!#%$" OPERA TION REPOR T Rev.5 V er 3.1 96 ( 1 ) 20 ’ Y+ 1064 KSC &* : H.Kub o and T.Kosuga NAB0205+024/GRB940217/CTB1 W est P ASS 1 P ASS 2 P ASS 3 P ASS 4 P ASS 5 P ass No. 960120{0412 960120{0515 960120{0619 960120{0722 960120{0825 Op eration X REP OP/OG-11 WR T TCU MEM MODE ST AR-02 WR T S-CTLG CHK OBS MODE OP ST AR T CPU STP/RST X REP SBR-A RNG RNG OFF X REP BDR STOP X REP BDR STOP X REP SBR-A RNG CPU STP/RST GIS MEM MODE RNG OFF X REP T a rget NAB0205+024 NAB0205+024 GRB940217 1 GRB940217 1 GRB940217 1 A OS(UT) 5:40:43 7:23:00 9:04:04 10:45:55 12:27:30 LOS(UT) 5:53:38 7:35:08 9:16:34 10:57:53 12:38:10 Max-El 25.264 67.197 Zenith 51.658 16.424 Time 5:47:16 7:28:28 | 10:51:19 12:32:24 Rep-band(stat.) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete ) Rep-sta rt 5:42:32 7:23:39 9:05:05/9:10:39 10:46:36 12:28:11 DP-mo de OBS ! TCU ! ACS ! OBS OBS OBS OBS ! GIS MEM ! OBS OBS A CS-mode Normal{Poin ting Normal{Poin ting Normal{Poin ting Normal{Poin ting Normal{Poin ting SUN-p os � s / � s 4.53/106.82 4.51/105.87 10.79/88.57 10.79/88.30 | / | A ttitude 2 4 32.1063 87.1414 204.4333 3 5 2 4 32.1065 87.1417 204.4331 3 5 2 4 30.0485 85.7395 211.0046 3 5 2 4 30.0491 85.7400 211.0054 3 5 2 4 30.0488 85.7398 211.0044 3 5 OP-sta rt(CE) 5:50:40 ( 00h ) Cont ( 08h ) Cont ( 16h ) Cont ( 1Fh ) Cont ( 26h ) GIS HAM ERR Err ! Normal Normal Normal Normal Normal A CS ERR | | | | | SIS-mo de F ain t/F ain t 0101/2323 F ain t/F ain t 0101/2323 F ain t/F ain t 0101/2323 F ain t/F ain t 0101/2323 F ain t/F ain t 0101/2323 S0/1-TECT � 38 : 52/ � 38 : 70 � 38 : 22/ � 38 : 46 � 37 : 55/ � 37 : 83 � 37 : 21/ � 37 : 58 � 37 : 25/ � 37 : 58 S0/1-CCDT � 61 : 67/ � 61 : 77 � 61 : 67/ � 61 : 77 � 61 : 67/ � 61 : 77 � 61 : 67/ � 61 : 77 � 61 : 62/ � 61 : 77 GIS-mo de PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) GIS LD Hit 26/24 cps 26/26 cps 30/29 cps 29/29 cps 27/27 cps P X Y R S P os MErr HV HL Gain RT-L RT-U T emp RBMT CalPk CalCnt CalTim RT Pk 10 8 8 5 0 FLF No 3/4 48 159 218 14.2 13.6 388 938 10002 184 Pass: 9601200515 3/4 40 159 218 8.2 414 821 10002 181 SIS Mo de Changes: NAB0205+024: 0101/2323, F/F for bit-H, B/B for bit-M, L VL OFF GRB940217: 0101/2323, F/F for bit-H, B/B for bit-M, L VL OFF CTB1 W est: 0202/2020, F/F for bit-H, B/B for bit-M, L VL OFF, ADRS ON(Bright Earth) GIS Mo de Changes: NAB0205+024: PH (10{8{8{5{0) for any bit GRB940217: PH (10{8{8{5{0) for any bit CTB1 W est: PH (8{8{8{5{0) for bit-H, PH (8{8{8{0{0) for bit-M Battery Condition (min/max) BA T V{A BA T V{B BA T I{A BA T I{B BA T T{A BA T T{B 19.60/23.30 19.60/23.30 -4.98/4.75 -4.34/4.78 5.37/6.48 4.82/8.46 Maneuv er Op eration Sta rt Time T a rget Name # ( � , � ) ( � , � , ) 1/20 8:55 GRB940217 1 5 ( 29.9000 , 4.0190 ) ( 30.0489 , 85.7396 , 211.0056 ) 1/20 17:15 GRB940217 2 6 ( 29.5900 , 3.8090 ) ( 29.7387 , 85.9486 , 211.0231 ) 1/21 0:55 GRB940217 3 1 ( 29.2800 , 3.5890 ) ( 29.4259 , 86.1683 , 211.0432 ) 1/21 8:40 CTB1 W est 2 ( 359.3667 , 62.4000 ) ( 359.5460 , 27.3016 , 227.0983 ) Commen t: +-. , : There seems no signi�can t xray source for GRB940217 in the �eld of view of GIS(p oin t-1).