$&(’% OPERA TION REPOR T Rev.5 V er 3.1 95 + 12 , 11 * Y+ 1022 KSC )- : K. T am ura and J. Kataok a HCG42/IRAS 00317{2142 P ASS 1 P ASS 2 P ASS 3 P ASS 4 P ASS 5 P ass No. 951211{0103 951211{0206 951211{0310 951211{0413 951211{0516 Op eration X REP OP/OG-15 WR T TCU MEM MODE ACS ERR RST CPU2/3-RST OP ST AR T X REP RNG A ST AR-03 S-CTLG CHK OBSER VE MODE RNG OFF X REP BDR STP X REP BDR STP X REP RNG A CPU STP/RST GIS MEM MODE RNG OFF X REP ACS ERR RST T a rget HCG42 HCG42 HCG42 HCG42 HCG42 A OS(UT) 01:09:44 02:51:37 04:32:24 06:14:19 07:55:37 LOS(UT) 01:21:49 02:03:29 04:44:57 06:26:21 08:06:58 Max-El 20.542 59.547 Zenith 58.794 20.085 Time 01:15:44 02:56:52 | 06:19:42 08:00:50 Rep-band(stat.) X .Repstart1 01:11:29 ( Complete ) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete ) Rep-sta rt Repstart1 02:52:15 04:33:13/04:39:21 06:14:57 07:56:57 DP-mo de OBS ! TCU ! OBS OBS ! ACS ! OBS OBS OBS ! GIS MEM ! OBS OBS A CS-mode Normal{Poin ting Normal{Poin ting Normal{Poin ting Normal{Poin ting Normal{Poin ting SUN-p os � s / � s 8.32 / 154.69 8.40 / 154.76 8.49 / 154.67 8.55 / 154.66 8.60 /154.65 A ttitude 2 4 149.87131 109.61677 335.73592 3 5 2 4 149.87147 109.61688 335.73532 3 5 2 4 149.87130 109.61672 335.73521 3 5 2 4 149.87173 109.61667 335.73552 3 5 2 4 149.87203 109.61658 335.73530 3 5 OP-sta rt(CE) 01:18:43 ( 00h ) Cont ( 09h ) Cont ( 13h ) Cont ( 1Dh ) Cont ( 28h ) GIS HAM ERR Err ! Normal Normal Normal Normal Normal A CS ERR (SH)MOMCHG | | | (SH)MOMCHG SIS-mo de F ain t/F ain t 1111/3333 F ain t 1111/3333 F ain t/F ain t 1111/3333 F ain t 1111/3333 F ain t/F ain t 1111/3333 S0/1-TECT � 42 : 74/ � 42 : 64 � 42 : 35/ � 42 : 20 � 41 : 81/ � 41 : 57 � 41 : 18/ � 40 : 99 � 40 : 89/ � 40 : 69 S0/1-CCDT � 61 : 62/ � 61 : 72 � 61 : 62/ � 61 : 72 � 61 : 62/ � 61 : 72 � 61 : 62/ � 61 : 72 � 61 : 62/ � 61 : 72 GIS-mo de PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) GIS LD Hit 26/26 cps 31/28 cps 30/28 cps 27/30 cps 25/25 cps P X Y R S P os MErr HV HL Gain RT-L RT-U T emp RBMT CalPk CalCnt CalTim RT Pk GBitP 8 8 5 0 FLF No 3/4 48 159 218 17.5 17.4 380 1013 9576 184.1 Pass: 9512110301 3/4 40 159 218 10.9 405 922 9576 180.1 SIS Mo de Changes: HGC42: F/F 1111/3333, 0.41 keV discri. IRAS00317-2142: F/F for Hi-bit or B/B for other, 1111/3333, 0.41 keV discri. GIS Mo de Changes: PH (10{8{8{5{0) Battery Condition (min/max) BA T V{A BA T V{B BA T I{A BA T I{B BA T T{A BA T T{B 20.20/23.30 20.20/23.30 -4.38/4.73 -4.43/4.78 4.82/9.03 4.82/8.74 Maneuv er Op eration Sta rt Time T a rget Name # ( � , � ) ( � , � , ) 12/11 09:20 IRAS 00317{2142 4 ( 8.5571 , -21.4386 ) ( 8.7204 , 111.3004 , 203.2766 ) Commen t: /3L!2 : T oday’s targets is HCG42(PI=Sakima JPN). The coun t rates are 0.07 c/s/SIS. N?O?LW‘[!2H@Cc taget MgdKkn:6EG049ECHAceupf m3Mq9<b vQG q.J @H 3#> BP @Ccs yRr L8D MZ\ F7G 7P @C: ijK MwU G;Gb 20m X a^_L5tVhK7<=I:H;P@CczECSTloHxt@CLHb1:xEG@P7P@CeY]HAfe{"fc