NPRQO OPERA

TION REPOR

T Rev.5 Ver 3.1

94 U 7 V 22 T Y+ 517 KSC SW: H.Tsunemi M A.Y amashita

IRAS15307+325 ! MCG-6-30-15

P ASS 1 P

ASS 2 P

ASS 3 P

ASS 4 P

ASS 5

Pass No. 940722{0620 940722{0723 940722{0826 940722{0930 940722{1033

Operation NO CONT A CT

TRANSFER TO

YOHKOH

X REP

RNG

ACE ERR RST

RAM/RAM

TCU MEM MODE

OP ST AR T

RNG OFF

X REP

CPU 2/3 STOP

CPU 2/3 RST

RAM (ST

AR04)

S-CTLG (#3)

BDR STOP

X REP

BDR STOP

X REP

RNG

RNG OFF

X REP

OP STOP

RAM/RAM

TCU MEM MODE

CPU 2/3 STOP

CPU 2/3 RST

GIS MEM MODE

OP ST AR T

T arget IRAS15307+325 IRAS15307+325 IRAS15307+325 IRAS15307+325 IRAS15307+325

AOS(UT) {:{:{ 11:15:05 12:56:04 14:38:04 16:19:29

LOS(UT) {:{:{ 11:27:06 13:08:46 14:50:10 16:30:44

Max-El 61.060 Zenith 57.695 19.363

Time {:{:{ 11:20:27 | 14:43:28 16:24:41

Rep-band(stat.) ( ) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete )

Rep-start {:{:{ 11:15:46 12:57:11/13:02:41 14:38:58 16:20:29

DP-mode OBS OBS/ACS/OBS OBS OBS

ACS-mode Normal{Poin ting Normal{Pointing Normal{Pointing Normal{Pointing

ACS-spn/�

s

�

s

6.50, 203.36 6.48, 204.17 night night

Attitude

2

4

3

5

2

4

233.4209

57.3302

148.4963

3

5

2

4

233.4209

57.3302

148.4964

3

5

2

4

233.4207

57.3301

148.4964

3

5

2

4

233.4201

57.3301

148.4970

3

5

OP-start(CE) {:{:{ ( ) 11:24:24 ( 00h ) Cont ( 08h ) Cont ( 10h ) 16:27:31 ( 00h )

GIS HAM ERR NORMAL ERROR NORMAL ERROR

ACS ERR (SH)MOMCHG | | |

SIS-mode

F aint/F ain t

1111/3333

F aint/F aint

1111/3333

F aint/F aint

1111/3333

F aint/F aint

1111/3333

S0/1-TECT �43:12/�42:93 �43:12/�42:88 �43:12/�42:93 �43:32/�43:12

S0/1-CCDT �61:67/�61:81 �61:67/�61:81 �61:67/�61:81 �61:67/�61:81

GIS-mode

PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0)

GIS LD Hit 25cps/27cps 28cps/30cps 34cps/30cps 26cps/25cps

P X Y R S Pos MErr HV HL Gain RT-L RT-U T emp RBMT CalPk RT Pk CalCnt/time

10 8 8 5 0 FLF NONE

3/4 48 159 218 13.6 13.6 399.27 183.67 3040

Pass: 940722062023 3/4

40 159 218 7.6 422.03 181.17 2849

GIS Mo de Changes: 10{8{8{5{0

Battery Condition (min/max)

BA T V{A BA

T V{B BA

T I{A BA

T I{B BA

T T{A BA

T T{B

20.20/23.50 20.20/23.50 �4:08/4.73 �4:17/4.76 4.82/8.74 4.82/8.46

Maneuv er Op eration

Start Time T arget Name # (� , � ) (�, � , )

07/23 04:10 MCG-6-30-15 3 ( 203.9739 , -34.2960 ) ( 204.2212 , 124.3047 , 158.8798 )

Comment: X ];J [: IRAS15307+325 is clearly seen ab ove the background level. A big typho on is ap-

proaching to KSC. W e rewrite the OP in the pass 5 to cover the next three days. W e will try tomorrow, although we may have a heavy rain storm tomorrow. People here put plastic sheets on the WS, receiver etc.

There may b e some water leak from the ro of.....

IRAS15307+325 <_’9f&4$=0( !ik(cj$4$E;5 mqut5 OP Hv)‘&=.2!,

F5 Z]px5)8+4> rY;ag<dh5)=0! (wy)

IRAS15307+325 < SIS 5 <7 ,9 $E; @C! l; 6, Gi k< zes" t; B% 50 ( 7 %8 E; 5.A%

:!I^#3-DL*b34.=32D.4!7%8E9.4> ik(\E;<o;1$/?8$33! (nK A)