"$&%# OPERA TION REPOR T Rev.5 V er 3.1 94 ) 12 * 24 ( Y+ 672 KSC ’+ : M. Y amauc hi and T. Suzuki HCG57/GRS1227+025/LSS cent.(#1) P ASS 1 P ASS 2 P ASS 3 P ASS 4 P ASS 5 P ass No. 941224{0411 941224{0514 941224{0618 941224{0721 941224{0825 Op eration X REP OP/OG-03 WR T TCU MEM MODE ERRCODE RST OP ST AR T X REP SBR-A RNG SCT-02 WR T S-CTLG CHK OBSER VE MODE CPU2/3 STOP CPU2/3 RST RNG OFF X REP BDR STOP X REP BDR STOP X REP SBR-A RNG CPU2/3 STOP CPU2/3 RST GIS MEM MODE RNG OFF X REP T a rget HCG57 HCG57 HCG57 HCG57 HCG57 A OS(UT) 5:18:03 6:59:40 8:40:55 10:22:59 12:04:35 LOS(UT) 5:30:34 7:12:37 8:53:56 10:35:31 12:16:16 Max-El 17.892 52.190 Zenith 70.721 27.027 Time 5:24:22 7:05:35 (8:47:07) 10:28:43 12:10:01 Rep-band(stat.) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete ) Rep-sta rt 5:19:51 7:00:24 8:41:51/8:47:44 10:23:42 12:05:36 DP-mo de OBS OBS/ACS/OBS OBS OBS OBS A CS-mode Normal{Poin ting Normal{Poin ting Normal{Poin ting Normal{Poin ting Normal{Poin ting A CS-spn/ � s � s 15.60/181.10 15.65/181.19 15.73/181.18 15.81/181.36 |/| A ttitude 2 4 174.23674 68.00580 340.25144 3 5 2 4 174.23707 68.00573 340.25155 3 5 2 4 174.23715 68.00558 340.25143 3 5 2 4 174.23693 68.00557 340.25262 3 5 2 4 174.24175 68.00706 340.25387 3 5 OP-sta rt(CE) 5:27:21 ( 00h ) Cont ( 08h ) Cont ( 10h ) Cont ( 18h ) Cont ( 20h ) GIS HAM ERR Normal Err/RST Normal Normal Normal A CS ERR (SH)MOMCHG || || || || SIS-mo de F ain t/F ain t 0101/2323 F ain t/F ain t 0101/2323 F ain t/F ain t 0101/2323 F ain t/F ain t 0101/2323 F ain t/F ain t 0101/2323 S0/1-TECT � 32 : 79/ � 33 : 01 � 32 : 60/ � 32 : 77 � 32 : 26/ � 32 : 38 � 31 : 92/ � 31 : 95 � 31 : 82/ � 31 : 85 S0/1-CCDT � 59 : 74/ � 59 : 47 � 59 : 74/ � 59 : 47 � 59 : 74/ � 59 : 47 � 59 : 60/ � 59 : 37 � 59 : 46/ � 59 : 19 GIS-mo de PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) GIS LD Hit 24.5/22.9cps 23.6/24.0cps 27.6/30.029.3cps 24.6/26.2cps 22.8/24.4cps P X Y R S P os MErr HV HL Gain RT-L RT-U T emp RBMT CalPk RT Pk CalCnt/time 10 8 8 5 0 FLF No 3/4 48 159 218 19.1 19.6 383.45 184.36 1215 Pass: 941224-0411 3/4 40 159 218 13.6 401.84 180.24 1115 GIS Mo de Changes: None Battery Condition (min/max) BA T V{A BA T V{B BA T I{A BA T I{B BA T T{A BA T T{B 20.00/23.50 20.00/23.50 � 4 : 25/4.75 � 4 : 25/4.78 4.82/9.03 4.82/8.46 Manoeuvre Op eration Sta rt Time T arget Name # ( � , � ) ( � , � , ) 12/25 7:15 GRS1227+025 4 ( 187.4720 , 2.2240 ) ( 187.2671 , 87.7597 , 336.4481 ) 12/25 21:30 LSS cent.1 5 ( 198.5600 , 31.1920 ) ( 198.2087 , 57.8247 , 330.0138 ) Commen t: -4M / :The intensit y of HCG57 is 0.015 cts/s/GIS and 0.014 cts/s/SIS. [4N^_I Nbj ei e‘k EC8 KmrS 8>8s t1M , M w<l: O? YLco aX5F HR T8S 8L0 R8J @D<lrR8!LN:UK7SsJZWV<F;U@H7DMI?@7V@H:=Q@Dmpu3q 9Fn[4lbjeie‘kKYIB ;nC879OC 878RM<6F DS8K .... J v7GGRlcoa X@F;UJ] PH@Q7Q@Dm [4MfodghR HCG xym\4J2AIBmpz.q