GIKJH OPERA

TION REPOR

T Rev.5 Ver 3.1

94 N 7 O 10 M Y+ 510 KSC LP: T.Kotani F M.Ozaki

NGC 3923/HG 28 ! NGC 4038/9

P ASS 1 P

ASS 2 P

ASS 3 P

ASS 4 P

ASS 5

Pass No. 940710{1031 940710{1134 940710{1237 940710{1341 940710{1444

Operation X REP

OP/OG-14 RAM

TCU MEM

ST AR-03 (#4)

S-CTLG CHK

OBSER

VE MODE

DE-0 ADRS ON

CPU 2/3 STP/RST

ACS ERR RST

OP STR T

X REP

SBR-A RNG

DE-0 ADRS OF

RNG OFF

X REP

BDR STOP

X REP

BDR STOP

X REP

SBR-A RNG

CPU2/3 STOP

CPU2/3 RST

GIS MEM MODE

RNG OFF

X REP

CPU 2/3 STOP

CPU 2/3 RST

T arget

NGC 3923/

HG 28

NGC 4038/9 NGC 4038/9 NGC 4038/9 NGC 4038/9

AOS(UT) 15:06:20 16:48:17 18:29:03 20:11:05 21:52:27

LOS(UT) 15:18:30 17:00:46 18:42:17 20:24:06 22:04:54

Max-El 18.241 58.593 Zenith 65.859 25.125

Time 15:12:27 16:53:38 | 20:16:46 21:58:07

Rep-band(stat.) X ( Completed ) X ( Completed ) X ( Completed ) X ( Completed ) X ( Completed )

Rep-start 15:08:38 16:49:18 18:30:18/18:35:50 20:12:08 21:53:38

DP-mode

OBS/TCU/

ACS/OBS

OBS OBS OBS OBS

ACS-mode Normal{Poin ting Normal{Poin ting Normal{Pointing Normal{Pointing Normal{Pointing

ACS-spn/�

s

�

s night

9.66, 1.30 9.71, 1.13 9.76, 1.28 9.86, 1.41

Attitude

2

4

3177.98308

118.85438

147.06158

3

5

2

4

180.659

108.908

152.502

3

5

2

4

180.660

108.908

152.502

3

5

2

4

180.659

108.908

152.502

3

5

2

4

180.660

108.908

152.502

3

5

OP-start(CE) 15:15:15 ( 00h ) Cont ( 0Dh ) Cont ( 17h ) Cont ( 1Fh ) Cont ( 27h )

GIS HAM ERR ERR NORM NORM ERR ERR

ACS ERR (SH)MOMCHG | | | |

SIS-mode

F aint/F aint

0123/2301

F aint/F ain t

0101/2323

F aint/F aint

0101/2323

F aint/F aint

0101/2323

F aint/F aint

0101/2323

S0/1-TECT �42:83/�42:69 �43:37/�43:22 �43:71/�43:56 �44:29/�44:14 �44:92/�44:78

S0/1-CCDT �61:71/�61:81 �61:71/�61:81 �61:71/�61:88 �61:71/�61:81 �61:67/�61:77

GIS-mode

PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0)

GIS LD Hit 23cps/23cps 24cps/25cps 28cps/27cps 27cps/27cps 25cps/24cps

P X Y R S Pos MErr HV HL Gain RT-L RT-U T emp RBMT CalPk RT Pk CalCnt/time

10 8 8 5 0 FLF NONE

3/4 48 159 218 12.5 12.5 404.49 183.76 1155

Pass: 9407101031 3/4

40 159 218 6.0 426.32 181.48 1037

GIS Mo de Changes: 10{8{8{5{0{0

Battery Condition (min/max)

BA T V{A BA

T V{B BA

T I{A BA

T I{B BA

T T{A BA

T T{B

20.10/23.40 20.10/23.50 �4:34/4.73 �4:43/4.76 4.82/8.74 4.82/8.17

Manoeuvre Op eration

Start Time T arget Name # (� , � ) (�, � , )

07/10 15:26 NGC 4038/9 4 ( 180.4696 , -18.8650 ) ( 180.659 , 108.907 , 152.502 )

Comment: QSDER:

NGC 3923/HG 28 is very dim. The count rate is 0.01 cnts s

�1

GIS

�1

. In addition, most of the data were downloaded at DSN

stations, so the exp osure time for quick-analysis is to o short.

UCV^6BZ3/! _caX79 e T=d"‘",A=# *:@i<[.6 (?8BZ3. 2!Yf$+43/! 5%1 F

AX 3)6$4 9$

%=88 QL 9b"a(k*n&0\h3/!Wg7jl.;.>%! (’-))

3=m,A(]7;.2! (op)