$&(’% OPERA TION REPOR T Rev.5 V er 3.1 94 + 11 , 16 * Y+ 634 KSC )- : S.Ueno . M.Sugizaki Cyg Lo op 2/Cyg Lo op 3/Cyg Lo op 4/ " CMa P ASS 1 P ASS 2 P ASS 3 P ASS 4 P ASS 5 P ass No. 941116{0104 941116{0207 941116{0311 941116{0414 Operation X REP RNG A OP/OG-11 WR T TCU MEM MODE SCT-02 WR T SCT CHK OBS MODE DE-0 ADDRS OFF OP ST RNG OFF XREP SCTL-03WR T SCTCHK OBSMODE BDRSTP XREP BDRSTP XREP SBR-A RNG CPU2/3STP CPU2/3RST GIS MEM MODE RNG OFF XREP CPU2/3STP CPU2/3RST No op eration T a rget Cyg Lo op 2 Cyg Lo op 3 Cyg Lo op 3 Cyg Lo op 3 A OS(UT) 01:45:11 03:26:10 05:08:18 06:49:47 LOS(UT) 01:57:53 03:39:07 05:20:44 07:01:22 Max-El 52.514 Zenith 69.640 26.044 Time 01:50:51 |{ 05:13:57 06:55:14 Rep-band(stat.) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete ) ( ) Rep-sta rt 01:46:11 03:27:16/03:30:00 05:09:20 06:50:52 DP-mode OBS/ACS/OBS OBS/ACS/OBS OBS OBS A CS-mode Normal{Poin ting Normal{Poin ting Normal{Poin ting Normal{Poin ting A CS-spn/ � s � s 15.20,263.91 15.97, 264.95 16.01, 265.06 16.06, 256.12 A ttitude 2 4 311.710 59.072 185.544 3 5 2 4 311.824 59.732 184.752 3 5 2 4 311.825 59.733 184.753 3 5 2 4 311.82469 59.73258 184.75309 3 5 2 4 3 5 OP-sta rt(CE) 01:55:00 ( 00h ) Cont ( 0Fh ) Cont ( 1Bh ) Cont ( 25h ) ( ) GIS HAM ERR Normal Normal Normal ERR/RST A CS ERR ||{ |{ ||- ||{ SIS-mode F ain t/F ain t 0123/2301 F ain t/F ain t 0123/2301 F ain t/F ain t 0123/2301 F ain t/F ain t 0123/2301 S0/1-TECT � 41 : 91/ � 42 : 05 -41.67/-41.86 � 40 : 75/ � 40 : 99 � 39 : 92/ � 40 : 26 S0/1-CCDT � 61 : 67/ � 61 : 77 -61.67/-61.77 � 61 : 67/ � 61 : 77 � 61 : 67/ � 61 : 77 GIS-mode PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) GIS LD Hit 32cps/32cps 32cps/30cps 30cps/28cps 27cps/28cps P X Y R S Pos MErr HV HL Gain RT-L RT-U T emp RBMT CalPk RT Pk CalCnt/time 10 8 8 5 0 FLF NO 3/4 48 159 218 15.3 15.2 390.49 183.90 4773 Pass: 941116-0104 3/4 40 159 218 9.3 412.01 180.70 4451 GIS Mo de Changes: None Battery Condition (min/max) BA T V{A BA T V{B BA T I{A BA T I{B BA T T{A BA T T{B 20.50/23.50 20.50/23.50 � 3 : 99/4.75 � 4 : 04/4.78 4.82/9.03 4.82/8.46 Maneuv er Op eration Sta rt Time T arget Name # ( � , � ) ( � , � , ) 11/16 02:30 Cyg Lo op 3 6 ( 311.546 , 30.112 ) ( 311.8231 , 59.7349 , 184.7551 ) 11/16 08:00 Cyg Lo op 4 1 ( 313.3167 , 29.8881 ) ( 313.5953 , 59.9617 , 184.0600 ) 11/16 13:20 " CMa 2 ( 104.6583 , -28.9722 ) ( 104.4343 , 118.9106 , 323.4832 ) Commen t: /7N"4 : W e observed Cyg Lo op 1, 2, and 3 (PI: E.Miyata, JPN). The SIS count rates are 1.5, 1.2, and 0.2 cts/s/eachSIS, resp ectiv ely . \^a <W Kbi ]? ZO S9 8L:H Ecn qV CB MA RQ CZc "4 kr N F AX Yds 0dgT 9> 9hN u;xoMSH I5I#?H Ec@:@6 wbptDXH I:USHI5 I=XEU 88NMK jHI@QHEc ; s0JptFHEc17N"4O MNV L@c|z} {;‘FHEev2fc\7O!Jl _;[:B3~L 7J @E;b>GUJOm@PVN!FD9JAey]fc