"$&%# OPERA TION REPOR T Rev.5 V er 3.1 94 ) 10 * 25 ( Y+ 611 KSC ’+ : K.T am ura , H.Kub o MG 2016 + 112 P ASS 1 P ASS 2 P ASS 3 P ASS 4 P ASS 5 P ass No. 941024{0723 941024{0826 941024{0930 941024{1033 941024{1137 Operation X REP OP/OG-09 WR T TCU MEM MODE ERR CODE RST OP ST AR T X REP RNG A CPU2/3 STOP CPU2/3 RST RNG OFF X REP BDR STOP X REP BDR STOP X REP RNG A CPU2/3 STOP CPU2/3 RST GIS MEM MODE RNG OFF X REP T a rget MG 2016 + 112 MG 2016 + 112 MG 2016 + 112 MG 2016 + 112 MG 2016 + 112 A OS(UT) 11:14:45 12:56:34 14:37:22 16:19:18 18:00:49 LOS(UT) 11:27:00 13:09:08 14:50:33 16:32:25 18:13:13 Max-El 18.672 55.958 Zenith 66.998 25.941 Time 11:20:49 13:01:59 || 16:25:10 18:06:32 Rep-band(stat.) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete ) Rep-sta rt 11:16:05 12:57:05 14:38:22/14:44:07 16:19:56 18:01:49 DP-mode OBS OBS OBS OBS OBS A CS-mode Normal{Poin ting Normal{Poin ting Normal{Poin ting Normal{Poin ting Normal{P oin ting A CS-spn/ � s � s |, | |-, |- |-, |- |-, |- |-, |- A ttitude 2 4 304.986 78.374 192.921 3 5 2 4 304.986 78.374 192.921 3 5 2 4 304.985 78.374 192.920 3 5 2 4 304.985 78.374 192.921 3 5 2 4 304.986 78.374 192.922 3 5 OP-sta rt(CE) 11:23:47 ( 00h ) Cont ( 0Ah ) Cont ( 14h ) Cont ( 1Eh ) Con t ( 28h ) GIS HAM ERR Normal Err Normal Normal Normal A CS ERR (SH)MOMCHG ||{ ||{ || || SIS-mode F ain t/F ain t 0123/0123 F ain t/F ain t 0123/0123 F ain t/F ain t 0123/0123 F ain t/F ain t 0123/0123 F ain t/F ain t 0123/0123 S0/1-TECT � 35 : 51/ � 35 : 20 � 36 : 51/ � 36 : 15 � 35 : 12/ � 34 : 81 � 35 : 12/ � 34 : 86 � 35 : 41/ � 35 : 15 S0/1-CCDT � 61 : 62/ � 61 : 67 � 61 : 62/ � 61 : 62 � 61 : 57/ � 61 : 48 � 61 : 48/ � 61 : 30 � 61 : 48/ � 61 : 25 GIS-mode PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) GIS LD Hit 25cps/23cps 27cps/30cps 29cps/28cps 27cps/27cps 26cps/29cps P X Y R S Pos MErr HV HL Gain RT-L RT-U T emp RBMT CalPk RT Pk CalCnt/time 10 8 8 5 0 FLF NO 3/4 48 159 218 15.8 15.8 397.23 183.79 139 Pass: 941024-0723 3/4 40 159 218 9.8 399.97 180.70 123 GIS Mo de Changes: None Battery Condition (min/max) BA T V{A BA T V{B BA T I{A BA T I{B BA T T{A BA T T{B 19.90/23.50 19.90/23.40 � 4 : 38/4.73 � 4 : 47/4.76 4.82/8.74 4.82/8.17 Maneuv er Op eration Sta rt Time T arget Name # ( � , � ) ( � , � , ) Commen t: .1F 0 : W e are observing MG 2016 + 112 (JPN). No signi�cant count is detected from the source. Rev.2 V Y[a S \ d 8F ‘ e A80 6 -kb t sc r ;f ; I ;?b > F ? Ja 2pass JF store qc p 6 A80 E 2 M <b A400 E G @K Q C U N ] J A O C F 9 C Ba 0 E G R X 3 N I = Q B ; ?b / 1 Ga 1 . n tc o m uia j 7 Z ?4b ( g l ) b hW G raimei Pa ^ 1 G A80 P reb o ot ; ?a T G raijin 5D ( v ) b L J A! : 4b ( _H K)