"$&%# OPERA TION REPOR T Rev.5 V er 3.1 95 ) 6 * 23 ( Y+ 853 KSC ’+ : A. F uruza w a and T. Asan uma GRS1227+025 ! R GH80 ! NGC4579 P ASS 1 P ASS 2 P ASS 3 P ASS 4 P ASS 5 P ass No. 950623{0825 950623{0928 950623{1031 950623{1135 950623{1238 Op eration X REP ACS ERR RST OP/OG-01 WR T TCU MEM MOD OP ST AR T X REP SBR-A RNG S-CTLG WT/CK OBSER VE MODE RNG OFF X REP BDR STOP X REP BDR STOP X REP CPU STP/RST GIS MEM MODE OP/OG-04 WR T TCU MEM MOD OP ST AR T X REP SBR-A RNG RNG OFF T a rget GRS1227+025 GRS1227+025 GRS1227+025 GRS1227+025 GRS1227+025 A OS(UT) 12:07:08 13:47:56 15:29:20 17:11:09 18:52:42 LOS(UT) 12:18:44 14:00:52 15:42:26 17:23:53 19:04:56 Max-El 13.836 43.531 Zenith 78.463 33.372 Time 12:12:47 13:53:54 | 17:16:56 18:58:17 Rep-band(stat.) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete ) Rep-sta rt 12:08:25 13:48:59 15:30:13/15:36:03 17:12:00 18:53:35 DP-mo de OBS OBS OBS OBS OBS A CS-mode Normal{Poin ting Normal{Poin ting Normal{Poin ting Normal{Poin ting Normal{Poin ting SUN-p os � s / � s {/{ {/{ {/{ 9.07/117.79 9.04/117.50 A ttitude 2 4 187.67745 87.76388 164.25223 3 5 2 4 187.67726 87.76402 164.25250 3 5 2 4 187.67721 87.76413 164.25242 3 5 2 4 187.67725 87.76436 164.25223 3 5 2 4 187.67734 87.76442 164.25328 3 5 OP-sta rt(CE) 12:14:57 ( 00h ) Cont ( 0Ah ) Cont ( 12h ) 17:21:02 ( 00h ) Cont ( 0Ah ) GIS HAM ERR Normal Normal Normal ERR ! NML Normal A CS ERR (SH)MOMCHG Normal Normal Normal Normal SIS-mo de F ain t/F ain t 1111/3333 F ain t/F ain t 1111/3333 F ain t/F ain t 1111/3333 F ain t/F ain t 1111/3333 F ain t/F ain t 1111/3333 S0/1-TECT � 42 : 88/ � 42 : 69 � 42 : 93/ � 42 : 78 � 42 : 88/ � 42 : 69 � 43 : 17/ � 43 : 03 � 43 : 27/ � 43 : 12 S0/1-CCDT � 61 : 67/ � 61 : 81 � 61 : 67/ � 61 : 77 � 61 : 67/ � 61 : 77 � 61 : 67/ � 61 : 77 � 61 : 67/ � 61 : 77 GIS-mo de PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) GIS LD Hit 28/28 cps 29/29 cps 31/30 cps 30/31 cps 28/27 cps P X Y R S P os MErr HV HL Gain RT-L RT-U T emp RBMT CalPk CalCnt/sec RT Pk 10 8 8 5 0 FLF No 3/4 48 159 218 15.3 15.2 391.79 0.106 183.89 Pass: 950623-0825 3/4 40 159 218 8.7 419.61 0.0936 180.73 SIS Mo de Changes: F/F 1111/3333 Lvl:o�(GRS1227+025),F/B 1212/3030 Lvl:o�(RGH80) F/B 0101/2323 Lvl:o�(NGC4579) GIS Mo de Changes: None Battery Condition (min/max) BA T V{A BA T V{B BA T I{A BA T I{B BA T T{A BA T T{B 20.10/23.20 20.10/23.10 � 4 : 51/4.73 � 4 : 25/4.76 5.10/8.74 9.60/11.07 Maneuv er Op eration Sta rt Time T a rget Name # ( � , � ) ( � , � , ) 6/23 19:55 RGH80 6 ( 200.0583 , 33.1356 ) ( 200.2872 , 56.9213 , 136.1976 ) 6/25 5:25 NGC4579 1 ( 189.4333 , 11.8196 ) ( 189.6424 , 78.1986 , 155.8773 ) Commen t: , .9 - : ASCA observed GRS1227+025(PI Hay ashida (JUS)). The source ma y b e presen t on the expected p osition in the SIS image. But in the GIS image, it could not b e found. !547> SIS 8D15H@G:,J84<02?A 3C273 9EI@F:DK35LMB =@/>C;6C;6?ANOB