

40 159 218 10.9 412.72 181.08 547

GIS Mo de Changes: no change

Condition Condition (min/max)

BA T V{A BA

T V{B BA

T I{A BA

T I{B BA

T T{A BA

T T{B Charge/Discharge

20.20/23.40 20.20/23.50 �4:08/4.75 �4:17/4.78 4.82/8.74 4.82/8.46 1.027430/1.052502

Manoeuvre Op eration

Start Time T arget Name # (�, � ) (�, � , )

08/27 15:10 Oph Cl. No.2 3 ( , ) ( 258.31 , 112.94 , 179.40 )

08/27 21:35 Oph Cl. No.3 4 ( , ) ( 258.31 , 113.54 , 179.55 )

( , ) ( , , )

Comment: PW5>T:

W e observed rapid burster to day

. Unfortunately

, it is not active and so faint. W e could not �nd the source at

the exp ected p o osition.

ZW8Q]>T’^. -! rapid burster 6‘ _1(3&.-*2 ahdgc"b5 slow burster &95 burst < iY7/*:!#VW_$

f"b e 6 1 : ; c" b 6 % 3 % ; l k ) 5 = W 1 , -! j R X U m 5 o S n [ n (�; � ) 8 p % 0 ? + % 4!

#qr\$