$&(’% OPERA TION REPOR T Rev.5 V er 3.1 95 + 1 , 18 * Y+ 697 KSC )- : Y. Ueda and A. Kumada PSR B 1055-52/G 272.2-3.2 P ASS 1 P ASS 2 P ASS 3 P ASS 4 P ASS 5 P ass No. 950118{1236 950118{1443 950118{1546 Op eration X-REP SBR-A RNG OP/OG-04 WR T TCU MEM MODE S-03 CTLG WR T S-CTLG CHK OBSER VE MODE ERR CODE RST OP ST AR T RNG OFF Y ohk oh X REP BDR STOP X-REP BDR STOP X REP SBR-A RNG CPU-2 STOP CPU-3 STOP CPU-2 RST CPU-3 RST GIS MEM MODE RNG OFF T a rget PSR B 1055-52 PSR B 1055-52 PSR B 1055-52 A OS(UT) 17:53:51 21:16:59 22:58:37 LOS(UT) 18:06:09 21:29:13 23:10:22 Max-El 33.683 Zenith 38.778 Time 17:59:42 (21:22:33) 23:03:55 Rep-band(stat.) X ( Complete ) ( ) X ( Complete ) X ( Complete ) ( ) Rep-sta rt 17:54:20 21:17:29/21:23:11 22:59:07 DP-mo de OBS/ACS/OBS OBS OBS A CS-mode Normal{Poin ting Normal{Poin ting Normal{Poin ting A CS-spn/ � s � s |/| |/| 8.90/151.26 A ttitude 2 4 164.19216 142.36097 314.92687 3 5 2 4 3 5 2 4 164.19205 142.36052 314.92774 3 5 2 4 164.19179 142.36120 314.92602 3 5 2 4 3 5 OP-sta rt(CE) 18:03:21 ( 00h ) ( ) Cont ( 0Fh ) Cont ( 17h ) ( ) GIS HAM ERR Normal Normal Normal A CS ERR (SH)MOMCHG || || SIS-mo de F ain t/F ain t 0101/2323 F ain t/F ain t 0101/2323 F ain t/F ain t 0101/2323 S0/1-TECT � 36 : 43/ � 36 : 47 � 36 : 58/ � 36 : 61 � 36 : 92/ � 36 : 90 S0/1-CCDT � 61 : 62/ � 61 : 62 � 61 : 62/ � 61 : 48 � 61 : 62/ � 61 : 44 GIS-mo de PH(8{6{6{5{0) PH(8{6{6{5{0) PH(8{6{6{5{0) GIS LD Hit 26.4/23.3 33.6/33.4cps 29.2/28.6cps P X Y R S P os MErr HV HL Gain RT-L RT-U T emp RBMT CalPk RT Pk CalCnt/time 8 6 6 5 0 FLF No 3/4 48 159 218 15.8 15.8 390.27 183.83 772 Pass: 950118-1236 3/4 40 159 218 10.4 412.25 180.61 659 GIS Mo de Changes: to (10-8-8-5-0-0) (G 272.2-3.2) Battery Condition (min/max) BA T V{A BA T V{B BA T I{A BA T I{B BA T T{A BA T T{B 19.90/23.50 19.90/23.50 � 4 : 38/4.75 � 4 : 43/4.78 4.82/8.74 4.82/7.61 Manoeuvre Op eration Sta rt Time T arget Name # ( � , � ) ( � , � , ) 01/18 23:40 G 272.2-3.2 2 ( 136.6667 , � 52 : 0903 ) ( 136.3640 , 141.8902 , 283.9164 ) Commen t: /3M 1 : W e observed PSR B 1055-52. Count rate was 0.01 SIS c/sec. >>_c^KSdnpJ!a:rgH‘VYF;QAe2t:B<?\q\G5XH56MKdbgN#[TEF5XMCf k"oM 1[TEF5QALlH56MNwvGAeimzj {3M yd O? @ P WK 0 M ]5 u xh MM V 4 BD H 8 s? \ V @;d DUE H @Q @ Q M4 [ R Q@ Be 9Z 5 < R7 XMC=YIJ9J9|.GAei}zj