<>@?= OPERA

TION REPOR

T Rev.5 Ver 3.1

94 C 8 D 04 B Y+ 530 KSC AE: S.Kitamoto ; K.Matsuzaki

� CrB/X1323-619/Cir X-1

P ASS 1 P

ASS 2 P

ASS 3 P

ASS 4 P

ASS 5

Pass No. 940804{0308 940804{0412 940804{0515 940804{0619 940804{0722

Operation X REP

SBR A RNG

OP-15 OG-15

TCU MEM CHK

OP ST AR T

RNG OFF

X REP

ST AR 02

S-CTLG CHK

OBSER

VE MODE

BDR STOP

X REP

BDR STOP

X REP

BDR STOP

X REP

BDR STOP

X REP

SBR-A RNG

CPU 2/3 STOP

CPU 2/3 RST

GIS MEM MODE

RNG OFF

X REP

T arget

� CrB � CrB � CrB � CrB � CrB

AOS(UT) 03:56:23 05:37:53 07:19:49 09:01:43 10:43:59

LOS(UT) 04:09:3512z 05:51:25 07:33:07 09:14:18 10:54:10

Max-El 36.014 79.386 Zenith 42.75 12.825

Time 04:02:45 05:44:14 | 09:07:26 10:48:30

Rep-band(stat.) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete )

Rep-start 03:57:49 05:38:59/05:44:47 07:20:49/07:26:55 09:02:21 10:44:23

DP-mode OBS OBS/ACS/OBS OBS OBS OBS

ACS-mode Normal{Poin ting Normal{Poin ting Normal{Pointing Normal{Pointing Normal{Pointing

ACS-spn/�

s

�

s

8.40/226.25

8.40, 226.75 8.44, 226.99 8.44, 227.48 8.45, 227.98

Attitude

2

4

243.95074

56.13141

148.35498

3

5

2

4

243.95018

56.13118

148.35525

3

5

2

4

243.95057

56.13130

148.35417

3

5

2

4

243.95067

56.13149

148.35462

3

5

2

4

243.95100

56.13161

148.35455

3

5

OP-start(CE) 04:06:51 ( 00h ) Contin ue ( 0Ah ) Cont ( 14h ) Cont ( 1Eh ) Cont ( 26h )

GIS HAM ERR Normal Normal Normal Normal Normal

ACS ERR | | | | |

SIS-mode

F aint/F aint

1212/3030

F aint/F ain t

1212/3030

F aint/F aint

1212/3030

F aint/F aint

1212/3030

F aint/F aint

1212/3030

S0/1-TECT �36:43/�36:47 �36:33/�37:42 �35:61/�35:64 �34:49/�34:47 �33:42/�33:50

S0/1-CCDT �61:15/�60:73 �61:62/�61:20 �61:62/�61:44 �61:57/�61:34 �61:38/�61:02

GIS-mode

PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0)

GIS LD Hit 23cps/25cps 25cps/27cps 33cps/33cps 33cps/30cps 25cps/26cps

P X Y R S Pos MErr HV HL Gain RT-L RT-U T emp RBMT CalPk RT Pk CalCnt/time

10 8 8 5 0 FLF NONE 3/4 48 159 218 14.7 14.7 395.06 184.00 1213

Pass: 9408030308 3/4

40 159 218 9.3 414.41 180.86 1064

GIS Mo de Changes: 10{8{8{5{0

Battery Condition (min/max)

BA T V{A BA

T V{B BA

T I{A BA

T I{B BA

T T{A BA

T T{B

20.10/23.40 20.10/23.50 �4:16/4.75 �4:17/4.76 4.82/8.74 4.82/8.46

Maneuv er Op eration

Start Time T arget Name # (� , � ) (�, � , )

08/04 12:10 X1323-619 4 ( 201.65 , -62.1361 ) ( 262.0839 , 152.1698 , 151.7376 )

08/04 20:10 Cir X-1 5 ( 230.160 , -57.170 ) ( 230.4741 , 147.1382 , 175.2241 )

Comment: GL1:I:

The communication line b etween ISAS and KSC shut down in to day’s evening. How ever, the op erations were normally p erformed.

GL 16;30-18;00 O4/ KSC 0 ISAS 8S3TX)Y."MS175 F A COM, WS) ][a+4+,!cd1eh

2R-.’4+,) $g1Nf%0’(MJ)K86*74+,!"FG#

PL2 _Z1‘^\/H)W5,!jiV9lm.+4-,!bU/&-,! (kQ)