IKMLJ OPERA

TION REPOR

T Rev.5 Ver 3.1

94 P 09 Q 29 O Y+ 586 KSC NR: Y.Ogasak a H H.Matsumoto

Crab/Akn120

P ASS 1 P

ASS 2 P

ASS 3 P

ASS 4 P

ASS 5

Pass No. 940929{0101 940929{0204 940929{0308 940929{0411 940929{0515

Operation X REP

OP/OG-10 WR T

TCU MEM MODE

ERRCODE RST

MPC ON

OP ST AR T

X REP

RNG-A

ST AR-04 WR T

S CTLG CHK

OBSER

VE MODE

GIS LD 3

GIS LD 0

ERRCODE RST

RNG-OFF

X REP

BDR STOP

X RES

BDR STOP

X REP

RNG A

CPU2/3 STOP

CPU2/3 RST

GIS MEM MODE

RNG OFF

X REP

T arget

Crab Crab Crab Crab Crab

AOS(UT) 00:12:40 01:54:40 03:35:46 05:17:37 06:59:16

LOS(UT) 00:24:50 02:06:36 03:48:13 05:29:47 07:10:16

Max-El 25.02 68.13 Zenith 50.60 16.54

Time 00:18:43 01:59:59 ||{ 05:23:00 07:04:10

Rep-band(stat.) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete )

Rep-start 00:14:00 01:55:14 03:36:46/03:42:17 05:18:26 06:59:55

DP-mode OBS OBS/ACS/OBS OBS OBS OBS

ACS-mode Normal{Poin ting Normal{Poin ting Normal{Pointing Normal{Pointing Normal{Pointing

ACS-spn/�

s

�

s

19.22, 232.11 19.26, 231.81 19.29, 231.81 19.34, 231.52 19.37, 231.40

Attitude

2

4

83.41417

68.00802

346.86160

3

5

2

4

83.41396

68.00818

346.86166

3

5

2

4

83.41395

68.00835

346.86266

3

5

2

4

83.41370

68.00836

346.86237

3

5

2

4

83.41414

68.00839

346.86154

3

5

OP-start(CE) 00:22:02 ( 00h ) Cont ( 09h ) Cont ( 12h ) Cont ( 1Bh ) Cont ( 24h )

GIS HAM ERR Normal Normal Normal Normal Normal

ACS ERR (SH)MOMCHG (SH)MOMCHG ||- ||{ ||{

SIS-mode

F aint/F aint

0123/2301

F aint/F ain t

0123/2301

F aint/F aint

0123/2301

F aint/F aint

0123/2301

F aint/F aint

0123/2301

S0/1-TECT �41:62/�41:37 �41:23/�41:08 �40:89/�40:69 �39:97/�39:72 �39:24/�38:99

S0/1-CCDT �61:67/�61:77 �61:67/�61:77 �61:67/�61:77 �61:67/�61:77 �61:67/�61:77

GIS-mode

PH(10{8{8{5{0) PH(10{8{8{5{0)

PH(8{6{6{0{0)

PH(10{8{8{5{0) PH(10{8{8{5{0)

GIS LD Hit 571cps/721cps 169cps/199cps 612cps/719cps 514cps/312cps 23cps/25cps

P X Y R S Pos MErr HV HL Gain RT-L RT-U T emp RBMT CalPk RT Pk CalCnt/time

10 8 8 5 0 FLF NO

3/4 48 159 218 16.4 16.3 393.09 184.23 649

Pass: 940929-0101 3/4

40 159 218 10.9 412.71 180.22 548

GIS Mo de Changes: PH10{8{8{5{0 <|> MPC / 8{6{6{0{0 (Crab)

Battery Condition (min/max)

BA T V{A BA

T V{B BA

T I{A BA

T I{B BA

T T{A BA

T T{B

20.10/23.40 20.10/23.50 �4:08/4.73 �4:30/4.76 4.82/8.74 4.82/8.46

Maneuv er Op eration

Start Time T arget Name # (� , � ) (�, � , )

09/29 18:10 Akn 120 6 ( 79.0458 , 0:15 ) ( 78.8508 , 90.2145 , 359.2799 )

Comment: SZ8EW:

Crab calibration continues. W e will maneuver to Akn 120 in remote orbit.

]c-B)>$b e‘CV\Y U%fj8(V &*X;. 1* ^d9_ +,0@;. 185F[m pAn&;. 1

"hos#!

rZ9a)>k @4;.1! tZD*q34 rZg&6 7@: TZ 9G*1,- B\l/? 5.=’!&<2 &

<2"iS#!