DFHGE OPERA

TION REPOR

T Rev.5 Ver 3.1

94 K 10 L 01 J Y+ 588 KSC IM: Y.Ogasak a C H.Matsumoto

PSR 0540-69/SGR 0526-66/YY Men

P ASS 1 P

ASS 2 P

ASS 3 P

ASS 4 P

ASS 5

Pass No. 941001{0001 941001{0104 941001{0208 941001{0311 ||{

Operation X REP

RNG A

OP/OG-05 WR T

TCU MEM MODE

ERRCODE RST

OP ST AR T

RNG OFF

X REP

ST AR-06 WR T

S CTLG CHK

OBSER

VE MODE

BDR STOP

X REP

BDR STOP

X REP

RNG A

CPU 2/3 STOP

CPU 2/3 RST

GIS MEM MODE

RNG OFF

X REP

T arget

PSR 0540-69 PSR 0540-69 PSR 0540-69 PSR 0540-69

AOS(UT) 00:08:09 01:49:17 03:31:03 05:12:28

LOS(UT) 00:20:04 02:01:31 03:43:16 05:24:00

Max-El 44.628 Zenith 73.727 28.976

Time 00:13:32 ||{ 03:36:29 05:17:49

Rep-band(stat.) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete ) ( )

Rep-start 00:08:49 01:50:09/01:55:43 03:31:43 05:13:23

DP-mode OBS OBS/ACS/OBS OBS OBS

ACS-mode Normal{Poin ting Normal{Poin ting Normal{Pointing Normal{Pointing

ACS-spn/�

s

�

s

11.27, 97.46 11.34, 97.41 11.39, 97.37 11.44, 97.34

Attitude

2

4

84.36933

159.45639

358.11871

3

5

2

4

84.36944

159.45613

358.11803

3

5

2

4

84.36885

159.45535

358.11803

3

5

2

4

84.36920

159.45591

358.11772

3

5

2

4

3

5

OP-start(CE) 00:17:23 ( 00h ) Cont ( 0Ah ) Cont ( 15h ) Cont ( 20h ) ( )

GIS HAM ERR Normal Normal Normal Normal

ACS ERR (SH)MOMCHG ||{ ||{ ||{

SIS-mode

F aint/F aint

0123/2301

F aint/F ain t

0123/2301

F aint/F aint

0123/2301

F aint/F aint

0123/2301

S0/1-TECT �38:22/�37:83 �38:38/�38:02 �38:22/�37:87 �37:89/�37:58

S0/1-CCDT �61:62/�61:72 �61:62/�61:72 �61:62/�61:77 �61:67/�61:77

GIS-mode PH(8{6{6{5{0) PH(8{6{6{5{0) PH(8{6{6{5{0) PH(8{6{6{5{0)

GIS LD Hit 32cps/33cps 34cps/33cps 29cps/26cps 28cps/27cps

P X Y R S Pos MErr HV HL Gain RT-L RT-U T emp RBMT CalPk RT Pk CalCnt/time

8 6 6 5 0 FLF NO

3/4 48 159 218 18.0 18.0 386.35 184.25 2077

Pass: 941001-0001 3/4

40 159 218 12.5 402.92 180.12 1994

GIS Mo de Changes: PH 8{6{6{5{0 |> PH 8{6{6{0{0 (SGR 0526-66) |> PH 10{8{8{5{0 (YY Men)

Battery Condition (min/max)

BA T V{A BA

T V{B BA

T I{A BA

T I{B BA

T T{A BA

T T{B

20.10/23.40 20.10/23.50 �4:16/4.75 �4:43/4.78 4.82/8.74 4.82/8.46

Maneuv er Op eration

Start Time T arget Name # (� , � ) (�, � , )

10/01 08:50 SGR 0526-66 2 ( 81.5029 , �66:0764 ) ( 81.0297 , 156.0490 , 353.7711 )

10/02 10:00 YY Men 3 ( 74.5758 , �75:2767 ) ( 73.7713 , 165.2579 , 335.3343 )

Comment: NR7BQ:

PSR 0540-69 was observed. Counting rates were 0.69 c/sec/GIS and 0.75 c/sec/SIS.

TR2 6 RXOZ6B Q@,1,<0.! 9=03,1\^] _5,6bW ,1,<’7/ ?’(!4444 ’,>

’"OZ6bW2).+375&‘VU#!

.:A-A56’<*&(A3Y’!TR8$>’+’%7cd3 $PS%;[e"aN#!