LNPOM OPERA

TION REPOR

T Ver.1.5

94 S 1 T 22 R Y+ 336 KSC QU: KV J WX

SN1986J ! Ab ell 262, NGC507

P ASS 1 P

ASS 2 P

ASS 3 P

ASS 4 P

ASS 5

Pass No. 940122{0207 940122{0310 940122{0413 940122{0517 940122{0620

Operation X REP

SBR-A RNG

OP/OG-WT/CK

RNG OFF

X REP

SCT WR

T/CHK

BDR STOP

X REP

BDR STOP

X REP

BDR STOP

X REP

BDR STOP

X REP

SBR-A RNG

CPU-2/3 STOP

CPU-2/3 RST

RNG OFF

X REP

T arget

SN1986J SN1986J SN1986J SN1986J SN1986J

AOS(UT) 03:00:35 04:42:12 06:23:57 08:05:46 09:47:53

LOS(UT) 03:13:00 04:54:40 06:36:15 08:17:34 09:57:56

Max-El 34.865 Zenith (79.6) Zenith 38.197 10.769

Time 03:06:32 | | 08:11:03 09:52:09

Rep-band(stat.) X ( Completed ) X ( Completed ) X ( Completed ) X ( Completed ) X ( Incomplete )

Rep-start 03:01:51 04:43:09/04:48:29 06:24:47/06:30:13 08:06:31 09:49:03

DP-mode OBS OBS OBS OBS OBS

ACS-mode Normal{Poin ting Normal{Poin ting Normal{Pointing Normal{Pointing Normal{Pointing

ACS-spn/�

s

�

s

14.30

�

, 180.06

�

14.25

�

, 180.17

�

14.17

�

,180.27

�

14.10

�

, 180.38

�

14.04

�

, 180.48

�

Attitude

2

4

35.869

47.538

-166.296

3

5

2

4

35.869

47.538

-166.296

3

5

2

4

35.869

47.538

-166.296

3

5

2

4

35.869

47.538

-166.296

3

5

2

4

35.869

47.538

-166.296

3

5

OP-start(CE) 03:10:17 ( 00h ) Cont ( 0Ch ) Cont ( 14h ) Cont ( 1Ch ) Cont ( 23h )

SIS-mode

F aint/F aint

0101/2323

F aint/F ain t

0101/2323

F aint/F aint

0101/2323

F aint/F aint

0101/2323

F aint/F aint

0101/2323

S0/1-TECT �40:46/�40:65 �40:21/�40:45 �39:29/�39:67 �38:37/�38:80 �37:69/�38:07

S0/1-CCDT �61:67/�61:77 �61:67/�61:77 �61:67/�61:77 �61:67/�61:77 �61:67/�61:77

GIS-mode PH(10-8-8-5-0) PH(10-8-8-5-0) PH(10-8-8-5-0) PH(10-8-8-5-0) PH(10-8-8-5-0)

GIS LD Hit 26cps/25cps 30cps/26cps 35cps/31cps 23cps/22cps 23cps/25cps

P X Y R S Pos MErr HV HL Gain RT-L RT-U T emp RBMT CalPk RT Pk CalCnt/time

10 8 8 5 0 FLF 0 3/4 48 159 218 19.1 19.1 388.23 184.28 1875

Pass: 940122-0207 3/4

40 159 218 13.1 403.22 180.16 1766

GIS Mo de Changes: none

Battery Condition (min/max)

BA T V{A BA

T V{B BA

T I{A BA

T I{B BA

T T{A BA

T T{B

20.40/23.50 20.40/23.50 �4:16/4.75 �4:21/4.75 4.82/8.74 4.82/8.46

Manoeuvre Op eration

Start Time T arget Name # (� , � ) (�, � , )

01/22 13:00 Ab ell 262 4 ( 28.1975 , 36.1531 ) ( 28.387 , 53.711 , -156.891 )

01/23 03:25 NGC 507 5 ( 20.9157 , 33.2565 ) ( 21.035 , 56.495 , -170.528 )

Comment: Y‘8H^:

SN 1986J (Galaxy

, US) was detected at a count rate of 0.04 c/s with a prominent emission line at 6.7 keV

(GIS2+3).

cdgf3 GIS Hamming Error )n/4h12 CPU Reset/Start -/) 5& > aoj8sk8_C)-

:@*x|,C6(1//=8wb3 Ham. Err 9l9n2%6(1/?&0![‘8~r)?+C: i�q

;t�79%A7n(+B\}!"Iy#

cegf3 X-REP ) Incomplete 7’D12 -<1/!zm8 ?A7?12{ v8gf01/ 87.... 6 F46

*vZ)G%!<$ [‘8‘]‘7ru�pE-<.!"%+0#