#%’&$ OPERA TION REPOR T Rev.5 V er 3.1 96 * 3 + 22-23 ) Y+ 1126-1127 KSC (, : S. Ueno and H. F ujiw ara M82#1, GRO J1655-40 P ASS 1 P ASS 2 P ASS 3 P ASS 4 P ASS 5 P ass No. 960322{1546 960323{0101 960323{0204 960323{0308 960323{0411 Op eration X REP OP/OG-05 WR T TCU MEM MODE OP ST AR T X REP SBR A RNG STC05-WR T/CHK OBS MODE CPU2/3 STOP/RST RNG OFF X REP BDR STOP X REP BA T-B TCL ON BDR STOP X REP BA T-B TCL ON SBR-A RNG CPU2/3 STOP/RST GIS MEM RNG OFF X REP T a rget M82#1 M82#1 GRO J1655-40 GRO J1655-40 GRO J1655-40 A OS(UT) 22:32:36 00:14:20 01:54:57 03:36:57 05:18:08 LOS(UT) 22:44:25 00:26:16 02:07:41 03:49:12 05:30:10 Max-El 18.172 55.610 Zenith 63.939 23.580 Time 22:38:29 00:19:31 | 03:42:23 05:23:37 Rep-band(stat.) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete ) X ( Complete ) Rep-sta rt 22:34:04 00:14:54 01:56:05/02:01:41 03:37:29 05:19:17 DP-mo de OBS ! TCU ! OBS OBS ! ACS ! OBS OBS OBS OBS A CS-mode Normal{Poin ting Normal{Poin ting Normal{Poin ting Normal{Poin ting Normal{Poin ting SUN-p os � s / � s 24.18/132.18 24.11/132.17 15.57/170.63 15.65/170.59 15.71/170.53 A ttitude 2 4 149.5343 20.3845 142.7693 3 5 2 4 149.5342 20.3843 142.7693 3 5 2 4 253.2363 129.8793 350.7301 3 5 2 4 253.2362 129.8792 350.7302 3 5 2 4 253.2367 129.8791 350.7303 3 5 OP-sta rt(CE) 22:41:10 ( 00h ) Cont ( 0Ah ) Cont ( 1Ah ) Cont ( 23h ) Cont ( 2Dh ) GIS HAM ERR | Err ! Reset | | | A CS ERR (SH)MOMCHG ! Reset | | | | SIS-mo de F ain t/F ain t 1111/3333 F ain t/F ain t 1111/3333 Bright/Brigh t 1111/3333 Bright/Brigh t 1111/3333 Bright/Brigh t 1111/3333 S0/1-TECT � 35 : 36/ � 35 : 44 � 35 : 41/ � 35 : 54 � 35 : 41/ � 35 : 40 � 35 : 56/ � 35 : 40 � 35 : 70/ � 35 : 54 S0/1-CCDT � 61 : 63/ � 60 : 41 � 60 : 40/ � 60 : 17 � 60 : 45/ � 60 : 26 � 60 : 73/ � 60 : 41 � 61 : 06/ � 60 : 69 GIS-mo de PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) GIS LD Hit 24/24 cps 29/27 cps 33/29 cps 32/31 cps 26/28 cps P X Y R S P os MErr HV HL Gain RT-L RT-U T emp RBMT CalPk CalCnt CalTim RT Pk 10 8 8 5 0 FLF No 3/4 48 159 218 19.6 19.1 372.82 2273 21272 184.5 Pass: 9603221546 3/4 40 159 218 13.6 394.71 2115 21272 179.63 SIS Mo de Changes: F ain t(bit-H/M) 1111/3333, L VL OFF for M82#1 Brigh t(bit-H/M) 1111/3333, L VL OFF for GRO J1655-40 ( F ain t during a pass) GIS Mo de Changes: PH 10-8-8-5-0 Battery Condition (min/max) BA T V{A BA T V{B BA T I{A BA T I{B BA T T{A BA T T{B 19.70/23.30 19.70/23.30 -4.21/4.75 -4.38/4.78 5.93/7.32 4.82/8.46 Maneuv er Op eration Sta rt Time T a rget Name # ( � , � ) ( � , � , ) 3/23 00:40 GRO J1655-40 3 ( 253.5008 , -39.8455 ) ( 253.2366 , 129.8804 , 350.7305 ) Commen t: .<V!6 : W e observed M82#1 (JPN, PI=T. Tsuru). The counting rate is 0.47 counts/s (GIS, r � 4 0 ). W e observed GR O J1655-40 (JPN, PI=Y. Ueda). The counting rate is � 0.01 counts/s ? (GIS, r � 4 0 ). GR O J1655-40 _NZ‘SdQ@^VCh>RInp KSC 7rq FONW2WJOS:]TVRstvlDdBXK‘nxw{VbRYPCOMVUnpf3q /<WF F; = Vy z} aD ?] XIn �g S4 �i kV c9 RIn �< A �o �~ R" |� _[O Q@ XH MnI G@ m]fD]RHMnejT-UW�E�5DuC\T@VRID}aUT^S0�D1C^LARInp8�q