FHJIG OPERA

TION REPOR

T Rev.5 Ver 3.1

94 M 7 N 26 L Y+ 521 KSC KO: S.Kitamoto E A.Y amashita,

K.Matsuzaki

MCG-6-30-15

P ASS 1 P

ASS 2 P

ASS 3 P

ASS 4 P

ASS 5

Pass No. 940726{0516 940726{0619 940726{0723 940726{0826 940726{0929

Operation X REP

OP-07 OG-07

TCU MEM MODE

OP ST AR T

X REP

RNG

CPU 2/3 STP

CPU 2/3 RST

RNG OFF

X REP

BDR STOP

X REP

BDR STOP

X REP

RNG

CPU 2/3 STOP

CPU 2/3 RST

GIS MEM MODE

RNG OFF

X REP

T arget

MCG-6-30-15 MCG-6-30-15 MCG-6-30-15 MCG-6-30-15 MCG-6-30-15

AOS(UT) 07:41:45 09:23:40 11:04:54 12:46:54 14:28:24

LOS(UT) 07:54:34 09:36:21 11:17:46 12:59:06 14:39:44

Max-El 23.749 63.979 Zenith 56.116 18.402

Time 07:47:59 09:29:18 | 12:52:22 14:33:34

Rep-band(stat.) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete )

Rep-start 07:42:57 09:24:33 11:05:59/11:10:18 12:47:43 14:29:35

DP-mode OBS OBS OBS OBS OBS

ACS-mode Normal{Poin ting Normal{Poin ting Normal{Pointing Normal{Pointing Normal{Pointing

ACS-spn/�

s

�

s

2.30, 147.02 2.25, 145.77 2.21, 143.70 2.16, 142.88 night

Attitude

2

4

204.22164

124.30391

158.88099

3

5

2

4

204.22134

124.30349

158.88019

3

5

2

4

204.22149

124.30425

158.87993

3

5

2

4

204.22125

124.30467

158.87984

3

5

2

4

204.22104

124.30425

158.87955

3

5

OP-start(CE) 07:51:27 ( 00h ) Cont ( 08h ) Cont ( 10h ) Cont ( 1Bh ) Cont ( 26h )

GIS HAM ERR NORMAL ERROR NORMAL NORMAL NORMAL

ACS ERR | | | | |

SIS-mode

F aint/F aint

1111/3333

F aint/F ain t

1111/3333

F aint/F aint

1111/3333

F aint/F aint

1111/3333

F aint/F aint

1111/3333

S0/1-TECT �40:26/�40:16 �39:87/�39:82 �39:63/�39:62 �39:34/�39:38 �39:15/�39:19

S0/1-CCDT �61:67/�61:77 �61:67/�61:77 �61:67/�61:81 �61:67/�61:81 �61:67/�61:77

GIS-mode

PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0)

GIS LD Hit 23cps/26cps 25cps/26cps 25cps/28cps 32cps/30cps 27cps/29cps

P X Y R S Pos MErr HV HL Gain RT-L RT-U T emp RBMT CalPk RT Pk CalCnt/time

10 8 8 5 0 FLF NONE

3/4 48 159 218 13.1 13.1 401.66 183.72 1169

Pass: 9407260516 3/4

40 159 218 7.1 420.32 181.32 1082

GIS Mo de Changes: 10{8{8{5{0

Battery Condition (min/max)

BA T V{A BA

T V{B BA

T I{A BA

T I{B BA

T T{A BA

T T{B

20.00/23.50 20.10/23.50 �4:12/4.75 �4:30/4.76 4.82/8.74 4.82/8.46

Comment: QV5BU:

W e like simple op eration. MCG-6-30-15 p ointing will last till tomorrow.

YV9]‘6a*eC2-0!gi4]‘6bX(2.!RV&;5d[4BU’c?2.! "PQ#

:13_ f2 .!k nmo >W 7 (?) T0 0/ 5D@ ljk 6,1 ,3 h< 8.!+ =& ; Cas A 2 .’ $36

S34=\34= 2.! (\D A)

3%3%A(p)82 MNV ’4&10! (^Z)