$&(’% OPERA TION REPOR T Rev.5 V er 3.1 97 + 5 , 10 * Y+ 1540 KSC )- : H.Kaneda and K.T ak ahashi V ela Shrapnel B1 ! 0543{68.9 P ASS 1 P ASS 2 P ASS 3 P ASS 4 P ASS 5 P ass No. 970510{1032 970510{1136 970510{1239 Operation (HALCA) (HALCA) X-REP OP/OG-01 WR T TCU-MEM BDR-STOP X-REP BDR-STOP OP-ST AR T X-REP SBR-A-RNG ST AR-06 WR T S-CTLG-CHK OBSER VE CPU2/3-STOP CPU2/3-RST GIS-MEM RNG-OFF X-REP T a rget V ela Shrap B1 V ela Shrap B1 V ela Shrap B1 A OS(UT) 15:52:13 17:33:39 19:15:51 LOS(UT) 15:52:16 17:45:42 19:25:12 Max-El Zenith 36.686 9.915 Time | 17:39:08 19:20:00 Rep-band(stat.) ( ) ( ) X ( Complete ) X ( Complete ) X ( Not complete ) Rep-sta rt 15:52:44/15:58:22 17:34:28 19:17:08 DP-mode OBS OBS/ACS/OBS GIS/OBS OBS A CS-mode Normal{Poin ting Normal{Poin ting Normal{P oin ting A CS-spn/ � s � s |/| |/| |/| A ttitude 2 4 3 5 2 4 3 5 2 4 135.76806 133.49001 163.64569 3 5 2 4 135.76842 133.49003 163.64640 3 5 2 4 135.76847 133.48992 163.64633 3 5 OP-sta rt(CE) ( ) ( ) 16:01:55 ( 00h ) Cont ( 0Ch ) Con t ( 17h ) GIS HAM ERR ERR ! Reset | | A CS ERR (SH)MOMCHG ! Reset | | SIS-mode F ain t 1212/3030 F ain t 1212/3030 F ain t 1212/3030 S0/1-TECT � 39 : 83/ � 39 : 82 � C � 40 : 12/ � 40 : 06 � C � 40 : 26/ � 40 : 26 � C S0/1-CCDT � 61 : 62/ � 61 : 72 � C � 61 : 62/ � 61 : 72 � C � 61 : 62/ � 61 : 72 � C GIS-mode PH(10{8{8{5{0) PH(10{8{8{5{0) PH(10{8{8{5{0) GIS LD Hit 32/29 cps 30/28 cps 24/21 cps P X Y R S Pos MErr HV HL Gain RT-L RT-U T emp RBMT CalPk RT Pk CalCnt/time 10 8 8 5 0 FLF 1 3/4 48 159 218 18.0 12.0 375.31 184.28 1036/15822 Pass: 970510-1032 3/4 40 159 218 12.0 400.80 179.92 1014/15822 SIS Mo de Changes: V ela Shrap B1 2CCD (1212/3030) F/F (LD 0.55 keV, AD on) 0543{68.9 1CCD (1111/3333) F/B GIS Mo de Changes: V ela Shrap B1 PH (10{8{8{5{0{0) 0543{68.9 PH (10{8{8{5{0{0) Battery Condition (min/max) BA T V{A BA T V{B BA T I{A BA T I{B BA T T{A BA T T{B 19.70/23.30 19.70/23.30 � 4 : 29/4.75 � 4 : 38/4.76 4.82/8.74 4.82/8.46 Maneuv er Op eration Sta rt Time T arget Name # ( � , � ) ( � , � , ) 5/11 09:00 0543{68.9 5 ( MnvAlpha1 , � 68.9811 ) ( 86.33345 , 159.0357 , 146.875517 )

Commen t: .3K#1 : ASCA observed V ela Shrapnel. Photon count rates were � 0 : 068 c/s for the SIS. Y03K/LZ g\‘\Kk ABTn7 Ad\fai\ e\b_\9q8 SM>A[= SMFZg\ ‘\KkGW s ;HRuVG> EZ jIxy TOR=G <P5>8t 5D:M@U F>A9Z= SLvlP> 5rpF?J[ ]| X^}03ILnw2!9OCE:M?ZN6m"zh\cI4QM>A[ ( o{ )