?ACB@ OPERA

TION REPOR

T Rev.5 Ver 3.1

94 F 8 G 14/15 E Y+ 540/541 KSC DH: S.Y amauc hi > E.Miyata

NGC1365/MS0353.6-3642/Epsilon Eri

P ASS 1 P

ASS 2 P

ASS 3 P

ASS 4 P

ASS 5

Pass No. 940814{1445 940815{0001 940815{0104 940815{0207 940815{0311

Operation X REP

OP/OG-14

TCU MEM MODE

ST AR-1(#3)

S-CTLG CHK

OBSER

VE MODE

ROG-47

ROG-48

ROG-49

CPU2/3 STOP

CPU2/3 RST

OP ST AR T

X REP

SBR-A RNG

ST AR-2(#4)

S-CTLG CHK

OBSER

VE MODE

DE-0 ADRS ON

RNG OFF

X REP

DE-0 ADRS ON

BDR STOP

X REP

BDR STOP

X REP

SBR-A RNG

CPU2/3 STOP

CPU2/3 RST

GIS MEM MODE

RNG OFF

X REP

T arget

NGC1365 MS0353.6-3642 MS0353.6-3642 MS0353.6-3642 MS0353.6-3642

AOS(UT) 22:25:20 00:06:58 01:48:18 03:30:05 05:12:00

LOS(UT) 22:37:55 00:19:42 02:01:15 03:42:55 05:23:17

Max-El 28.350 72.800 Zenith 49.561 16.664

Time 22:31:14 00:12:34 | 03:35:43 05:16:56

Rep-band(stat.) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete )

Rep-start 22:26:54 00:10:22 01:49:14/01:54:52 03:30:40 05:12:58

DP-mode OBS/ACS/OBS OBS/ACS/OBS OBS OBS OBS

ACS-mode Normal{Poin ting Normal{Poin ting Normal{Pointing Normal{Pointing Normal{Pointing

ACS-spn/�

s

�

s

10.33, 152.20 7.10, 134.00 7.19, 133.86 7.27, 133.87 7.34, 133.60

Attitude

2

4

53.19136

126.25066

15.63744

3

5

2

4

58.70410

126.74550

18.96479

3

5

2

4

58.70379

126.74593

18.96399

3

5

2

4

58.70370

126.74567

18.96413

3

5

2

4

58.70357

126.74560

18.96385

3

5

OP-start(CE) 22:34:50 ( 00h ) Cont ( 10h ) Cont ( 19h ) Cont ( 23h ) Cont ( 2Dh )

GIS HAM ERR Error Normal Normal Normal Normal

ACS ERR | | | | |

SIS-mode

F aint/F aint

0101/2323

F aint/F ain t

1212/3030

F aint/F aint

1212/3030

F aint/F aint

1212/3030

F aint/F aint

1212/3030

S0/1-TECT �37:93/�37:68 �38:52/�38:17 �38:81/�38:41 �38:03/�37:68 �38:03/�37:68

S0/1-CCDT �61:62/�61:67 �61:67/�61:77 �61:67/�61:77 �61:67/�61:77 �61:67/�61:77

GIS-mode

PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0)

GIS LD Hit 26cps/24cps 29cps/28cps 27cps/32cps 30cps/27cps 23cps/25cps

P X Y R S Pos MErr HV HL Gain RT-L RT-U T emp RBMT CalPk RT Pk CalCnt/time

10 8 8 5 0 FLF NONE 3/4 48 159 218 14.2 14.1 395.66 183.91 1764

Pass: 9408141445 3/4

40 159 218 9.3 412.28 181.03 1493

GIS Mo de Changes: 10{8{8{5{0

Battery Condition (min/max)

BA T V{A BA

T V{B BA

T I{A BA

T I{B BA

T T{A BA

T T{B

20.00/23.40 20.00/23.50 �4:08/4.75 �4:21/4.78 4.82/8.74 4.82/8.46

Maneuv er Op eration

Start Time T arget Name # (� , � ) (�, � , )

08/14 22:50 MS0353.6-3642 3 ( 58.8782 , -36.5622 ) ( 58.7034 , 126.7472 , 18.9635 )

08/15 11:50 Epsilon Eri 4 ( 53.2325 , -9.4583 ) ( 53.0675 , 99.6095 , 18.5611 )

Comment: IK<=J:

The count rates of NGC1365 observed with the SIS and the GIS are 0.05 cps and 0.03 cps, resp ectively

. The count rates of

MS0353.6-3642 observed with the SIS and the GIS are 0.08 cps and 0.03 cps, resp ectively .

LM2 op eration %O&, P&U%/#1-Q9XVWT2N,:9XVW1Y0R*,&63’(!

+35 " (LM2 8S1$)0;04P&/.#76( Z[)