$&(’% OPERA TION REPOR T Rev.5 V er 3.1 95 + 10 , 7 * Y+ 959 KSC )- : Y. T a w ara and K. Kinugasa A3266/Dem71/PKS0634-205 P ASS 1 P ASS 2 P ASS 3 P ASS 4 P ASS 5 P ass No. 951007{0617 951007{0720 951007{0824 951007{0927 951007{1030 Op eration X REP OP/OG 06 WR T TCU MEM MODE OP ST AR T (YOHKOH) X REP ST AR-02 WR T S-CTLG CHK OBSER VE MODE BDR STP X REP CPU STP/RST GIS MEM MODE BDR STP (YOHKOH) X REP SBR-A RNG RNG OFF T a rget A3266 A3266 A3266 A OS(UT) 08:13:48 11:36:02 14:59:26 LOS(UT) 08:25:27 11:48:48 15:11:15 Max-El 13.651 Zenith 32.145 Time 08:19:28 |{ 15:04:47 Rep-band(stat.) X ( Complete ) ( ) X ( Complete ) ( ) X ( Complete ) Rep-sta rt 08:14:58 11:36:53/11:42:34 15:00:04 DP-mo de OBS OBS ! ACS ! OBS OBS A CS-mode Normal{Poin ting Normal{Poin ting Normal{Poin ting SUN-p os � s / � s 11.59 / 199.21 |{ / |{ |{ / |{ A ttitude 2 4 67.4262 151.3783 322.1361 3 5 2 4 3 5 2 4 67.4262 151.3783 322.1361 3 5 2 4 3 5 2 4 67.4262 151.3783 322.1361 3 5 OP-sta rt(CE) 08:21:34 ( 00h ) ( ) Cont ( 10h ) ( ) Cont ( 1Fh ) GIS HAM ERR Normal Normal Normal A CS ERR |{ |{ |{ SIS-mo de F ain t 1111/3333 F ain t 0123/2301 F ain t 1111/3333 S0/1-TECT � 35 : 90/ � 35 : 79 � 34 : 78/ � 34 : 81 � 33 : 96/ � 34 : 08 S0/1-CCDT � 61 : 62/ � 61 : 72 � 61 : 57/ � 61 : 58 � 61 : 20/ � 61 : 02 GIS-mo de PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) GIS LD Hit 23/23 cps 24/30 cps 26/24 cps P X Y R S P os MErr HV HL Gain RT-L RT-U T emp RBMT CalPk CalCnt CalTim RT Pk 10 8 8 5 0 FLF No 3/4 48 159 218 14.7 15.2 387.93 915 9278 183.85 Pass: 951006-0720 3/4 40 159 218 9.3 413.42 828 9278 180.68 SIS Mo de Changes: F/F 1111/3333 L VL Dscr 0.41 keV for A3266 F/B 1111/3333 L VL Dscr 0.41 keV for Dem 71 F/F 1111/3333 L VL Dscr o� for PKS0634-205 GIS Mo de Changes: None Battery Condition (min/max) BA T V{A BA T V{B BA T I{A BA T I{B BA T T{A BA T T{B 19.50/23.20 19.50/23.00 � 5 : 03/4.75 � 4 : 25/4.78 7.89/9.03 13.78/15.99 Maneuv er Op eration Sta rt Time T a rget Name # ( � , � ) ( � , � , ) 10/08 11:10 Dem 71 1 ( 76.4250 , -67.8769 ) ( 75.8868 , 157.8443 , 331.5904 ) 10/09 07:50 PKS0634-205 2 ( 99.1363 , -20.5814 ) ( 98.9078 , 110.6414 , 351.3127 ) Commen t: . 1E " 0 : 0.40 c/s/1sensor for GIS (within central 4 arcmin radius) and 1.8 c/s/1sensor for SIS (1 c hip). R8GND/O2XcWEgiA9bo1FI:M86 GIS J ACS JT_cqr4!uJsH;QA8<b^Z[‘c B Fpn#u4 15.99 uHA5@hxPmy8@2H9bj8<7BAFC2M82A94bdtke ]Z\acUD?C4M C2EA wEl vDC>=K 2H8<b o1EYc VZ\F GIS E QL AJ L6S 3O/O 2 XcWA8<bd fe