"$&%# OPERA TION REPOR T Rev.5 V er 3.1 94 ) 12 * 05 ( Y+ 653 KSC ’+ : Y.F uk aza w a , Y.Ohno, Y.Segaw a A1851/Mrk231 P ASS 1 P ASS 2 P ASS 3 P ASS 4 P ASS 5 P ass No. 941204{1030 941204{1138 941204{1237 941204{1340 941204{1443 Operation XREP OP/OG-10 WR T TCU MEM MODE ACS-ERR-RST CPU2/3-STOP CPU2/3-RST OP ST AR T X REP SBR-A-RNG SCT-01 WR T S-CTLG CHK OBS MODE RNG-OFF XREP BDR STOP XREP BDR STOP XREP CPU 2/3 STP CPU 2/3 RST CPU MEM MODE XREP SBR-A-RNG RNG-OFF T a rget A1851 A1851 A1851 A1851 A1851 A OS(UT) 14:43:40 16:24:37 18:05:41 19:47:26 21:28:51 LOS(UT) 14:54:31 16:36:44 18:18:14 19:59:58 21:41:12 Max-El 13.023 43.998 Zenith 75.624 31.908 Time 14:48:56 16:29:59 || 19:52:59 21:34:21 Rep-band(stat.) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete ) Rep-sta rt 14:45:30 16:26:42 18:06:30/18:12:10 19:48:02 21:29:40 DP-mode OBS OBS/ACS/OBS OBS OBS OBS A CS-mode Normal{Poin ting Normal{Poin ting Normal{Poin ting Normal{Poin ting Normal{P oin ting A CS-spn/ � s � s |/| |/| |/| 8.67, 169.45 8.71, 169.84 A ttitude 2 4 209.270 17.778 310.089 3 5 2 4 209.269 17.778 310.089 3 5 2 4 209.269 17.778 310.089 3 5 2 4 209.270 17.779 310.089 3 5 2 4 209.270 17.779 310.089 3 5 OP-sta rt(CE) 14:50:46 ( 00h ) Cont ( 0Ah ) Cont ( 13h ) Cont ( 1Ch ) Con t ( 25h ) GIS HAM ERR ERR/RST Normal Normal Normal Normal A CS ERR (SH)MOMCHG ||- || ||{ ||{ SIS-mode F ain t/F ain t 0123/2301 F ain t/F ain t 0123/2301 F ain t/F ain t 0123/2301 F ain t/F ain t 0123/2301 F ain t/F ain t 0123/2301 S0/1-TECT � 32 : 94/ � 33 : 01 � 33 : 38/ � 33 : 45 � 33 : 67/ � 33 : 74 � 34 : 25/ � 34 : 33 � 34 : 83/ � 34 : 91 S0/1-CCDT � 59 : 65/ � 59 : 42 � 59 : 79/ � 59 : 51 � 59 : 84/ � 59 : 56 � 59 : 84/ � 59 : 61 � 59 : 98/ � 59 : 70 GIS-mode PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) GIS LD Hit 22cps/24cps 27cps/26cps 29cps/22cps 30cps/31cps 26cps/25cps P X Y R S Pos MErr HV HL Gain RT-L RT-U T emp RBMT CalPk RT Pk CalCnt/time 10 8 8 5 0 FLF NO 3/4 48 159 218 17.5 17.4 388.83 184.28 1884 Pass: 941204-1030 3/4 40 159 218 12.0 405.76 180.43 1694 GIS Mo de Changes: None Battery Condition (min/max) BA T V{A BA T V{B BA T I{A BA T I{B BA T T{A BA T T{B 19.90/23.50 19.90/23.50 � 4 : 38/4.75 � 4 : 47/4.78 4.82/8.74 4.82/8.17 Maneuv er Op eration Sta rt Time T arget Name # ( � , � ) ( � , � , ) 12/05 04:40 Mrk231 5 ( 194.059 , 56.873 ) ( 193.709 , 33.051 , 319.541 ) Commen t: -4F 3 : SIS count rate of A1851 is 0.1c/s. SXW/ GU[Y_VZ\8 e5FE] CMD LOCK ON 8bPA XREP 8 h<>P??J repro mnC X LOCK OFF FoGTsB]:N:N repro B9?^u4G SIS F!f8>@C -60 fLNt7@?^ 3EzQO F8|;gJ AD8M]A 9H9Cvw R<A5?} 1yGu4 p@A59I< ?^ 6qP2^‘j~agJAF 3GriExd<I<?^K@HN]k0cF 3G.5B=^‘l{a