%’)(& OPERA TION REPOR T Rev.5 V er 3.1 94 , 11 - 27 + Y+ 644/645 KSC *. : S.Ueno,Y.F uk aza w a / Y.Ohno Cyg X-1 #5/A959/MRC0625-536/GS0834-430 P ASS 1 P ASS 2 P ASS 3 P ASS 4 P ASS 5 P ass No. 941126{1237 941126{1341 941126{1444 941126{1548 941127{0103 Operation XREP OP/OG-12 WR T TCU MEM MODE SCT-05 WR T S-CTLG CHK OBS MODE OP ST AR T X REP SBR-A-RNG SCT-06 WR T S-CTLG CHK OBS MODE CPU2/3-STOP CPU2/3-RST RNG-OFF XREP BDR STOP XREP BDR STOP XREP CPU 2/3 STP CPU 2/3 RST CPU MEM MODE XREP SBR-A-RNG RNG-OFF T a rget Cyg X-1 #5 A959 A959 A959 A959 A OS(UT) 18:28:54 20:09:36 21:51:00 23:32:44 01:14:20 LOS(UT) 18:40:13 20:22:34 22:04:15 23:45:49 01:27:04 Max-El 13.522 44.245 Zenith 78.186 34.674 Time 18:34:24 20:15:29 || 23:38:31 01:20:05 Rep-band(stat.) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete ) Rep-sta rt 18:30:09 20:10:41 21:51:45/21:57:35 23:33:31 01:15:09 DP-mode OBS/ACS/OBS OBS/ACS/OBS OBS OBS OBS A CS-mode Normal{Poin ting Normal{Poin ting Normal{Poin ting Normal{Poin ting Normal{P oin ting A CS-spn/ � s � s |/| 17.20, 176.62 17.25, 176.80 17.30, 176.98 17.35, 177.16 A ttitude 2 4 299.591 54.685 215.153 3 5 2 4 153.987 30.491 348.669 3 5 2 4 153.988 30.491 348.669 3 5 2 4 153.988 30.491 348.670 3 5 2 4 153.988 30.491 348.669 3 5 OP-sta rt(CE) 18:36:25 ( 00h ) Cont ( 0Fh ) Cont ( 18h ) Cont ( 21h ) Con t ( 2Ah ) GIS HAM ERR Normal ERR/RST Normal Normal Normal A CS ERR ||{ ||- || ||{ || SIS-mode F ain t/F ain t 1111/3333 F ain t/F ain t 0123/0123 F ain t/F ain t 0123/0123 F ain t/F ain t 0123/0123 F ain t/F ain t 0123/0123 S0/1-TECT � 42 : 69/ � 42 : 69 � 43 : 46/ � 43 : 61 � 42 : 69/ � 42 : 64 � 42 : 11/ � 42 : 01 � 41 : 38/ � 41 : 33 S0/1-CCDT � 61 : 67/ � 61 : 81 � 61 : 67/ � 61 : 81 � 61 : 67/ � 61 : 77 � 61 : 67/ � 61 : 77 � 61 : 67/ � 61 : 77 GIS-mode PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) GIS LD Hit 26cps/21cps 24cps/26cps 28cps/33cps 31cps/31cps 24cps/29cps P X Y R S Pos MErr HV HL Gain RT-L RT-U T emp RBMT CalPk RT Pk CalCnt/time 10 8 8 5 0 FLF NO 3/4 48 159 218 13.6 13.1 399.92 183.64 1362 Pass: 941126-1237 3/4 40 159 218 7.1 422.23 180.95 1484 GIS Mo de Changes: None Battery Condition (min/max) BA T V{A BA T V{B BA T I{A BA T I{B BA T T{A BA T T{B 20.00/23.40 20.00/23.50 � 4 : 64/4.73 � 4 : 68/4.80 4.82/8.74 4.82/8.46 Maneuv er Op eration Sta rt Time T arget Name # ( � , � ) ( � , � , ) 11/26 19:10 A959 6 ( 154.392 , 59.534 ) ( 153.990 , 30.493 , 348.666 ) 11/27 15:50 MRC0625-536 1 ( 96.585 , -53.693 ) ( 96.390 , 143.523 , 285.116 ) 11/28 07:40 GS0834-430 2 ( 128.979 , -43.189 ) ( 128.732 , 133.092 , 312.477 ) Commen t: 17N#4 : The SIS count of Cyg X-1 p os#5 (ASCA team) is 17 cts/s/sensor. The SIS count of A959 (PI: T.G.Tsuru, JUS) is 0.06 cts/s/sensor. ?S ; OZc f g 68 " m $p q o r N7 I F ]u3^[ y 7 Iu 3 D Y Ot i I F =\:W :W <x {M LTP EG[ s? 0V HG BKZ! ?n @X EH AV Gwz AYZ K; R9 T> J; ( |k _N{ )( b3 ) [ CygX-1 NjaNl7#4NGQe7‘A5UCJMLTPEG[2N#4Oh:IF[]vd^