#%’&$ OPERA TION REPOR T Rev.5 V er 3.1 94 * 12 + 27 ) Y+ 675 KSC (, : M. Y amauc hi and T. Suzuki A2634 / Mrk273 P ASS 1 P ASS 2 P ASS 3 P ASS 4 P ASS 5 P ass No. 941227{0307 941227{0411 941227{0514 941227{0618 941227{0721 Op eration X REP SBR-A RNG OP/OG-12 WR T TCU MEM MODE OP ST AR T RNG OFF X REP SCT-04 WR T S-CTLG CHK OBSER VE MODE BDR STOP X REP X REP BDR STOP X REP BDR STOP X REP SBR-A RNG CPU2/3 STOP CPU2/3 RST GIS MEM MODE RNG OFF T a rget A2634 A2634 A2634 A2634 A OS(UT) 5:09:19 6:50:52 8:32:35 10:14:16 LOS(UT) 5:22:26 (7:03:36) 8:45:31 10:26:41 Max-El 42.081 Zenith Zenith 36.158 Time 5:15:23 (6:56:52) (8:38:30) 10:19:55 Rep-band(stat.) ( ) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete ) Rep-sta rt 5:09:54 6:51:22/6:57:54 3:33:32/8:39:18 10:14:44 DP-mo de OBS OBS/ACS/OBS OBS OBS A CS-mode Normal{Poin ting Normal{Poin ting Normal{Poin ting Normal{Poin ting A CS-spn/ � s � s 14.92/264.89 14.97/265.10 14.96/265.40 15.01/265.61 A ttitude 2 4 3 5 2 4 354.80816 62.80419 190.62290 3 5 2 4 354.80849 62.80434 190.62328 3 5 2 4 354.80876 62.80424 190.62255 3 5 2 4 354.80874 62.80439 190.62317 3 5 OP-sta rt(CE) ( ) 5:19:38 ( 00h ) Cont ( 0Ah ) Cont ( 14h ) Cont ( 1Eh ) GIS HAM ERR Normal Normal Normal Err/RST A CS ERR || || || || SIS-mo de F ain t/F ain t 0123/2301 F ain t/F ain t 0123/2301 F ain t/F ain t 0123/2301 F ain t/F ain t 0123/2301 S0/1-TECT � 37 : 35/ � 37 : 39 � 36 : 87/ � 36 : 95 � 36 : 24/ � 36 : 37 � 35 : 61/ � 35 : 79 S0/1-CCDT � 61 : 67/ � 61 : 77 � 61 : 67/ � 61 : 77 � 61 : 67/ � 61 : 77 � 61 : 62/ � 61 : 77 GIS-mo de PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) GIS LD Hit 29.9/24.2cps 28.5/27.1cps 26.5/31.7cps 25.0/24.2cps P X Y R S P os MErr HV HL Gain RT-L RT-U T emp RBMT CalPk RT Pk CalCnt/time 10 8 8 5 0 FLF No 3/4 48 159 218 14.2 14.1 393.65 183.88 5824 Pass: 941227-0411 3/4 40 159 218 8.2 416.24 180.93 5750 GIS Mo de Changes: None Battery Condition (min/max) BA T V{A BA T V{B BA T I{A BA T I{B BA T T{A BA T T{B 20.00/23.50 20.10/23.50 � 4 : 16/4.75 � 4 : 34/4.78 4.82/9.03 4.82/8.46 Manoeuvre Op eration Sta rt Time T arget Name # ( � , � ) ( � , � , ) 12/27 19:10 Mrk273 3 ( 206.1755 , 55.8867 ) ( 205.8207 , 34.0607 , 326.2865 ) Commen t: -3I!/ :SIS count rate of A2634 is 0.08 cts/s. U3OG@9 GIS I MkImage :8L<79G9CAIEV GIS I[]:b0L?SE>AW6X6WY_2Z U3I fm n l hcid J o <D G 9 G9 ^ qBC AW 1 Mr = G :P \ 4 >A P s: T R AWz x 5 t| u 3 I‘ N I p LEhcid>AW U3IgXeik A u yvw J{> KQ H SIS E O}< jXg :aR D7 L>AW "L FO G QL [ ]:E ;L >AW ( ~.Z