UWYXV OPERA

TION REPOR

T Rev.5 Ver 3.1

94 \ 9 ] 24 [ Y+ 581 KSC Z^: T.Murak ami T K.Matsushita,

H.Matsumoto

SGR B

P ASS 1 P

ASS 2 P

ASS 3 P

ASS 4 P

ASS 5

Pass No. 940924{0205 940924{0398 940924{0412 940924{0515 940924{0628

Operation X REP

STT A/B CAL ENA

OP/OG-06 WR T

TCU MEM MODE

ACS RESET

OP ST AR T

X REP

A RNG

DE0 ADRS OF

RNG OF

X REP

DE0 ADRS OF

BDR STOP

X REP

BDR STOP

X REP

CPU2/3 STOP

CPU2/3 RST

GIS MEM MODE

X REP

OP/OG 10 WR T

TCU MEM CHK

GIS2/3 RST

GIS2/3 RUN

OP ST AR T

T arget

SGR B SGR B SGR B SGR B SGR B

AOS(UT) 02:07:04 03:48:52 05:29:36 07:11:38 08:52:58

LOS(UT) 02:18:49 04:00:40 05:42:34 07:24:09 09:05:14

Max-El 17.35 53.84 Zenith 66.21 25.08

Time 02:12:53 03:54:04 ||{ 07:17:07 08:58:26

Rep-band(stat.) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete )

Rep-start 02:09:15 03:49:25 05:30:43/05:36:17 07:12:19 08:53:34

DP-mode OBS OBS OBS OBS OBS

ACS-mode Normal{Poin ting Normal{Poin ting Normal{Pointing Normal{Pointing Normal{p ointing

ACS-spn/�

s

�

s

5.24, 315.16 5.24, 315.16 5.27, 315.56 5.33, 316.14 5.39, 316.71

Attitude

2

4

267.04578

118.35744

174.68394

3

5

2

4

267.04578

118.35744

174.68394

3

5

2

4

267.04500

118.35744

174.68394

3

5

2

4

267.04578

118.35744

174.68394

3

5

2

4

267.04500

118.35700

174.68390

3

5

OP-start(CE) 02:15:21 ( 00h ) Cont ( 0Ah ) Cont ( 13h ) Cont ( 1Dh ) 09:03:34 ( 00h )

GIS HAM ERR Normal Normal Normal Normal Error/Reset

ACS ERR (SH)MOMCHG ||- ||- ||{ ||-

SIS-mode

F aint/F aint

0123/2301

F aint/F ain t

0123/2301

F aunt/F aint

0123/2301

F aint/F aint

0123/2301

F aint/F aint

0123/2301

S0/1-TECT �39:83/�39:67 �39:19/�39:14 �38:27/�38:31 �37:21/�37:34 �36:04/�36:22

S0/1-CCDT �61:62/�61:77 �61:67/�61:77 �61:67/�61:77 �61:67/�61:77 �61:67/�61:77

GIS-mode

PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0)

GIS LD Hit 28cps/28cps 28cps/30cps 30cps/30cps 28cps/29cps 25cps/26cps

P X Y R S Pos MErr HV HL Gain RT-L RT-U T emp RBMT CalPk RT Pk CalCnt/time

10 8 8 5 0 FLF NO

3/4 48 159 218 15.8 15.8 394.23 183.83 1572

Pass: 940924-0205 3/4

40 159 218 10.4 410.75 180.77 1442

GIS Mo de Changes: 10{8{8{5{0

Battery Condition (min/max)

BA T V{A BA

T V{B BA

T I{A BA

T I{B BA

T T{A BA

T T{B

20.00/23.50 20.00/23.50 �4:08/4.75 �4:21/4.78 4.82/8.74 4.82/8.46

Maneuv er Op eration

Start Time T arget Name # (� , � ) (�, � , )

09/24 14:40 MS0440+0204 6 ( 70.7906 , 2:1722 ) ( 70.5853 , 87.9425 , 354.9263 )

09/25 20:00 MSH0451.5+0250 1 ( 73.5527 , 2:9233 ) ( 73.3434 , 87.1842 , 352.9179 )

Comment: ‘f@Rc:

ASCA is still observing Sgr B in total 80 ksec.

2 CCD mo de ?AijoK<kh,’KD4, t)-sQ)</N;26! ISAS 1PFI+86!vz{1D!

NEC 1PIK OP/OG O 2 r?|.:}-m qdMB 4ReV ?2:C2(!5@�Ang2:FD7 5ReV ,

’L+J;4!bfA�@xE#�$!>P<+al?p*:C8<2:(D4!bfey?uKD4#~S$!

0-N)1D!> P<HH/ 2(P3G"bf xE7+J wfH86/ <OEP>_ M:2D) +F2JP!b f

A�>@; %I)/)&@�?=8+9M:(8:FJ(D4!#~‘$