%’)(& OPERA TION REPOR T Rev.5 V er 3.1 96 , 2 - 12/13 + Y+ 1087/88 KSC *. : T. Murak ami and S. Suzuki A521 P ASS 1 P ASS 2 P ASS 3 P ASS 4 P ASS 5 P ass No. 960212{1237 960212{1443 960213{0102 Op eration X REP RNG ON OP/OG-15 WR T TCU MEM OP ST AR T RNG OF X REP S-CTLG 6 WR T S-CTLG CHK BDR STP/X REP BDR STP X REP RNG ON RNG OF T a rget A521 A521 A521 A OS(UT) 18:00:57 21:23:33 00:46:37 LOS(UT) 18:13:13 21:40:20 00:58:40 Max-El 22.17 Zenith 20.56 Time 18:06:53 | 00:52:08 Rep-band(stat.) X ( Complete ) ( ) X ( Complete ) ( ) X ( Complete ) Rep-sta rt 18:02:21 21:24:27/21:30:07 00:47:21 DP-mo de OBS ! TCU ! OBS OBS ! ACS ! OBS OBS A CS-mode Normal{Poin ting Normal{Poin ting Normal{Poin ting SUN-p os � s / � s |/| 15.63/158.20 15.55/157.85 A ttitude 2 4 73.668 100.104 202.993 3 5 2 4 3 5 2 4 73.668 100.104 202.993 3 5 2 4 3 5 2 4 73.668 100.104 202.993 3 5 OP-sta rt(CE) 18:10:05 ( 00h ) ( ) Cont ( 1Ah ) ( ) Cont ( 33h ) GIS HAM ERR | | Normal A CS ERR | | | SIS-mo de F ain t/F ain t 1111/3333 F ain t/F ain t 1111/3333 F ain t/F ain t 1111/3333 S0/1-TECT � 33 : 13/ � 33 : 26 � 34 : 15/ � 34 : 23 � 34 : 78/ � 34 : 86 S0/1-CCDT � 59 : 51/ � 59 : 33 � 59 : 56/ � 59 : 33 � 59 : 60/ � 59 : 33 GIS-mo de PH(8{8{8{5{0{2) PH(8{8{8{5{0{2) PH(8{8{8{5{0{2) GIS LD Hit 25/27 cps 32/28 cps 25/23 cps P X Y R S P os MErr HV HL Gain RT-L RT-U T emp RBMT CalPk CalCnt CalTim RT Pk 10 8 8 5 0 FLF No 3/4 48 159 218 19.1 19.6 377.6 1966 19640 184.4 Pass: 9602121237 3/4 40 159 218 13.6 400.9 1821 19640 179.8 SIS Mo de Changes: A521 : F ain t(bit-H),F ain t(bit-M) 1111/3333,L VL ON(0.48keV) V773 :F ain t(BIT-H), Bright(bit-M) 0101/2323, L VL OF 3C111 :F ain t(bit-H/M), 1111/3333, L VL ON(0.48keV) GIS Mo de Changes: PH8-8-8-5-0-2 (A521, V773, 3C111) Battery Condition (min/max) BA T V{A BA T V{B BA T I{A BA T I{B BA T T{A BA T T{B 19.50/23.20 19.50/23.30 -4.51/4.75 -4.43/4.78 6.48/7.89 4.82/8.46 Maneuv er Op eration Sta rt Time T a rget Name # ( � , � ) ( � , � , ) 2/13 4:00 V773-T au 1 ( 63.553 , 28.204 ) ( 63.757 , 61.665 , 191.611 ) 2/13 12:10 3C111 2 ( 64.583 , 38.025 ) ( 64.814 , 51.878 , 188.717 ) Commen t: /7N"4 : (PI: Arnaud (ESJ)): The observed count-rate was 0.07 cts/s/GIS2+3 (r=4 0 ). The observed count-rate was 0.12 cts/s/SIS0C1 (r=3 0 ). Elev ation NY ^ Mg 9 source N] lp region-�le =t 5I O: P >o RT L<G Eqv 2 >X =x wB H9 P CqPG E>1 9q @X L B XK 9 " 4W B H $M L S N<p Z j [F J N br@ T Q a0 N E VA J <sq eO y B9 ! N #q6 7{Oz I ‘; 8 =GE NM m eO 16 ip 3 |n k = 20 iJ N@ Jq r}\s " 4N h dI u= f >LG Eq _ ;E XFU:<pDTJQc?M>9�NM~;RTL>LGEXFU:<q ( v2 )