EGIHF OPERA

TION REPOR

T Ver.1.5

94 L 5 M 3 K Y+ 437 KSC JN: M. Ishida D K. Kikuchi, K. Asai

PG1634+706 ! 3C295

P ASS 1 P

ASS 2 P

ASS 3 P

ASS 4 P

ASS 5

Pass No. 940503{0101 940503{0204 940503{0308 940503{0411 940503{0515

Operation X REP

OP/OG WT/CK

ACS ERR RST

OP ST AR T

X REP

SBR-A RNG

S-CTLG WT/CK

GIS CPU STP

GIS CPU RST

OBSER

VE MODE

RNG OFF

X REP

GIS CPU STP

GIS CPU RST

BDR STOP

X REP

BDR STOP

X REP

GIS CPU STP

GIS CPU RST

GIS MEM MODE

X REP

SBR-A RNG

RNG OFF

T arget PG1634+706 PG1634+706 PG1634+706 PG1634+706 PG1634+706

AOS(UT) 00:16:42 01:57:34 03:38:46 05:20:24 07:01:55

LOS(UT) 00:27:14 02:09:18 03:51:18 05:32:45 07:14:08

Max-El 12.380 42.233 Zenith 76.384 32.153

Time 00:21:50 02:02:56 | 05:25:58 07:07:23

Rep-band(stat.) X ( Completed ) X ( Completed ) X ( Completed ) X ( Completed ) X ( Completed )

Rep-start 00:17:32 01:58:30 03:40:02/03:45:26 05:21:26 07:02:48

DP-mode OBS OBS/ACS/OBS OBS OBS OBS

ACS-mode Normal{Poin ting Normal{Poin ting Normal{Pointing Normal{Pointing Normal{Pointing

ACS-spn/�

s

�

s

5.34

�

,251.46

�

5.38

�

, 251.90

�

5.62

�

, 252.15

�

5.51

�

, 252.31

�

5.56

�

, 252.48

�

Attitude

2

4

248.5258

19.6921

57.4105

3

5

2

4

248.5248

19.6921

57.4112

3

5

2

4

248.5248

19.6922

57.4111

3

5

2

4

248.5248

19.6923

57.4112

3

5

2

4

248.5246

19.6923

57.4112

3

5

OP-start(CE) 00:23:27 ( 00h ) Cont ( 08h ) Cont ( 10h ) Cont ( 18h ) Cont ( 20h )

SIS-mode

F aint/F aint

0101/2323

F aint/F ain t

0101/2323

F aint/F aint

0101/2323

F aint/F aint

0101/2323

F aint/F aint

0101/2323

S0/1-TECT �36:09/�36:22 �36:33/�36:56 �36:48/�36:71 �35:75/�35:98 �32:52/�35:40

S0/1-CCDT �60:45/�60:08 �61:01/�60:64 �61:53/�61:16 �61:62/�61:48 �61:62/�61:48

GIS-mode PH(10-8-8-5-0) PH(10-8-8-5-0) PH(10-8-8-5-0) PH(10-8-8-5-0) PH(10-8-8-5-0)

GIS LD Hit 21cps/22cps 26cps/26cps 32cps/31cps 32cps/30cps 29cps/26cps

P X Y R S Pos MErr HV HL Gain RT-L RT-U T emp RBMT CalPk RT Pk CalCnt/time

10 8 8 5 0 FLF 1 3/4 48 159 218 15.3 9.8 388.00 184.20 3879

Pass: 9405030101 3/4

40 159 218 9.8 404.88 180.20 3488

GIS Mo de Changes: 10-8-8-5-0-0

Battery Condition (min/max)

BA T V{A BA

T V{B BA

T I{A BA

T I{B BA

T T{A BA

T T{B

20.00/23.50 20.00/23.50 �4:16/4.75 �4:08/4.76 4.82/8.74 4.82/8.46

Manoeuvre Op eration

Start Time T arget Name # (� , � ) (�, � , )

05/03 13:30 3C295 1 ( 212.8355 , 52.2027 ) ( 213.0518 , 37.97245 , 103.2999 )

Comment: PG1634+706 is detected at 0.03 c/s/GIS and 0.04c/s/SIS. The sp ectrum is �tted well by a p ow er-

law of � = 1.7 with negligible absorption.

O S 5 A R: @ V Q 4 ACS 5 X a" Y" ^ (SH)MOMCHG < b [\ ] + 7 + -! 3 = ’ P S AGN 5 e i 0 2

;8*;8jU5m3% photon index = 1.7 1%&lC0n)/)7+-! (gp)

rS6 s_ZW uq4fo k(Td!t_ Z’:9./ 8:%7+ -(fok5 B>‘\]6 8&cv0,! #h

?$

OK 0",!#fo$