=?A@> OPERA

TION REPOR

T Ver.1.5

94 D 6 E 02 C Y+ 467 KSC BF: Y.Kamata, < K.Kinugasa

V ela SNR ! HCG51

P ASS 1 P

ASS 2 P

ASS 3 P

ASS 4 P

ASS 5

Pass No. 940602{0620 940602{0826 940602{0930 940602{1033 940602{1137

Operation X REP

OP/OG 01

TCU MEM

OP STR T

X REP

SBR-A RNG

ST AR 04 RAM

S-CTLG CHK

OBS MODE

RNG OFF

X REP

BDR STOP

X REP

BDR STOP

X REP

SBR-A RNG

CPU2/3 STOP

CPU2/3 RST

GIS MEM MODE

RNG OFF

X REP

T arget

V ela SNR V ela SNR V ela SNR V ela SNR V ela SNR

AOS(UT) 09:34:12 11:15:21 12:56:19 14:38:11 16:19:42

LOS(UT) 09:45:21 11:27:36 13:09:21 14:51:01 16:32:02

Max-El 15.107 48.520 Zenith 73.090 30.242

Time 09:39:37 11:20:44 | 14:43:55 16:25:21

Rep-band(stat.) X ( Completed ) X ( Completed ) X ( Completed ) X ( Completed ) X ( Completed )

Rep-start 09:34:52 11:16:24 12:57:22/13:02:56 14:39:04 16:20:34

DP-mode OBS/TCU/OBS OBS/ACS/OBS OBS OBS/GIS/OBS OBS

ACS-mode Normal{Poin ting Normal{Poin ting Normal{Pointing Normal{Pointing Normal{Pointing

ACS-spn/�

s

�

s

4,54

�

, 54.28

�

4.60

�

, 54.39

�

4.67

�

, 54.25

�

-

�

, -

�

-

�

, -

�

Attitude

2

4

134.721

131.899

150.370

3

5

2

4

134.720

131.899

150.368

3

5

2

4

134.720

131.899

150.369

3

5

2

4

134.721

131.899

150.370

3

5

2

4

134.720

131.898

150.369

3

5

OP-start(CE) 09:41:58 ( 00h ) Cont ( 0Ah ) Cont ( 14h ) Cont ( 1Eh ) Cont ( 28h )

SIS-mode

F aint/F aint

0123/0123

F aint/F ain t

0123/0123

F aint/F aint

0123/0123

F aint/F aint

0123/0123

F aint/F aint

0123/0123

S0/1-TECT �44:24/�44:24 �44:19/�44:24 �44:34/�44:44 �44:58/�44:66 �44:68/�44:82

S0/1-CCDT �61:71/�61:81 �61:71/�61:81 �61:71/�61:81 �61:71/�61:81 �61:71/�61:81

GIS-mode PH(10-8-8-5-0) PH(10-8-8-5-0) PH(10-8-8-5-0) PH(10-8-8-5-0) PH(10-8-8-5-0)

GIS LD Hit 21cps/22cps 28cps/23cps 28cps/30cps 30cps/30cps 26cps/26cps

P X Y R S Pos MErr HV HL Gain RT-L RT-U T emp RBMT CalPk RT Pk CalCnt/time

10 8 8 5 0 FLF NONE 3/4 48 159 218 13.1 13.1 399.92 183.68 1090

Pass: 9406020620 3/4

40 159 218 6.5 423.35 181.21 1047

GIS Mo de Changes: 10-8-8-5-0-0

Battery Condition (min/max)

BA T V{A BA

T V{B BA

T I{A BA

T I{B BA

T T{A BA

T T{B

20.30/23.40 20.40/23.50 �4:08/4.73 �4:04/4.76 4.82/8.74 4.82/8.46

Manoeuvre Op eration

Start Time T arget Name # (� , � ) (�, � , )

06/03 04:35 HCG51 4 ( 170.601 , 24.297 ) ( 170.827 , 65.696 , 162.745 )

Comment: HL0;J:

W e observed V ela SNR(PI:Tsunemi, JPN). Observed count rate of V ela SNR is 0.17 c/s/sis0 and 0.013 c/s/gis.

The temp erature of SIS is still very low and stable(<-61 deg). *6*6 V ela 1P’.’ +!IL0 HCG51 &Q

(3/)!#ST$UL KM:0 A V"W/ O75GX8N-,4%2(+!#9R$