GIKJH OPERA

TION REPOR

T Rev.5 Ver 3.1

94 N 7 O 14 M Y+ 509 KSC LP: H.Tsunemi F A.Y amashita,

M.Ozaki

A3558 ! PKS1209-52

P ASS 1 P

ASS 2 P

ASS 3 P

ASS 4 P

ASS 5

Pass No. 940714{0927 940714{1030 940714{1134 940714{1237 940714{1341

Operation X REP

OP/OG-03

TCU MEM

OP STR T

ACS ERR RST

X REP

RNG

ST AR-01 (#2)

S-CTLG CHK

OBSREVE MODE

RNG OFF

X REP

BDR STOP

X REP

BDR STOP

X REP

SBR-A RNG

CPU2/3 STOP

CPU2/3 RST

GIS MEM MODE

RNG OFF

X REP

ADD DISC 0 ON

T arget

A3558 A3558 A3558 A3558 A3558

AOS(UT) 13:15:28 14:57:25 16:38:13 18:20:12 20:01:28

LOS(UT) 13:27:20 15:09:16 16:51:08 18:32:37 20:13:34

Max-El 18.684 56.701 Zenith 62.973 23.070

Time 13:21:24 15:02:34 | 18:25:38 20:06:56

Rep-band(stat.) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete )

Rep-start 13:17:04 14:58:06 16:39:24/16:44:34 18:21:06 20:02:46

DP-mode OBS OBS/ACS/OBS OBS OBS OBS

ACS-mode Normal{Poin ting Normal{Poin ting Normal{Pointing Normal{Pointing Normal{Pointing

ACS-spn/�

s

�

s night night night

10.4, 201.1 10.25, 200.91

Attitude

2

4

202.301

121.465

156.743

3

5

2

4

202.300

121.475

156.742

3

5

2

4

202.300

121.465

156.745

3

5

2

4

202.301

121.465

156.743

3

5

2

4

202.301

121.465

156.743

3

5

OP-start(CE) 13:24:10 ( 00h ) Cont ( 0Ah ) Cont ( 14h ) Cont ( 1Eh ) Cont ( 28h )

GIS HAM ERR NORMAL NORMAL NORMAL NORMAL NORMAL

ACS ERR (SH)MOMCHG | | | |

SIS-mode

F aint/F aint

0123/2301

F aint/F ain t

0123/2301

F aint/F aint

0123/2301

F aint/F aint

0123/2301

F aint/F aint

0123/2301

S0/1-TECT �43:17/�43:12 �43:07/�42:98 �43:12/�43:08 �43:51/�43:46 �43:90/�43:85

S0/1-CCDT �61:67/�61:81 �61:67/�61:81 �61:67/�61:81 �61:67/�61:77 �61:67/�61:77

GIS-mode

PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0)

GIS LD Hit 26cps/26cps 28cps/30cps 30cps/29cps 29cps/28cps 27cps/25cps

P X Y R S Pos MErr HV HL Gain RT-L RT-U T emp RBMT CalPk RT Pk CalCnt/time

10 8 8 5 0 FLF NONE

3/4 48 159 218 15.8 15.8 398.40 183.74 1085

Pass: 9407140927 3/4

40 159 218 9.8 416.15 181.01 1017

GIS Mo de Changes: 10{8{8{5{0{0

Battery Condition (min/max)

BA T V{A BA

T V{B BA

T I{A BA

T I{B BA

T T{A BA

T T{B

20.40/23.50 20.40/23.50 �4:21/4.73 �4:21/4.76 4.82/8.74 4.82/8.17

Manoeuvre Op eration

Start Time T arget Name # (� , � ) (�, � , )

07/15 00:10 PKS1209{522 2 ( 182.974 , -52.605 ) ( 183.442 , 142.595 , 154.566 )

Comment: QX:CW:

A3558 shows 0.80 cnts s

�1

SIS

�1

and 0.55 cnts s

�1

GIS

�1

. A very weak source was seen in the North-west of

A3558.

CCD :D[;S]8.!a:7+B \5bY:Vf! (cd)

7*9S](8*5‘06/!+A’?>1%37j$:6/(! (eE A)

^lg;Uh6/!_T_R6,4,7kZ<m@=/!i42#" (&-))