&(*)’ OPERA TION REPOR T Rev.5 V er 3.1 95 - 7 . 25/26 , Y+ 885/6 KSC +/ : K. Y oshida and H. Chihara, H. Eza w a A1942/XI Bo otis/GS1124-68/PKS0208-512 P ASS 1 P ASS 2 P ASS 3 P ASS 4 P ASS 5 P ass No. 950725{1342 950725{1445 950726{0001 950726{0104 950726{0207 Op eration X REP OP/OG 12 WR T TCU MEM MOD SCA T WR T/CHK OBSER V MODE ACS ERR RST OP ST AR T (YOHKOH) X REP SCA T WR T/CHK OBSER VE MODE BDR STP X REP CPU STP/RST GIS MEM MODE BDR STP (YOHKOH) X REP SBR A RNG ACS ERR RST RNG OFF T a rget A1942 XI Bo otis XI Bo otis A OS(UT) 20:42:22 00:05:20 03:28:50 LOS(UT) 20:55:04 00:18:24 03:40:24 Max-El 19.075 Zenith 23.511 Time 20:48:49 |{ 03:34:09 Rep-band(stat.) X ( Complete ) ( ) X ( Complete ) ( ) X ( Complete ) Rep-sta rt 20:43:44 00:06:12/00:12:24 03:29:53 DP-mo de OBS ! ACS ! OBS OBS ! ACS ! OBS OBS A CS-mode Normal{Poin ting Normal{Poin ting Normal{Poin ting SUN-p os � s / � s 13.15/104.96 0.82/173.86 0.84/187.18 A ttitude 2 4 219.7888 86.2854 172.7077 3 5 2 4 3 5 2 4 223.0637 70.9035 158.8510 3 5 2 4 3 5 2 4 223.0637 70.9035 158.8510 3 5 OP-sta rt(CE) 20:51:50 ( 00h ) ( ) Cont ( 16h ) ( ) Cont ( 23h ) GIS HAM ERR Normal Err ! Normal Normal A CS ERR (SH)MOMCHG Normal (SH)MOMCHG SIS-mo de F ain t 0101/2323 F ain t 1111/3333 F ain t 1111/3333 S0/1-TECT � 36 : 09/ � 36 : 22 � 37 : 50/ � 37 : 58 � 37 : 84/ � 37 : 83 S0/1-CCDT � 61 : 24/ � 61 : 06 � 61 : 62/ � 61 : 48 � 61 : 62/ � 61 : 77 GIS-mo de PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) GIS LD Hit 26/26 cps 25/31 cps 24/26 cps P X Y R S P os MErr HV HL Gain RT-L RT-U T emp RBMT CalPk CalCnt/sec RT Pk 10 8 8 5 0 FLF No 3/4 48 759 218 14.2 14.1 391.46 0.0964 183.83 Pass: 950725-1342 3/4 40 159 218 8.7 416.13 0.1026 180.93 SIS Mo de Changes: F ain t 1111/3333 (XI Bo otis) GIS Mo de Changes: None Battery Condition (min/max) BA T V{A BA T V{B BA T I{A BA T I{B BA T T{A BA T T{B 19.60/23.30 19.70/23.10 � 4 : 55/4.75 � 4 : 21/4.78 5.10/9.03 10.19/11.96 Maneuv er Op eration Sta rt Time T a rget Name # ( � , � ) ( � , � , ) 7/25 22:50 XI Bo otis 2 ( 222.8447 , 19.1025 ) ( 223.0620 , 70.9050 , 158.8527 ) 7/26 11:40 GS 1124-68 3 ( 171.6109 , -68.6757 ) ( 172.1210 , 158.7648 , 135.5171 ) 7/26 19:40 PKS 0208-512 4 ( 32.6917 , -51.0175 ) ( 32.3958 , 141.1048 , 6.0108 ) Commen t: 05P"3 : The counting rate of XI Bo otis was 0.09 cnts/s/GIS and 0.3 cnts/s/SIS. ^ASXNBH=X LdZ Ej o N MX T AEs i v |\ A TA E <r 5� A Q _8 K B< 5 ! N6 Y L� A > ow G �8 > W 8K Bs tqk K u2eP�hV�h<{#Pg\z]K8TAEs77 89hEGQ?EETA8zR $\@CJz]K>YP K‘8KBstm}u 7 aP1KQ @D;Ab8 F[9rL: U8=V lN�A8K BOs�yQ %~;B] MXL ( � 8 xnN ) cI?TAEsKUf8E45N8=MX 4 xp=L89PQrVQXIW8KBs ( � )