#%’&$ OPERA TION REPOR T Rev.5 V er 3.1 95 * 9 + 23 ) Y+ 944 KSC (, : H. Negoro and K. T orii PKS1749+096 ! V566 Oph ! X1724-308 P ASS 1 P ASS 2 P ASS 3 P ASS 4 P ASS 5 P ass No. 950922{1032 950922{1136 950922{1239 950922{1342 950922{1446 Op eration X REP OP/OG 14 WR T TCU MEM MODE ACS ERR RST OP ST AR T (YOHKOH) X REP ST AR-04 WR T S-CTLG CHK OBSER VE MODE BDR STP X REP ACS ERR RST BDR STP (YOHKOH) X REP SBR-A RNG CPU STP/RST GIS MEM MODE ACS ERR RST RNG OFF T a rget PKS1749+096 PKS1749+096 PKS1749+096 A OS(UT) 15:53:15 19:14:46 22:37:56 LOS(UT) 16:04:07 19:27:36 22:50:07 Max-El 16.949 Zenith 25.387 Time 15:58:08 |{ 22:43:25 Rep-band(stat.) X ( Complete ) ( ) X ( Complete ) ( ) X ( Complete ) Rep-sta rt 15:53:41 19:15:47/19:21:29 22:39:02 DP-mo de OBS ! TCU ! OBS OBS ! ACS ! OBS OBS ! GIS ! OBS A CS-mode Normal{Poin ting Normal{Poin ting Normal{Poin ting SUN-p os � s / � s |{ / |{ 1.52 / 357.45 1.62 / 354.87 A ttitude 2 4 268.0839 80.2821 179.7833 3 5 2 4 3 5 2 4 268.0839 80.2821 179.7833 3 5 2 4 3 5 2 4 268.0839 80.2821 179.7833 3 5 OP-sta rt(CE) 16:00:43 ( 00h ) ( ) Cont ( 11h ) ( ) Cont ( 25h ) GIS HAM ERR Normal Normal Err ! Normal A CS ERR (SH)MOMCHG (SH)MOMCHG (SH)MOMCHG SIS-mo de F ain t 1111/3333 F ain t 1111/3333 F ain t 1111/3333 S0/1-TECT � 35 : 99/ � 35 : 74 � 36 : 43/ � 36 : 22 � 37 : 89/ � 37 : 63 S0/1-CCDT � 61 : 57/ � 61 : 44 � 61 : 53/ � 61 : 30 � 61 : 62/ � 61 : 58 GIS-mo de PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) GIS LD Hit 24/24 cps 34/28 cps 25/22 cps P X Y R S P os MErr HV HL Gain RT-L RT-U T emp RBMT CalPk CalCnt CalTim RT Pk 10 8 8 5 0 FLF No 3/4 48 159 218 13.6 13.6 391.54 1659 15534 183.69 Pass: 950922-1032 3/4 40 159 218 7.6 419.27 1489 15534 180.98 SIS Mo de Changes: F/F 1111/3333 Level Discri 0.41 keV for V566 Oph F/B 1111/3333 Level Discri O� for for X1724-308 GIS Mo de Changes: None Battery Condition (min/max) BA T V{A BA T V{B BA T I{A BA T I{B BA T T{A BA T T{B 19.50/23.20 19.50/23.10 � 4 : 94/4.75 � 4 : 43/4.76 6.20/7.61 11.96/13.78 Maneuv er Op eration Sta rt Time T a rget Name # ( � , � ) ( � , � , ) 9/23 9:15 V566 Oph 5 ( 269.2167 , 4.9867 ) ( 269.4116 , 84.9471 , 180.0260 ) 9/24 14:50 X1724-308 6 ( 261.8900 , -30.8000 ) ( 262.1236 , 120.7524 , 174.7934 ) Commen t: .2C"0 : PKS1749+096 is observed. Counting rate of this source is 0.2 c/s for S0C1 (whole chip) and 0.06 c/s for GIS2+3 (4 arcmin radius). Both SIS and GIS energy sp ectra can b e well represented by a p ow er law model. QS6XR3?7F:<]N/‘RX6cb:@;]^gi_ !6jPmBeJ\SH@?7F:<]1Ck\VhZ6na@;] ( lW ) 2UO 5 I[ K Yr D o= I8 @ :<] - D\f F @q T C9 A Lo >= AE 5 Jp 3 9M @ 3< C @; 6\ f2 5I d4LsGK9AB:F;] ( Vh )