$&(’% OPERA TION REPOR T Rev.5 V er 3.1 1999 + 08 , 18 * Y+ 2370 KSC )- : M.Sugizaki, K.Y amaok a and T.Kagei G 315.9+0.0 ! STEP CAS A 3 ! CAS A C1X-3 ! CAS A C1V 2 P ASS 1 P ASS 2 P ASS 3 P ASS 4 P ASS 5 P ass No. 990818{0824 990818{1134 Op eration X-REP SBR-A-RNG OP/OG-02 WR T TCU-MEM ST AR-04 WR T S-CTLG-CHK OBSER VE CPU2/3-STOP CPU2/3-RST OP-ST AR T RNG-OFF (AKEBONO) (YOHKOH) X-REP ACS-ERR- RST CPU2/3-STOP CPU2/3-RST GIS-MEM T a rget G 315.9+0.0 CAS A C1X-3 A OS(UT) 11:56:05 16:58:16 LOS(UT) 12:08:12 17:09:14 Max-El 55.090 � 22.327 � Time 12:01:30 17:03:27 Rep- band(stat.) X ( Complete ) ( ) ( ) X ( Complete ) ( ) Rep-sta rt 11:56:52 16:59:05 DP-mo de OBS/TCU/OBS OBS/GIS/OBS A CS-mode Normal{ Poin ting Normal{ Poin ting SUN-p os � s / � s 11.71 � /256.80 � | � /| � A ttitude 2 6 4 219 : 71323 � 150 : 04918 � 146 : 72874 � 3 7 5 2 6 4 3 7 5 2 6 4 3 7 5 2 6 4 350 : 72026 � 31 : 29328 � 56 : 29265 � 3 7 5 2 6 4 3 7 5 OP-sta rt(CE) 12:05:24 ( 89 ! 00h ) ( ) ( ) Cont ( 2Ch ) ( ) GIS HAM ERR ERR ! Reset | A CS ERR | (SH)R W A OM ! Reset SIS-mo de Fn t/Fn t 1111/3333 Fnt/Fn t 0123/2301 S0/1-TECT � 38 : 08 = � 38 : 07 � C � 40 : 55 = � 40 : 16 � C S0/1-CCDT � 61 : 62 = � 61 : 72 � C � 61 : 62 = � 61 : 72 � C GIS-mo de PH(10{8{8{5{ 0) PH(10{8{8{5{ 0) GIS LD Hit 29.1/31.5 c s � 1 55.8/70.3 c s � 1 P X Y R S P os MErr HV HL Gain RT- L RT- U T emp RBMT CalPk CalCnt CalTim RT Pk 10 8 8 5 0 FLF 1 3/4 48 159 218 15.8 15.8 372.51 885 20666 184.31 Pass: 990818{0824 3/4 40 159 218 9.8 399.36 791 20666 180.15 SIS Mo de Changes: G 315.9+0.0 1CCD(1111/3333) F/F, LD OF, AD OF STEP CAS A 3 4CCD(0123/2301) F/F, LD ON, AD ON CAS A C1X-3 4CCD(0123/2301)/1CCD(1111/3333) F/B, LD ON, AD ON CAS A C1V-2 4CCD(0123/2301)/1CCD(1111/3333) F/B, LD ON, AD ON GIS Mo de Changes: G 315.9+0.0 PH(10{8{8{5{0) STEP CAS A 3 PH(10{8{8{5{0) CAS A C1X-3 PH(10{8{8{5{0) CAS A C1V-2 PH(10{8{8{5{0)

Condition Condition (min/max) BA T V{A BA T V{B BA T I{A BA T I{B BA T T{A BA T T{B 18 : 90 = 23 : 20 18 : 90 = 23 : 30 � 5 : 11 = 4 : 75 � 4 : 82 = 4 : 78 4 : 82 = 8 : 74 6 : 76 = 9 : 03 Maneuv er Op eration Sta rt Time T a rget Name # ( � , � ) ( � , � , ) 08/18 16:05 STEP CAS A 3 1 (350 : 8542, 58 : 8144) (350 : 9617, 31 : 3458, 66 : 3337) 08/18 16:25 CAS A C1X-3 2 (350 : 8542, 58 : 8144) (350 : 7194, 31 : 2902, 56 : 2940) 08/19 03:10 CAS A C1V 2 3 (350 : 8542, 58 : 8144) (350 : 8969, 31 : 3555, 56 : 3011) Commen t: /12.0 : ASCA observed G 315.9+0.0(PI=Kulk arni:USJ), and Cas A C1X-3 for SIS calibration. 35GE:7KFSFJFORHI=AVE:7KGXY QEE:9BAV6PDEE:9BAB; ? ( Z# ) @M@M^KI>V ( T4 ) [<LA\]J6CN?9WT4<PF‘_VT4<P8UaEDKI=AV ( "! ) V