CEGFD OPERA

TION REPOR

T Rev.5 Ver 3.1

94 J 8 K 05 I Y+ 531 KSC HL: S.Kitamoto B K.Matsuzaki

Cir X-1/NGC533/A115

P ASS 1 P

ASS 2 P

ASS 3 P

ASS 4 P

ASS 5

Pass No. 940805{0205 940805{0308 940805{0412 940805{0515 940805{0618

Operation X REP

OP-05 OG-05

TCU MEM CHK

OP ST AR T

X REP

SBR A RNG

ST AR 03

S-CTLG CHK

OBSER

VE MODE

BDR STOP

RNG OFF

X REP

BDR STOP

X REP

BDR STOP

X REP

CPU 2/3 STOP

CPU 2/3 RST

GIS MEM MODE

DP-BC [03-654000AD]

DP-BC [03-664000AD]

DP BC [03-650100CE]

DP BC [03-6601011A]

X REP

SBR A RNG

RNG OFF

T arget Cir X-1 Cir X-1 Cir X-1 Cir X-1 Cir X-1

AOS(UT) 02:13:11 03:54:25 05:35:34 07:17:30 08:59:05

LOS(UT) 02:24:05 04:07:02 05:48:58 07:30:54 09:11:41

Max-El 15.036 46.658 Zenith 76.776 32.733

Time 02:19:03 04:00:15 | 07:23:29 09:04:54

Rep-band(stat.) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete )

Rep-start 02:14:41 03:55:08 05:36:30/05:42:44 07:18:10 09:00:00

DP-mode OBS OBS/ACS/OBS OBS OBS OBS

ACS-mode Normal{Poin ting Normal{Poin ting Normal{Pointing Normal{Pointing Normal{Pointing

ACS-spn/�

s

�

s

17.12/179.19

17.07, 179.10 17.02, 178.93 17.00, 178.84 16.92, 178.75

Attitude

2

4

230.47483

147.13676

175.22315

3

5

2

4

230.47541

147.13609

175.22475

3

5

2

4

230.46422

147.12881

175.21161

3

5

2

4

230.47185

147.15400

175.22603

3

5

2

4

230.47426

147.13576

175.22100

3

5

OP-start(CE) 02:21:33 ( 00h ) Contin ue ( 08h ) Cont ( 10h ) Cont ( 18h ) Cont ( 20h )

GIS HAM ERR Normal Normal Normal Normal Normal

ACS ERR | | | | |

SIS-mode

Bright/Brigh t

1111/3333

Bright/Brigh t

1111/3333

Bright/Bright

1111/3333

Bright/Bright

1111/3333

Bright/Bright

1111/3333

S0/1-TECT �36:96/�37:00 �37:16/�37:05 �36:82/�36:66 �35:22/�35:20 �34:30/�34:42

S0/1-CCDT �61:43/�61:11 �61:62/�61:53 �61:62/�61:77 �61:62/�61:62 �61:57/�61:34

GIS-mode

PH(10{6{6{5{0) PH(10{6{6{5{0) PH(10{6{6{5{0) PH(10{6{6{5{0) PH(10{6{6{5{0)

GIS LD Hit 24cps/23cps 430cps/490cps 400cps/530cps 405cps/540cps 400cps/500cps

P X Y R S Pos MErr HV HL Gain RT-L RT-U T emp RBMT CalPk RT Pk CalCnt/time

10 6 6 5 0 FLF NONE 3/4 48 159 218 16.4 16.3 397.28 183.88 813

Pass: 9408050205 3/4 40 159 218 10.9 413.07 180.76 768

GIS Mo de Changes: 10{6{6{5{0

Battery Condition (min/max)

BA T V{A BA

T V{B BA

T I{A BA

T I{B BA

T T{A BA

T T{B

20.10/23.50 20.10/23.50 �4:25/4.75 �4:21/4.78 4.82/8.74 4.82/8.46

Maneuv er Op eration

Start Time T arget Name # (� , � ) (�, � , )

08/05 10:30 NGC 533 6 ( 21.3570 , 1.7644 ) ( 21.2227 , 88.3735 , 23.1493 )

08/05 23:00 A115 1 ( 13.9607 , 26.4094 ) ( 13.8614 , 63.7574 , 35.8044 )

Comment: NQ7AP:

Our printer was repaired, to day

. Then our work b ecame hard.

:""4 Y\_ U"*‘b -8-/! c83 fax 3e1 29<12 ’/97 ? gaf 3hi- 5’4’ ,5+5

=8-/!#MN$

O>’ O>’! GIS SIS j6 BIT H 3 W^[*SV1/! QL 3 XR

T 70;(0;7%-8&*k)/

GIS 7TZRX]*.+.+@12’+7*k)/! (ld)