IKMLJ OPERA

TION REPOR

T Ver.1.5

94 P 5 Q 23 O Y+ 457 KSC NR: Y.Kamata, R.F ujimoto H K.Mutoh

MS1248.7+5706 ! HD129333

P ASS 1 P

ASS 2 P

ASS 3 P

ASS 4 P

ASS 5

Pass No. 940523{1031 940523{1134 940523{1237 940523{1341 940523{1444

Operation X REP

OP/OG WR T

TCU MEM MODE

CPU2/3 STOP

CPU2/3 RST

ERRCODE RST

OP ST AR T

X REP

SBR-A RNG

SCT WR

T/CHK

OBSER

VE MODE

RNG OFF

X REP

BDR STOP

X REP

BDR STOP

X REP

SBR-A RNG

CPU2/3 STOP

CPU2/3 RST

GIS MEM MODE

RNG OFF

X REP

T arget MS1248.7+5706 MS1248.7+5706 MS1248.7+5706 MS1248.7+5706 MS1248.7+5706

AOS(UT) 15:00:30 16:42:36 18:23:51 20:05:46 21:47:32

LOS(UT) 15:13:40 16:55:40 18:37:17 20:18:37 21:59:06

Max-El 27.099 68.869 Zenith 54.946 18.509

Time 15:07:00 16:48:24 | 20:11:40 21:52:53

Rep-band(stat.) X ( Completed ) X ( Completed ) X ( Completed ) X ( Completed ) X ( Completed )

Rep-start 15:02:17 16:43:25 18:24:43/18:30:27 20:06:33 21:48:41

DP-mode OBS/TCU/OBS OBS/ACS/OB OBS OBS/GIS/OBS OBS

ACS-mode Normal{Poin ting Normal{Poin ting Normal{Pointing Normal{Pointing Normal{Pointing

ACS-spn/�

s

�

s

-

�

, -

�

7.57

�

, 112.86

�

7.51

�

, 112.84

�

7.43

�

, 112.88

�

7.37

�

, 112.86

�

Attitude

2

4

193.1021

33.2380

140.3222

3

5

2

4

193.1015

33.2380

140.3232

3

5

2

4

193.1008

33.2378

140.3234

3

5

2

4

193.1001

33.2381

140.3238

3

5

2

4

193.1010

33.2382

140.3229

3

5

OP-start(CE) 15:10:51 ( 00h ) Cont ( 09h ) Cont ( 12h ) Cont ( 1Bh ) Cont ( 24h )

SIS-mode

F aint/F aint

0101/2323

F aint/F ain t

0101/2323

F aint/F aint

0101/2323

F aint/F aint

0101/2323

F aint/F aint

0101/2323

S0/1-TECT �41:72/�41:67 �42:06/�42:02 �42:15/�42:05 �42:93/�42:88 �43:71/�43:66

S0/1-CCDT �61:67/�61:77 �61:67/�61:77 �61:67/�61:81 �61:67/�61:81 �61:67/�61:81

GIS-mode PH(10-8-8-5-0) PH(10-8-8-5-0) PH(10-8-8-5-0) PH(10-8-8-5-0) PH(10-8-8-5-0)

GIS LD Hit 25cps/24cps 25cps/28cps 29cps/31cps 30cps/28cps 25cps/22cps

P X Y R S Pos MErr HV HL Gain RT-L RT-U T emp RBMT CalPk RT Pk CalCnt/time

10 8 8 5 0 FLF NONE

3/4 48 159 218 15.8 15.2 394.81 183.93 3352

Pass: 9405231031 3/4

40 159 218 9.8 412.43 180.70 3109

GIS Mo de Changes: 10-8-8-5-0-0

Battery Condition (min/max)

BA T V{A BA

T V{B BA

T I{A BA

T I{B BA

T T{A BA

T T{B

20.10/23.40 20.10/23.50 �4:25/4.73 �4:38/4.76 4.82/8.74 4.82/8.17

Manoeuvre Op eration

Start Time T arget Name # (� , � ) (�, � , )

05/24 12:35 HD129333 1 ( 219.7496 , 64.2922 ) ( 220.0496 , 25.8678 , 108.7046 )

Comment: SX7DV:

W e observed MS1248.7+5706, an AGN( PI:Elvis). Observed count rate is 0.018 cnts/sis0. The temp erature

of SIS is now very low and stable. ^_8 ESJ 3-73 QL eG8 SSOC Ba68 F

AX ,9.A!

^X8 fkhT7fgoq6d*+?>4&’stY@,2,9&9,/!‘;=v)Zu"$nW%

+;’5<! (WS)

^X8 r] z6w ?2 cF :\& 4{ cU p3 8[12 &/ ( KSC 8y sC3 jm l#i 8E 7x01 /!$b

|%