&(*)’ OPERA TION REPOR T Rev.5 V er 3.1 96 - 2 . 11/12 , Y+ 1086/7 KSC +/ : T. Murak ami and S. Suzuki A521 P ASS 1 P ASS 2 P ASS 3 P ASS 4 P ASS 5 P ass No. 960211{1237 960211{1340 960211{1443 960211{1547 960212{0102 Op eration X REP OP/OG-10 WR T TCU MEM ACS ERR RST OP ST AR T X REP RNG ON RNG OF X REP BDR STP/X REP GIS HAM RST BDR STP X REP RNG ON CPU23 STP/RST GIS MEM MODE RNG OF X REP T a rget A521 A521 A521 A521 A521 A OS(UT) 18:05:08 19:46:35 21:27:21 23:09:10 00:50:30 LOS(UT) 18:16:50 19:58:43 21:40:20 23:21:57 01:02:53 Max-El 16.28 51.37 Zenith 69.61 27.499 Time 18:10:49 19:51:52 | 23:14:48 00:56:05 Rep-band(stat.) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete ) Rep-sta rt 18:07:13 19:47:24 21:28:28/21:34:00 23:09:52 00:51:32 DP-mo de OBS ! TCU ! OBS OBS OBS OBS ! GIS MEM ! OBS OBS A CS-mode Normal{Poin ting Normal{Poin ting Normal{Poin ting Normal{Poin ting Normal{Poin ting SUN-p os � s / � s |/| 16.25/161.49 16.22/161.26 16.18/161.09 16.12/160.85 A ttitude 2 4 73.668 100.104 202.993 3 5 2 4 73.668 100.104 202.993 3 5 2 4 73.668 100.104 202.993 3 5 2 4 73.668 100.104 202.993 3 5 2 4 73.668 100.104 202.993 3 5 OP-sta rt(CE) 18:13:23 ( 00h ) Cont ( 09h ) Cont ( 13h ) Cont ( 1Dh ) Cont ( 26h ) GIS HAM ERR | Normal Error ! Normal Error ! Reset Normal A CS ERR (SH)MOMCHG | | | | SIS-mo de F ain t/F ain t 1111/3333 F ain t/F ain t 1111/3333 F ain t/F ain t 1111/3333 F ain t/F ain t 1111/3333 F ain t/F ain t 1111/3333 S0/1-TECT � 33 : 57/ � 33 : 70 � 33 : 96/ � 33 : 65 � 34 : 30/ � 34 : 47 � 34 : 68/ � 34 : 81 � 34 : 98/ � 35 : 10 S0/1-CCDT � 59 : 88/ � 59 : 70 � 59 : 93/ � 59 : 75 � 59 : 98/ � 59 : 80 � 59 : 93/ � 59 : 75 � 59 : 93/ � 59 : 75 GIS-mo de PH(8{8{8{5{0{2) PH(10{8{8{5{0) PH(8{8{8{5{0{2) PH(10{8{8{5{0) PH(8{8{8{5{0{2) GIS LD Hit 25/27 cps 25/26 cps 27/27 cps 28/30 cps 27/27 cps P X Y R S P os MErr HV HL Gain RT-L RT-U T emp RBMT CalPk CalCnt CalTim RT Pk 10 8 8 5 0 FLF No 3/4 48 159 218 19.1 19.1 376.0 2327 21290 184.39 Pass: 9602111237 3/4 40 159 218 13.6 402.0 2099 21290 180.04 SIS Mo de Changes: A521 : F ain t(bit-H),F ain t(bit-M) 1111/3333,L VL ON(0.48keV) GIS Mo de Changes: PH8-8-8-5-0-2(A521) Battery Condition (min/max) BA T V{A BA T V{B BA T I{A BA T I{B BA T T{A BA T T{B 19.50/23.30 19.50/23.30 -4.86/4.75 -4.64/4.78 6.48/7.89 4.82/8.46 Commen t: 07Q#4 : (PI: Arnaud (ESJ)): The observed count-rate is 0.07 cts/s/GIS2+3 (r=4 0 ). ;X;X_ Qbdj QaUZKDlo sbe?RI Y;l‘3R S310 QhG vA>:ZUB Fl$!IN; xzOhG v>H J ; ? U B Fl ^ ok J1 > h G v > Z U B Fl HI I Q b o oster > J1 Kk M-V L T L ] M 6 C 9 | L R Pn ( g v ) ^o J1 >v>H J; ?U BFl dy K{ F S310 LR iu qOk 2 5x pr Qm> hG v>H J; ?U BFl% \" ;J ;=N @ [S :H L ; <d O { cHJ ; F K BW<l t Kk f TM = Y � �H J ; Jk; I U KFH J V w 1b d > L[ UE]l�~OV8ZF;QO ...( }2 )