%’)(& OPERA TION REPOR T Rev.5 V er 3.1 95 , 2 - 23-24 + Y+ 733-734 KSC *. : H. Kunieda, S. Skinner, E. Miy ata and Y. Tsub oi A2151/A2147 P ASS 1 P ASS 2 P ASS 3 P ASS 4 P ASS 5 P ass No. 950223{1547 950224{0102 950224{0309 950224{0412 Op eration X-REP OP/OG-10 WR T TCUMEMMODE ACS ER RST OP ST AR T X-REP SBR-A RNG S-CTLG WR T S-CTLG CHK OBSER VEMODE RNG OFF X-REP SBR-A RNG CPU-2 STOP CPU-3 STOP CPU-2 RST CPU-3 RST GIS MEM MODE ADRS-ON RNG OFF X-REP T a rget A2151 A2151 A2147 A2147 A OS(UT) 23:08:48 00:50:38 04:13:24 05:54:44 LOS(UT) 23:20:40 01:02:28 04:25:27 06:06:16 Max-El 16.994 51.85 66.64 24.21 Time 23:14:43 00:55:53 04:18:48 06:00:01 Rep-band(stat.) X ( Complete ) X ( Complete ) ( ) X ( Complete ) X ( Complete ) Rep-sta rt 23:09:58 00:51:12 04:14:16 06:55:20 DP-mo de OBS OBS/ACS/OBS OBS OBS A CS-mode Normal{Poin ting Normal{Poin ting Normal{Poin ting Normal{Poin ting A CS-spn/ � s � s |/| |/| |/| |/| A ttitude 2 4 240.943 72.343 0.462 3 5 2 4 240.943 72.343 0.462 3 5 2 4 3 5 2 4 240.259 74.147 0.430 3 5 2 4 240.258 74.144 0.429 3 5 OP-sta rt(CE) 23:17:26 ( 00h ) Cont ( 0Ah ) ( ) Cont ( 21h ) Cont ( 2Bh ) GIS HAM ERR Normal Normal Normal Normal A CS ERR (SH)MOMCHG Normal |{ |{ SIS-mo de F ain t/F ain t 0123/2301 F ain t/F ain t 0123/2301 Bright/Brigh t 0123/2301 Bright/Brigh t 0123/2301 S0/1-TECT � 39 : 39/ � 39 : 09 � 39 : 58/ � 39 : 33 � 38 : 81/ � 38 : 56 � 38 : 18/ � 37 : 92 S0/1-CCDT � 61 : 62/ � 61 : 72 � 61 : 62/ � 61 : 72 � 61 : 62/ � 61 : 72 � 61 : 62/ � 61 : 72 GIS-mo de PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) GIS LD Hit 26/28cps 28/27cps 27/28cps 28/29cps P X Y R S P os MErr HV HL Gain RT-L RT-U T emp RBMT CalPk RT Pk CalCnt/time 10 8 8 5 0 FLF No 3/4 48 159 218 16.9 16.9 387.34 184.02 1044 Pass: 950223-1547 3/4 40 159 218 11.5 410.21 180.39 1027 GIS Mo de Changes: None Battery Condition (min/max) BA T V{A BA T V{B BA T I{A BA T I{B BA T T{A BA T T{B 20.10/23.40 20.20/23.40 � 4 : 03/4.73 � 4 : 17/4.76 4.82/9.03 6.48/7.61 Manoeuvre Op eration Sta rt Time T arget Name # ( � , � ) ( � , � , ) 2/24 01:21 A2147 4 ( 240.5042 , 15.9861 ) ( 240.2606 , 74.1479 , 0.4286 ) Commen t: / 1H#0 : ASCA mov ed from A2151 to A2147. In tensit y of A2151 is 0.13 c/s/GIS (r < 4 0 , BGD sub.) and 0.2 c/s/SIS (r < 6 0 ). /1SU];R_‘T:Vc;KD<?T<5<SU];R6bA?[dS raijin 6 down <S^ LCH b o ot QmfTlH2‘KDpovDtbT>HdMws Bright Mo de GK:B7F6OFRE5NAC3K=T ( g i ) h1IS$"BF8X53"1@A?E34HG9HWuHYGey;PC<KA?T @R@RZx8"rjHVnFkazJE AC7?T"16pqkaDF3HIBO3T ( \! )