=?A@> OPERA

TION REPOR

T Rev.5 Ver 3.1

94 D 10 E 22 C Y+ 607 KSC BF: K.T amura < H.Kub o

SN1993J / EXO01846-031 / W50 / MRC2019+098

P ASS 1 P

ASS 2 P

ASS 3 P

ASS 4 P

ASS 5

Pass No. 941021{0927 941021{1030 941021{1133 941021{1237 941021{1340

Operation X REP

OP/OG-14 WR T

TCU MEM MODE

CPU2/3 STOP

CPU2/3 RST

OP ST AR T canceled canceled X REP

RNG A

CPU2/3 STOP

CPU2/3 RST

GIS MEM MODE

RNG OFF

X REP

S-CTLG-05 WR T

S-CTLG CHK

OBSER

VE MODE

T arget SN1993J SN1993J SN1993J

AOS(UT) 13:03:58 18:08:44 19:50:18

LOS(UT) 13:16:47 18:21:53 20:02:16

Max-El 25.525 56.542 19.862

Time 13:10:08 18:14:40 19:55:56

Rep-band(stat.) X ( Complete ) ( ) ( ) X ( Complete ) X ( Complete )

Rep-start 13:07:23 18:09:33 19:51:37

DP-mode OBS OBS OBS/ACS/OBS

ACS-mode Normal{Poin ting Normal{Pointing Normal{Pointing

ACS-spn/�

s

�

s

|, | 6.31, 277.34 6.53, 276.57

Attitude

2

4

148.06924

20.99575

320.06316

3

5

2

4

3

5

2

4

3

5

2

4

148.06931

20.99615

320.06312

3

5

2

4

148.06945

20.99610

320.06287

3

5

OP-start(CE) 13:13:43 ( 00h ) ( ) ( ) Cont ( 1Bh ) Cont ( 25h )

GIS HAM ERR Err Normal Normal

ACS ERR (SH)MOMCHG || ||

SIS-mode

F aint/F aint

2222/0000

F aint/F aint

2222/0000

F aint/F aint

2222/0000

S0/1-TECT �36:96/�36:90 �37:74/�37:63 �38:22/�38:17

S0/1-CCDT �61:67/�61:77 �61:67/�61:77 �61:67/�61:77

GIS-mode

PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0)

GIS LD Hit 26cps/27cps 31cps/29cps 26cps/27cps

P X Y R S Pos MErr HV HL Gain RT-L RT-U T emp RBMT CalPk RT Pk CalCnt/time

10 8 8 5 0 FLF NO

3/4 48 159 218 13.1 13.1 398.13 183.78 1016

Pass: 941021-0927 3/4 40 159 218 7.1 424.69 180.96 970

GIS Mo de Changes: None

Battery Condition (min/max)

BA T V{A BA

T V{B BA

T I{A BA

T I{B BA

T T{A BA

T T{B

19.90/23.50 19.90/23.50 �4:25/4.75 �4:47/4.78 4.82/8.74 4.82/8.74

Maneuv er Op eration

Start Time T arget Name # (� , � ) (�, � , )

10/22 07:40 EXO1846-031 5 ( 282.320 , -3.065 ) ( 282.509 , 92.985 , 184.620 )

10/22 18:51 W50 6 ( 284.409 , 5.060 ) ( 287.679 , 84.727 , 204.547 )

10/23 03:01 MRC2019+098 1 ( 305.535 , 10.020 ) ( 305.721 , 79.890 , 186.865 )

Comment: GI2;H:

W e are observing SN1993J (JAP

AN). The counting rates of X-5 and X-6 are �0.88 c/sec/SIS and �0.35 c/sec/GIS.

J) 4 8 2N M Q /# $ ’ / 6", - R S 62 . *! SN1993J 3 #9 7 $ 1 L% 0 # ’/ 6 0 # &...(OT)! V

I3 rev2,3 & GEOT

AIL 2PU.WY[XZ(:5)+ (K)!