EGIHF OPERA

TION REPOR

T Ver.1.5

94 L 5 M 20 K Y+ 454 KSC JN: R.F ujimoto D K.Mutoh

PKS2155-304 ! A1204 ! K416

P ASS 1 P

ASS 2 P

ASS 3 P

ASS 4 P

ASS 5

Pass No. 940520{1134 940520{1238 940520{1341 940520{1444 940520{1548

Operation X REP

SBR-A RNG

OP/OG-6

TCU MEM MODE

OP ST AR T

RNG OFF

X REP

SCT WR

T/CHK

OBSER

VE MODE

X REP

BDR STOP

X REP

BDR STOP

X REP

SBR-A RNG

CPU2/3 STOP

CPU2/3 RST

GIS MEM MODE

RNG OFF

X REP

T arget PKS2155-304 PKS2155-304 PKS2155-403 PKS2155-304 PKS2155-304

AOS(UT) 16:49:00 18:30:34 20:12:30 21:54:23 23:36:42

LOS(UT) 17:02:22 18:43:58 20:25:32 22:06:41 23:46:54

Max-El 34.207 77.582 Zenith 43.919 13.148

Time 16:55:23 18:36:50 | 22:00:01 23:41:07

Rep-band(stat.) X ( Completed ) X ( Completed ) X ( Completed ) X ( Completed ) X ( Completed )

Rep-start 16:50:25 18:31:35 20:13:16/20:19:04 21:55:06 23:37:14

DP-mode OBS/TCU/OBS OBS/ACS/OBS OBS OBS/GIS/OBS OBS

ACS-mode Normal{Poin ting Normal{Poin ting Normal{Pointing Normal{Pointing Normal{Pointing

ACS-spn/�

s

�

s

8.76

�

, 156.45

�

8.87

�

, 156.56

�

8.93

�

, 156.54

�

8.97

�

, 156.67

�

9.03

�

, 156.65

�

Attitude

2

4

329.5352

120.3581

21.9404

3

5

2

4

329.5355

120.3583

21.9405

3

5

2

4

329.5358

120.3582

21.9407

3

5

2

4

329.2621

122.2939

21.6670

3

5

2

4

329.5355

120.3584

21.9404

3

5

OP-start(CE) 16:59:25 ( 00h ) Cont ( 08h ) Cont ( 10h ) Cont ( 18h ) Cont ( 20h )

SIS-mode

F aint/F aint

1111/3333

F aint/F ain t

1111/3333

F aint/F aint

1111/3333

F aint/F aint

1111/3333

F aint/F aint

1111/3333

S0/1-TECT �37:59/�37:68 �37:89/�37:92 �38:47/�38:46 �39:24/�39:19 �39:87/�39:77

S0/1-CCDT �61:67/�61:77 �61:62/�61:77 �61:67/�61:77 �61:67/�61:77 �61:67/�61:77

GIS-mode PH(10-8-8-5-0) PH(10-8-8-5-0) PH(10-8-8-5-0) PH(10-8-8-5-0) PH(10-8-8-5-0)

GIS LD Hit 25cps/27cps 29cps/29cps 33cps/33cps 33cps/34cps 25cps/26cps

P X Y R S Pos MErr HV HL Gain RT-L RT-U T emp RBMT CalPk RT Pk CalCnt/time

10 8 8 5 0 FLF NONE

3/4 48 159 218 14.7 9.3 399.14 183.70 1184

Pass: 9405201134 3/4 40 159 218 9.3 416.68 181.00 1067

GIS Mo de Changes: 10-8-8-5-0-0

Battery Condition (min/max)

BA T V{A BA

T V{B BA

T I{A BA

T I{B BA

T T{A BA

T T{B

20.00/23.40 20.00/23.50 �4:42/4.75 �4:55/4.78 4.82/8.74 4.82/8.46

Commen t: OS5CQ:

W e keep observing PKS2155-403 (PI:Kii). Minimum countrate of GIS to day is 1.5 c/s (R < 16 ch), less than

half of the maximum yesterda y . There seems to b e an anti-corriration b etween the sp ectral index and the ux.

SIS countrate (all passes data integrated) is 6.2 c/s (s0c1) and 4.8 c/s (s1c3), which is also smaller than that

of yesterday .

VW6&Z:3 -!<1)?^+ .2_(9-! 3;PS5 VU6/A/ A‘(b,2 a]5[XB ,4*@74 >

4$! (RO)

(=%6 $A$A4\8T12 &;,A’103-!"YR#