OQSRP OPERA

TION REPOR

T Rev.5 Ver 3.1

94 V 09 W 28 U Y+ 585 KSC TX: Y.Ogasak a N H.Matsumoto

GRO J1655/Crab

P ASS 1 P

ASS 2 P

ASS 3 P

ASS 4 P

ASS 5

Pass No. 940928{0101 940928{0204 940928{0308 940928{0411 940928{0515

Operation X REP

OP/OG-05 WR T

TCU MEM MODE

CPU-2/3 STOP

CPU-2/3 RST

OP ST AR T

X REP

RNG-A

ST AR-03 WR T

S CTLG CHK

OBSER

VE MODE

BRIGHT MODE

RNG-OFF

X REP

BDR STOP

X RES

BDR STOP

X REP

RNG A

CPU2/3 STOP

CPU2/3 RST

GIS MEM MODE

RNG OFF

X REP

T arget

GRO J1655 GRO J1655 GRO J1655 Crab Crab

AOS(UT) 00:15:21 01:57:20 03:38:00 05:20:07 07:01:30

LOS(UT) 00:27:01 02:09:05 03:50:37 05:32:24 07:13:00

Max-El 18.15 55.17 Zenith 63.59 23.01

Time 00:21:21 02:02:31 ||{ 05:25:32 07:06:49

Rep-band(stat.) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete )

Rep-start 00:16:58 01:57:57 03:38:59/03:44:44 05:20:41 07:02:07

DP-mode OBS OBS/ACS/OBS OBS OBS OBS

ACS-mode Normal{Poin ting Normal{Poin ting Normal{Pointing Normal{Pointing Normal{Pointing

ACS-spn/�

s

�

s

17.07, 0.98 17.12, 1.15 17.20, 1.15 18.75, 234.03 18.78, 233.95

Attitude

2

4

253.76849

129.82079

168.08266

3

5

2

4

253.76753

129.82104

168.07964

3

5

2

4

249.06438

130.97856

163.37806

3

5

2

4

83.41379

68.00812

346.86088

3

5

2

4

83.41403

68.00847

346.86185

3

5

OP-start(CE) 00:24:06 ( 00h ) Cont ( 08h ) Cont ( 10h ) Cont ( 24h ) Cont ( 31h )

GIS HAM ERR Error/Reset Normal Normal Normal Normal

ACS ERR ||{ ||- ||- ||{ ||{

SIS-mode

F aint/F aint

1111/3333

F aint/F ain t

1111/3333

F aint/F aint

1111/3333

F aint/F aint

0123/2301

F aint/F aint

0123/2301

S0/1-TECT �39:83/�39:72 �40:12/�40:01 �39:73/�39:72 �38:81/�38:85 �38:66/�38:51

S0/1-CCDT �61:67/�61:77 �61:71/�61:81 �61:71/�61:81 �61:71/�61:81 �61:67/�61:81

GIS-mode

PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0)

GIS LD Hit 26cps/23cps 29cps/30cps 29cps/39cps 56cps/62cps 24cps/25cps

P X Y R S Pos MErr HV HL Gain RT-L RT-U T emp RBMT CalPk RT Pk CalCnt/time

10 8 8 5 0 FLF NO 3/4 48 159 218 12.7 12.0 399.61 183.52 888

Pass: 940928-0101 3/4

40 159 218 5.1 388.13 181.14 754

GIS Mo de Changes: PH10{8{8{5{0 <|> MPC / 8{6{6{0{0 (Crab)

Battery Condition (min/max)

BA T V{A BA

T V{B BA

T I{A BA

T I{B BA

T T{A BA

T T{B

20.00/23.40 20.10/23.50 �4:12/4.75 �4:12/4.78 4.82/8.74 4.82/8.46

Maneuv er Op eration

Start Time T arget Name # (� , � ) (�, � , )

09/28 04:00 Crab 5 ( 83.6330 , 22:0145 ) ( 83.4126 , 68.0064 , 346.8642 )

Comment: Y_@L^:

W e observed GRO J1655(TOO). It was unexp ectedly bright and counting rates were 78.4 c/sec/GIS and 74.0 c/sec/SIS. W e maneuverd to Crab for calibration. GRO J1655 Aai?[G. bit-H/F aint ; SIS @sut,

pr9: (6 @; 3pass \ ? Bright mo de J {8 n 10 d~ 7/ bit-H Bright J� CB 26! �M A y@ �

lA�H 6D@ @B7 pr9:( B3!0 0@< 0I[ G( source ,z (:(G @; �tting A> ?J2 :D� (

B4K (^ ^ ;)!

|c j f" � A ‘ / FH 5 ) ; �] (9/28) m ] ? � w� ; 3! %E )0 )& A 1 pass \ , � x 2:00 >@ ;

�k;-G+=)+bZ>E);3, %’3+&A;-5);3!!hY�@qvo,-(6E);3#g}�$!

5@�@�2e�A*B+4.71(#hY$!