"$&%# OPERA TION REPOR T Rev.5 V er 3.1 94 ) 12 * 23 ( Y+ 671 KSC ’+ : M. Y amauc hi and T. Suzuki HCG57 P ASS 1 P ASS 2 P ASS 3 P ASS 4 P ASS 5 P ass No. 941223{0411 941223{0515 941223{0618 941223{0721 941223{0825 Op eration X REP OP/OG-13 WR T TCU MEM MODE ERRCODE RST OP ST AR T X REP SBR-A RNG RNG OFF X REP BDR STOP X REP BDR STOP X REP CPU2/3 STOP CPU2/3 RST GIS MEM MODE BDR STOP X REP BDR STOP X REP SBR-A RNG RNG OFF T a rget HCG57 HCG57 HCG57 HCG57 HCG57 A OS(UT) 5:21:45 7:02:24 8:43:58 10:25:45 12:07:24 LOS(UT) 5:33:00 7:15:20 8:56:58 10:38:29 12:19:20 Max-El 12.583 40.759 Zenith Zenith 35.751 Time 5:27:24 7:08:31 (8:49:59) (10:31:36) 12:12:59 Rep-band(stat.) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete ) Rep-sta rt 5:22:45 7:03:29 8:44:53/8:50:33 10:26:35/10:32:01 12:08:13 DP-mo de OBS OBS OBS OBS OBS A CS-mode Normal{Poin ting Normal{Poin ting Normal{Poin ting Normal{Poin ting Normal{Poin ting A CS-spn/ � s � s 14.63/179.86 14.68/179.86 14.78/179.96 14.83/180.06 |/| A ttitude 2 4 174.23670 68.00569 340.25224 3 5 2 4 174.23750 68.00580 340.25190 3 5 2 4 174.23707 68.00563 340.25227 3 5 2 4 174.23622 68.00544 340.25039 3 5 2 4 174.23723 68.00586 340.25091 3 5 OP-sta rt(CE) 5:29:12 ( 00h ) Cont ( 08h ) Cont ( 10h ) Cont ( 18h ) Cont ( 20h ) GIS HAM ERR Normal Normal Normal Err/RST Normal A CS ERR (SH)MOMCHG || || || || SIS-mo de F ain t/F ain t 0101/2323 F ain t/F ain t 0101/2323 F ain t/F ain t 0101/2323 F ain t/F ain t 0101/2323 F ain t/F ain t 0101/2323 S0/1-TECT � 34 : 59/ � 34 : 76 � 34 : 01/ � 34 : 23 � 33 : 42/ � 33 : 55 � 32 : 84/ � 32 : 97 � 32 : 55/ � 32 : 58 S0/1-CCDT � 61 : 57/ � 61 : 30 � 61 : 34/ � 61 : 06 � 61 : 10/ � 60 : 83 � 60 : 73/ � 60 : 50 � 60 : 35/ � 60 : 12 GIS-mo de PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) GIS LD Hit 24.0/23.8cps 20.6/24.2cps 23.1/30.0cps 24.6/27.7cps 23.6/24.4cps P X Y R S P os MErr HV HL Gain RT-L RT-U T emp RBMT CalPk RT Pk CalCnt/time 10 8 8 5 0 FLF No 3/4 48 159 218 16.9 17.4 390.08 183.96 1064 Pass: 941223-0411 3/4 40 159 218 11.5 409.69 180.50 1048 GIS Mo de Changes: None Battery Condition (min/max) BA T V{A BA T V{B BA T I{A BA T I{B BA T T{A BA T T{B 20.00/23.50 20.00/23.50 � 4 : 34/4.75 � 4 : 34/4.78 4.82/9.03 4.82/8.46 Commen t: ,3J 0 : HCG57 was observ ed. Its intensit y is 0.016 cts/s/GIS and 0.015 cts/s/SIS. V37NL@X pass YO[8B @^VJF :R\b hcg8? QIC5 D59=]- 5^EMj nJ\b fd_iI/ PJ KUL;5:FA^ HCG57 KTWJF:R] SIS EKLFMHe_d81NQD5L>S^4FX3kmo;@NG6HPAR6^‘p.a 4_]V3Kl77B@^LPEZ!E<^‘q2a