%’)(& OPERA TION REPOR T Rev.5 V er 3.1 95 , 6 - 22 + Y+ 852 KSC *. : A. F uruza w a and T. Asan uma MS1241.5+1710 ! GRS1227+025 P ASS 1 P ASS 2 P ASS 3 P ASS 4 P ASS 5 P ass No. 950622{0928 950622{1032 950622{1135 950622{1238 950622{1342 Op eration X REP SBR-A RNG ACS ERR RST OP/OG-11 WR T TCU MEM MOD OP ST AR T RNG OFF X REP S-CTLG WT/CK OBSER VE MODE X REP BDR STOP X REP BDR STOP X REP SBR-A RNG CPU STP/RST GIS MEM MODE RNG OFF X REP DE-0 ADRS ON T a rget MS1241.5+1710 MS1241.5+1710 MS1241.5+1710 MS1241.5+1710 MS1241.5+1710 A OS(UT) 13:51:01 15:32:33 17:14:19 18:56:08 20:38:21 LOS(UT) 14:04:15 15:45:44 17:27:11 19:08:21 20:48:14 Max-El 33.533 77.093 Zenith 43.367 12.810 Time 13:57:22 15:38:44 | 19:01:43 20:42:43 Rep-band(stat.) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete ) Rep-sta rt 13:51:43 15:33:24 17:15:13/17:20:53 18:56:50 20:38:46 DP-mo de OBS OBS OBS OBS OBS A CS-mode Normal{Poin ting Normal{Poin ting Normal{Poin ting Normal{Poin ting Normal{Poin ting SUN-p os � s / � s {/{ {/{ 2.22/179.06 2.17/179.73 2.09/180.43 A ttitude 2 4 191.25493 73.05863 154.54525 3 5 2 4 191.25465 73.05880 154.54508 3 5 2 4 191.25506 73.05910 154.54583 3 5 2 4 191.25560 73.05911 154.54439 3 5 2 4 191.25460 73.05895 154.54567 3 5 OP-sta rt(CE) 14:01:19 ( 00h ) Cont ( 0Ah ) Cont ( 14h ) Cont ( 1Eh ) Cont ( 28h ) GIS HAM ERR Normal Normal Normal Normal Normal A CS ERR (SH)MOMCHG Normal Normal Normal Normal SIS-mo de F ain t/F ain t 1212/3030 F ain t/F ain t 1212/3030 F ain t/F ain t 1212/3030 F ain t/F ain t 1212/3030 F ain t/F ain t 1212/3030 S0/1-TECT � 43 : 37/ � 43 : 17 � 43 : 71/ � 43 : 51 � 44 : 04/ � 43 : 90 � 44 : 68/ � 44 : 58 � 45 : 21/ � 45 : 12 S0/1-CCDT � 61 : 67/ � 61 : 81 � 61 : 67/ � 61 : 77 � 61 : 67/ � 61 : 77 � 61 : 67/ � 61 : 77 � 61 : 67/ � 61 : 77 GIS-mo de PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) GIS LD Hit 28/26 cps 30/30 cps 30/32 cps 30/29 cps 23/24 cps P X Y R S P os MErr HV HL Gain RT-L RT-U T emp RBMT CalPk CalCnt/sec RT Pk 10 8 8 5 0 FLF No 3/4 48 159 218 13.6 13.6 390.77 0.104 183.86 Pass: 950622-0928 3/4 40 159 218 7.1 422.44 0.0968 180.98 SIS Mo de Changes: F/B 1212/3030 Lvl:o�(MS1241.5+1710),F/F 1111/3333 Lvl:o�(GRS1227+025) GIS Mo de Changes: None Battery Condition (min/max) BA T V{A BA T V{B BA T I{A BA T I{B BA T T{A BA T T{B 20.10/23.20 20.00/23.10 � 4 : 42/4.73 � 4 : 34/4.76 5.10/9.03 9.32/10.77 Maneuv er Op eration Sta rt Time T a rget Name # ( � , � ) ( � , � , ) 6/23 03:50 GRS1227+025 5 ( 187.4720 , 2.2240 ) ( 187.6773 , 87.7643 , 164.2546 ) Commen t: /3 G$0 : ASCA observed MS1241.5+170. This is a distant clusters of galaxies at the redshift � 0.3. The counting rate from a whole cluster is 0.04cts/sec/GIS. D7J S TG _ X ^: ! b FJ c < Ad@ A 6 Nfj 3 J mn : l ;E@ A < I@=f q 6 Gu o ?K P: p =; e 8 NG HsGkG"t9L>O79fgICJEST:v1E6iwh 2Rf cluster G sis W]V[‘H5IMF ;xYZ\GUF5NGBeN#JE9@=fr4fgaQh