#%’&$ OPERA TION REPOR T Rev.5 V er 3.1 94 * 12 + 03 ) Y+ 651 KSC (, : Y.F uk aza w a - Y.Ohno F AIRALL9#1/XY LEO/Mkn205/A1851 P ASS 1 P ASS 2 P ASS 3 P ASS 4 P ASS 5 P ass No. 941202{1133 941202{1340 941202{1444 941202{1547 Operation XREP OP/OG-06 WR T TCU MEM MODE OP ST AR T XREP SCT-06 WR T S-CTLG CHK OBS MODE BDR STOP XREP BDR STOP XREP SBR-A-RNG CPU 2/3 STP CPU 2/3 RST CPU MEM MODE RNG-OFF XREP T a rget F AIRALL9#1 F AIRALL9#1 F AIRALL9#1 XY LEO A OS(UT) 16:30:01 19:52:43 21:34:29 23:15:59 LOS(UT) 16:42:15 20:05:33 21:47:15 23:27:43 Max-El 25.195 Zenith 53.692 18.593 Time 16:35:47 || 21:40:09 23:21:21 Rep-band(stat.) X ( Complete ) ( ) X ( Complete ) X ( Complete ) X ( Complete ) Rep-sta rt 16:31:28 19:53:36/19:59:24 21:35:12 23:17:08 DP-mode OBS OBS/ACS/OBS OBS OBS A CS-mode Normal{Poin ting Normal{Poin ting Normal{Poin ting Normal{P oin ting A CS-spn/ � s � s |/| 0.72, 99.53 0.77, 96.98 14.75, 192.06 A ttitude 2 4 21.099 148.618 227.211 3 5 2 4 3 5 2 4 21.099 148.618 227.211 3 5 2 4 21.100 148.618 227.212 3 5 2 4 150.204 72.577 337.802 3 5 OP-sta rt(CE) 16:39:10 ( 00h ) ( ) Cont ( 10h ) Cont ( 18h ) Con t ( 28h ) GIS HAM ERR Normal Normal ERR/RST Normal A CS ERR || ||- ||{ ||{ SIS-mode F ain t/F ain t 1111/3333 F ain t/F ain t 1111/3333 F ain t/F ain t 1111/3333 F ain t/F ain t 1111/3333 S0/1-TECT � 34 : 83/ � 35 : 10 � 35 : 70/ � 35 : 88 � 36 : 34/ � 36 : 42 � 37 : 79/ � 37 : 73 S0/1-CCDT � 61 : 15/ � 60 : 97 � 61 : 29/ � 61 : 11 � 61 : 34/ � 61 : 16 � 61 : 62/ � 61 : 58 GIS-mode PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) GIS LD Hit 20cps/22cps 29cps/28cps 30cps/23cps 26cps/26cps P X Y R S Pos MErr HV HL Gain RT-L RT-U T emp RBMT CalPk RT Pk CalCnt/time 10 8 8 5 0 FLF NO 3/4 48 159 218 14.2 14.1 393.42 183.74 3370 Pass: 941202-1133 3/4 40 159 218 8.2 418.19 180.78 3057 GIS Mo de Changes: None Battery Condition (min/max) BA T V{A BA T V{B BA T I{A BA T I{B BA T T{A BA T T{B 19.90/23.50 19.90/23.50 � 4 : 42/4.75 � 4 : 47/4.78 4.82/8.74 4.82/8.17 Maneuv er Op eration Sta rt Time T arget Name # ( � , � ) ( � , � , ) 12/02 21:50 XY LEO 2 ( 150.417 , 17.410 ) ( 150.202 , 72.579 , 337.799 ) 12/03 10:40 Mkn205 3 ( 185.435 , 75.311 ) ( 184.649 , 14.637 , 326.772 ) 12/04 07:40 A1851 4 ( 209.850 , 72.114 ) ( 209.276 , 17.780 , 310.085 ) Commen t: .7N 2 : SIS count rate of F AIRALL9 is 1.2c/s. SIS count rate of XY LEO is less than 0.02c/s. ‘a SIS N! h=k iBH :D =n_7 O" =FDo GIS S !h =TT ^:o !h =^: NO SIS O SE Y[n GIS S cI9 XoAF ENsBRJ:F DVnx�nl zLK=9X =ne�S sBRN� GoeN�3= jFH:XJ >M�M8 X L[H �] M]F H� g� �M 8X U; LS NL NIn L< L< v� =� :oqm �rf :5 }= TFJ{F D ( J :FHSn9J 1 79X@K ) o_7n/7O KSC ~aZxwBU;JyPoISgv=9QW�?L:o�d=t C[o6|u\M KSC M4X�0bntBJ:Hp ( �1 ) o