%’)(& OPERA TION REPOR T Rev.5 V er 3.1 1999 , 04 - 06 + Y+ 2236 KSC *. : A.F uruza w a and Y.Uc hiy ama 1SAXJ1935.3-52 ! 1E1841-0045 N3 ! 1E0953.8+6918 P ASS 1 P ASS 2 P ASS 3 P ASS 4 P ASS 5 P ass No. 990406{0515 990406{0618 990406{0721 Op eration (AKEBONO) X-REP SBR-A-RNG OP/OG-04 WR T TCU-MEM ST AR-01 WR T S-CTLG-CHK OBSER VE CPU2/3-STP CPU2/3-RST OP-ST AR T RNG-OFF X-REP CPU2/3-STOP CPU2/3-RST GIS-MEM BDR-STOP X-REP BDR-STOP X-REP SBR-A-RNG CPU2/3-STP CPU2/3-RST RNG-OFF (GEOT AIL) T a rget 1SAXJ1935.3- 52 1E1841- 0045 N3 1E1841- 0045 N3 A OS(UT) 07:02:41 08:43:21 10:24:41 LOS(UT) 07:15:14 08:56:18 10:37:14 Max-El 70.42 � Zenith 51.80 � Time 07:08:20 | 10:30:21 Rep- band(stat.) ( ) X ( Complete ) X ( Complete ) X ( Complete ) ( ) Rep-sta rt 07:03:16 08:44:02/08:50:00 10:25:22 DP-mo de OBS/TCU/OBS /ACS/OBS OBS/GIS/OBS OBS A CS-mode Normal{ Poin ting Normal{ Poin ting Normal{ Poin ting SUN-p os � s / � s 7.713 � / 87.840 � 5.19 � /184.75 � 5.20 � /186.18 � A ttitude 2 6 4 3 7 5 2 6 4 293 : 5836 � 143 : 0715 � 18 : 5171 � 3 7 5 2 6 4 280 : 1416 � 95 : 0234 � 5 : 3282 � 3 7 5 2 6 4 280 : 1420 � 95 : 0222 � 5 : 3272 � 3 7 5 2 6 4 3 7 5 OP-sta rt(CE) ( ) 07:12:38 ( 00h ) Cont ( 0Fh ) Cont ( 19h ) ( ) GIS HAM ERR ERR ! Reset | ERR ! Reset A CS ERR | | | SIS-mo de Brt/Brt 1212/3030 Fnt/Fn t 1111/3333 Fnt/Fn t 1111/3333 S0/1-TECT -36.48/- 36.37 � C -35.61/- 35.59 � C -34.49/- 34.52 � C S0/1-CCDT -61.62/- 61.77 � C -61.62/- 61.77 � C -61.57/- 61.62 � C GIS-mo de PH(10{8{8{5{ 0) PH(8{8{8{0{0{ 7) PH(8{8{8{0{0{ 7) GIS LD Hit 39.7/36.8 c s � 1 27.7/30.6 c s � 1 22.9/26.0 c s � 1 P X Y R S P os MErr HV HL Gain RT- L RT- U T emp RBMT CalPk CalCnt CalTim RT Pk 10 8 8 5 0 FLF 2 3/4 48 159 218 13.1 12.5 382.13 660 15454 183.90 Pass: 990406{0515 3/4 40 159 218 6.5 407.36 572 15454 180.60 SIS Mo de Changes: 1SAXJ1935.3-52 2CCD(1212/3030) B/B, LD(0.48keV) ON, AD ON/OFF 1E1841-0045 N3 1CCD(1111/3333) F/F, LD(0.48keV) ON, AD OFF 1E0953.8+6918 1CCD(1111/3333) B/B, LD OFF, AD OFF GIS Mo de Changes: 1SAXJ1935.3-52 PH(10{8{8{5{0) 1E1841-0045 N3 PH(8{8{8{0{0{7) 1E0953.8+6918 PH(8{6{6{0{0{10) Battery Condition (min/max) BA T V{A BA T V{B BA T I{A BA T I{B BA T T{A BA T T{B 18 : 50 = 23 : 20 18 : 50 = 23 : 40 � 4 : 81 = 4 : 73 � 5 : 12 = 4 : 78 4 : 82 = 8 : 74 4 : 27 = 8 : 46

Maneuv er Op eration Sta rt Time T a rget Name # ( � , � ) ( � , � , ) 04/06 08:30 1E1841-0045 N3 5 (280 : 3300, � 4 : 9368) (280 : 1416, 95 : 0225, 5 : 3274) 04/06 21:00 1E0953.8+6918 6 (149 : 4767, 69 : 0628) (149 : 9665, 21 : 0495, 129 : 6016) Commen t: 023 /1 : ASCA observed 1E1841-0045 N3 (PI Y.Saito, JPN). Counting rate is 0.9 cts/s for GIS and 1.4 cts/s for SIS. NBJQ QL NRFPXR5^h]855f D;TCe; ; KSC HmI $p YFH AT 6fng qH KSC ir Hy GwH vV !B75 @m 8| i@P F5f ?SG } xyGM4LQ�oGZF5fFWDF:z<5f ( <LB@emc_ 2 qYAB@f� ) �lI t #F l C< @f ; ;C I s � |R x 8 KD W E F5 bdh ] V‘[a \ C 9 RH Ce " �{ G 5 RD 9 O Q>B D~Hj98U7QL=f ( ku )